Public Law 119–41: To amend the Bottles and Breastfeeding Equipment Screening Act to require hygienic handling of breast milk and baby formula by security screening personnel of the Transportation Security Administration and personnel of private security companies providing security screening, and for other purposes.
Public Law
41
Public Law 119–41
139 Stat. 663
2025-11-25
2025-11-25
United States Government Publishing Office
National Archives and Records Administration
Office of the Federal Register
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
GPO Locator to USLM Converter 4.15.31;Stage2.20250702
2025-12-08
119
public
PUBLIC LAW 119–41—NOV. 25, 2025
139 STAT. 663
Public Law
119–41
119th Congress

An Act
To amend the Bottles and Breastfeeding Equipment Screening Act to require hygienic handling of breast milk and baby formula by security screening personnel of the Transportation Security Administration and personnel of private security companies providing security screening, and for other purposes.
Nov. 25, 2025
[S. 260]
Be it enacted by the Senate and House of Representa­tives of the United States of America in Congress assembled,
Bottles and Breastfeeding Equipment Screening Enhancement Act.
SECTION 1.
49 USC 40101 note.

SHORT TITLE.
This Act may be cited as the “Bottles and Breastfeeding Equipment Screening Enhancement Act”.
SEC. 2.

HYGIENIC HANDLING OF BREAST MILK AND BABY FORMULA DURING AVIATION SECURITY SCREENING.
The Bottles and Breastfeeding Equipment Screening Act (Public Law 114–293) is
49 USC 44901 note.
amended by adding at the end the following new sections:
“SEC. 3.
Deadline.
Time period.
Update.
Guidance.
HYGIENIC HANDLING OF BREAST MILK AND BABY FORMULA DURING AVIATION SECURITY SCREENING.
“Not later than 90 days after the date of the enactment of this section and every five years thereafter, if appropriate, the Administrator of the Transportation Security Administration shall issue or update, as the case may be, guidance to minimize the risk for contamination of any breast milk, baby formula, purified deionized water for infants, and juice (as well as ice packs, freezer packs, frozen gel packs and other accessories required to cool breast milk, baby formula, and juice) that is subject to re-screening or otherwise subject to additional screening. Such guidance shall—
“(1)
be developed in consultation with nationally recognized maternal health organizations;
“(2)
ensure adherence to hygienic standards, as established by the Administrator, in consultation with nationally recognized maternal health organizations;
“(3)
ensure that, when any such re-screening or additional screening requires additional testing, such testing so adheres to such standards, to so minimize such risk; and
“(4)
Applicability.
apply to security screening personnel of the Administration and personnel of private security companies providing security screening pursuant to section 44920 of title 49, United States Code.
“SEC. 4.
Reports.
Audit.
INSPECTOR GENERAL AUDIT.
“Not later than one year after the date of the enactment of this section, the Inspector General of the Department of Homeland Security shall submit to the Committee on Homeland Security 139 STAT. 664 of the House of Representatives and the Committee on Commerce, Science, and Transportation of the Senate a report containing an audit of compliance with the requirements of sections 2 and 3. Such audit shall also include information relating to the effect of various types of screening technologies, including bottled liquid scanners, on the screening of breast milk, baby formula, purified deionized water for infants, and juice (as well as ice packs, freezer packs, frozen gel packs and other accessories required to cool breast milk, baby formula, and juice) that is subject to re-screening or otherwise subject to additional screening, and the rate at which such items are denied entry into the sterile area (as such term is defined in section 1540.5 of title 49, Code of Federal Regulations).”
.
Approved
November 25, 2025
.

LEGISLATIVE HISTORY—S. 260 (H.R. 820):
HOUSE REPORTS: ┐No. 119–197 (Comm. on Homeland Security) accompanying H.R. 820.
SENATE REPORTS: ┐No. 119–19 (Comm. on Commerce, Science, and Transportation).

CONGRESSIONAL RECORD, Vol. 171 (2025):
May 14, considered and passed Senate.
Nov. 17, considered and passed House.
○