Detainee Treatment Act of 2005 - Sec. 1001 - 1006
Public Law 109–148
Detainee Treatment Act of 2005 - Sec. 1001 - 1006
148
109–148
Statute Compilation
United States House of Representatives
Office of the Legislative Counsel
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
GPO Statute Compilations USLM converter, version 20210527.1
2021-10-15
Detainee Treatment Act of 2005
Support Our Scouts Act of 2005
Department of Defense Appropriations Act, 2006
Higher Education Hurricane Relief Act of 2005
Emergency Supplemental Appropriations Act to Address Hurricanes in the Gulf of Mexico and Pandemic Influenza, 2006
Public Readiness and Emergency Preparedness Act
Department of Defense, Emergency Supplemental Appropriations to Address Hurricanes in the Gulf of Mexico, and Pandemic Influenza Act, 2006
489
109
2005-12-30
Detainee Treatment Act of 2005 - Sec. 1001 - 1006
[Title X of the Department of Defense, Emergency Supplemental Appropriations to Address Hurricanes in the Gulf of Mexico, and Pandemic Influenza Act, 2006]
[(Public Law 109–148, approved Dec. 30, 2005)]
[As amended through Public Law 111–84, Enacted October 28, 2009]
[Currency: This publication is a compilation of the text of title X of Public Law 109–148. It was last amended by the public law listed in the As Amended Through note above and below at the bottom of each page of the pdf version and reflects current law through the date of the enactment of the public law listed at https://www.govinfo.gov/app/collection/comps/]
[Note: While this publication does not represent an official version of any Federal statute, substantial efforts have been made to ensure the accuracy of its contents. The official version of Federal law is found in the United States Statutes at Large and in the United States Code. The legal effect to be given to the Statutes at Large and the United States Code is established by statute (1 U.S.C. 112, 204).]
TITLE X—

MATTERS RELATING TO DETAINEES1
^1
The provisions contained in this title were also enacted by title XIV of the National Defense Authorization Act for Fiscal Year 2006 (Public Law 109–163). The Military Commissions Act of 2006 (Public Law 109–366) only amended title X of Public Law 109–148, and did not amend the duplicative enactment in Public Law 109–163.
SEC. 1001.
[42 U.S.C. 2000dd note]

SHORT TITLE.
This title may be cited as the “Detainee Treatment Act of 2005”.
SEC. 1002.
[10 U.S.C. 801 note]

UNIFORM STANDARDS FOR THE INTERROGATION OF PERSONS UNDER THE DETENTION OF THE DEPARTMENT OF DEFENSE.
(a)

In General.—
No person in the custody or under the effective control of the Department of Defense or under detention in a Department of Defense facility shall be subject to any treatment or technique of interrogation not authorized by and listed in the United States Army Field Manual on Intelligence Interrogation.
(b)

Applicability.—
Subsection (a) shall not apply with respect to any person in the custody or under the effective control of the Department of Defense pursuant to a criminal law or immigration law of the United States.
(c)

Construction.—
Nothing in this section shall be construed to affect the rights under the United States Constitution of any person in the custody or under the physical jurisdiction of the United States.
SEC. 1003.
[42 U.S.C. 2000dd]

PROHIBITION ON CRUEL, INHUMAN, OR DEGRADING TREATMENT OR PUNISHMENT OF PERSONS UNDER CUSTODY OR CONTROL OF THE UNITED STATES GOVERNMENT.
(a)

In General.—
No individual in the custody or under the physical control of the United States Government, regardless of nationality or physical location, shall be subject to cruel, inhuman, or degrading treatment or punishment.
(b)

Construction.—
Nothing in this section shall be construed to impose any geographical limitation on the applicability of the prohibition against cruel, inhuman, or degrading treatment or punishment under this section.
(c)

Limitation on Supersedure.—
The provisions of this section shall not be superseded, except by a provision of law enacted after the date of the enactment of this Act which specifically repeals, modifies, or supersedes the provisions of this section.
(d)

Cruel, Inhuman, or Degrading Treatment or Punishment Defined.—
In this section, the term “cruel, inhuman, or degrading treatment or punishment” means the cruel, unusual, and inhumane treatment or punishment prohibited by the Fifth, Eighth, and Fourteenth Amendments to the Constitution of the United States, as defined in the United States Reservations, Declarations and Understandings to the United Nations Convention Against Torture and Other Forms of Cruel, Inhuman or Degrading Treatment or Punishment done at New York, December 10, 1984.
SEC. 1004.
[42 U.S.C. 2000dd–1]

PROTECTION OF UNITED STATES GOVERNMENT PERSONNEL ENGAGED IN AUTHORIZED INTERROGATIONS.1
^1
Section 8(b) of the Military Commissions Act of 2006 (Public Law 109–366; 42 U.S.C. 2000dd–1 note; 120 Stat. 2636) provides as follows:
(b) Protection of Personnel.—Section 1004 of the Detainee Treatment Act of 2005 (42 U.S.C. 2000dd–1) shall apply with respect to any criminal prosecution that—
(1) relates to the detention and interrogation of aliens described in such section;
(2) is grounded in section 2441(c)(3) of title 18, United States Code; and
(3) relates to actions occurring between September 11, 2001, and December 30, 2005.
(a)

Protection of United States Government Personnel.—
In any civil action or criminal prosecution against an officer, employee, member of the Armed Forces, or other agent of the United States Government who is a United States person, arising out of the officer, employee, member of the Armed Forces, or other agent's engaging in specific operational practices, that involve detention and interrogation of aliens who the President or his designees have determined are believed to be engaged in or associated with international terrorist activity that poses a serious, continuing threat to the United States, its interests, or its allies, and that were officially authorized and determined to be lawful at the time that they were conducted, it shall be a defense that such officer, employee, member of the Armed Forces, or other agent did not know that the practices were unlawful and a person of ordinary sense and understanding would not know the practices were unlawful. Good faith reliance on advice of counsel should be an important factor, among others, to consider in assessing whether a person of ordinary sense and understanding would have known the practices to be unlawful. Nothing in this section shall be construed to limit or extinguish any defense or protection otherwise available to any person or entity from suit, civil or criminal liability, or damages, or to provide immunity from prosecution for any criminal offense by the proper authorities.
(b)1

Counsel.—
The United States Government shall provide or employ counsel, and pay counsel fees, court costs, bail, and other expenses incident to the representation of an officer, employee, member of the Armed Forces, or other agent described in subsection (a), with respect to any civil action or criminal prosecution or investigation arising out of practices described in that subsection, whether before United States courts or agencies, foreign courts or agencies, or international courts or agencies, under the same conditions, and to the same extent, to which such services and payments are authorized under section 1037 of title 10, United States Code.
^1
Section 1004(b) reflects the execution of the amendment made by section 8(a)(3) of Public Law 109–366 including the layered technical amendment by section 1063(d)(1) of P.L. 110–181 which probably should have been made to insert a comma instead of a semicolon. The original amendment was carried out to reflect the probable intent of Congress.
SEC. 1005.
[10 U.S.C. 801 note]

PROCEDURES FOR STATUS REVIEW OF DETAINEES OUTSIDE THE UNITED STATES.
(a)

Submittal of Procedures for Status Review of Detainees at Guantanamo Bay, Cuba, and in Afghanistan and Iraq.—
(1)

In general.—
Not later than 180 days after the date of the enactment of this Act, the Secretary of Defense shall submit to the Committee on Armed Services and the Committee on the Judiciary of the Senate and the Committee on Armed Services and the Committee on the Judiciary of the House of Representatives a report setting forth—
(A)
the procedures of the Combatant Status Review Tribunals and the Administrative Review Boards established by direction of the Secretary of Defense that are in operation at Guantanamo Bay, Cuba, for determining the status of the detainees held at Guantanamo Bay or to provide an annual review to determine the need to continue to detain an alien who is a detainee; and
(B)
the procedures in operation in Afghanistan and Iraq for a determination of the status of aliens detained in the custody or under the physical control of the Department of Defense in those countries.
(2)

Designated civilian official.—
The procedures submitted to Congress pursuant to paragraph (1)(A) shall ensure that the official of the Department of Defense who is designated by the President or Secretary of Defense to be the final review authority within the Department of Defense with respect to decisions of any such tribunal or board (referred to as the “Designated Civilian Official”) shall be a civilian officer of the Department of Defense holding an office to which appointments are required by law to be made by the President, by and with the advice and consent of the Senate.
(3)

Consideration of new evidence.—
The procedures submitted under paragraph (1)(A) shall provide for periodic review of any new evidence that may become available relating to the enemy combatant status of a detainee.
(b)

Consideration of Statements Derived With Coercion.—
(1)

Assessment.—
The procedures submitted to Congress pursuant to subsection (a)(1)(A) shall ensure that a Combatant Status Review Tribunal or Administrative Review Board, or any similar or successor administrative tribunal or board, in making a determination of status or disposition of any detainee under such procedures, shall, to the extent practicable, assess—
(A)
whether any statement derived from or relating to such detainee was obtained as a result of coercion; and
(B)
the probative value (if any) of any such statement.
(2)

Applicability.—
Paragraph (1) applies with respect to any proceeding beginning on or after the date of the enactment of this Act.
(c)

Report on Modification of Procedures.—
The Secretary of Defense shall submit to the committees specified in subsection (a)(1) a report on any modification of the procedures submitted under subsection (a). Any such report shall be submitted not later than 60 days before the date on which such modification goes into effect.
(d)

Annual Report.—
(1)

Report required.—
The Secretary of Defense shall submit to Congress an annual report on the annual review process for aliens in the custody of the Department of Defense outside the United States. Each such report shall be submitted in unclassified form, with a classified annex, if necessary. The report shall be submitted not later than December 31 each year.
(2)

Elements of report.—
Each such report shall include the following with respect to the year covered by the report:
(A)
The number of detainees whose status was reviewed.
(B)
The procedures used at each location.
(e)

Judicial Review of Detention of Enemy Combatants.—
(1)

In general.—
[Omitted-Amendment]
(2)

Review of decisions of combatant status review tribunals of propriety of detention.—
(A)

In general.—
Subject to subparagraphs (B), (C), and (D), the United States Court of Appeals for the District of Columbia Circuit shall have exclusive jurisdiction to determine the validity of any final decision of a Combatant Status Review Tribunal that an alien is properly detained as an enemy combatant.
(B)

Limitation on claims.—
The jurisdiction of the United States Court of Appeals for the District of Columbia Circuit under this paragraph shall be limited to claims brought by or on behalf of an alien—
(i)
who is, at the time a request for review by such court is filed, detained by the United States.
(ii)
for whom a Combatant Status Review Tribunal has been conducted, pursuant to applicable procedures specified by the Secretary of Defense.
(C)

Scope of review.—
The jurisdiction of the United States Court of Appeals for the District of Columbia Circuit on any claims with respect to an alien under this paragraph shall be limited to the consideration of—
(i)
whether the status determination of the Combatant Status Review Tribunal with regard to such alien was consistent with the standards and procedures specified by the Secretary of Defense for Combatant Status Review Tribunals (including the requirement that the conclusion of the Tribunal be supported by a preponderance of the evidence and allowing a rebuttable presumption in favor of the Government's evidence); and
(ii)
to the extent the Constitution and laws of the United States are applicable, whether the use of such standards and procedures to make the determination is consistent with the Constitution and laws of the United States.
(D)

Termination on release from custody.—
The jurisdiction of the United States Court of Appeals for the District of Columbia Circuit with respect to the claims of an alien under this paragraph shall cease upon the release of such alien from the custody of the Department of Defense.
[Paragraph (3) was repealed by section 1803(b) of division A of Public Law 111–84 (as amended).]
(4)

Respondent.—
The Secretary of Defense shall be the named respondent in any appeal to the United States Court of Appeals for the District of Columbia Circuit under this subsection.
(f)

Construction.—
Nothing in this section shall be construed to confer any constitutional right on an alien detained as an enemy combatant outside the United States.
(g)

United States Defined.—
For purposes of this section, the term “United States”, when used in a geographic sense, is as defined in section 101(a)(38) of the Immigration and Nationality Act and, in particular, does not include the United States Naval Station, Guantanamo Bay, Cuba.
(h)

Effective Date.—
(1)

In general.—
This section shall take effect on the date of the enactment of this Act.
(2)

Review of combatant status tribunal and military commission decisions.—
Paragraphs (2) and (3) of subsection (e) shall apply with respect to any claim whose review is governed by one of such paragraphs and that is pending on or after the date of the enactment of this Act.
SEC. 1006.
[10 U.S.C. 801 note]

TRAINING OF IRAQI FORCES REGARDING TREATMENT OF DETAINEES.
(a)

Required Policies.—
(1)

In general.—
The Secretary of Defense shall ensure that policies are prescribed regarding procedures for military and civilian personnel of the Department of Defense and contractor personnel of the Department of Defense in Iraq that are intended to ensure that members of the Armed Forces, and all persons acting on behalf of the Armed Forces or within facilities of the Armed Forces, ensure that all personnel of Iraqi military forces who are trained by Department of Defense personnel and contractor personnel of the Department of Defense receive training regarding the international obligations and laws applicable to the humane detention of detainees, including protections afforded under the Geneva Conventions and the Convention Against Torture.
(2)

Acknowledgment of training.—
The Secretary shall ensure that, for all personnel of the Iraqi Security Forces who are provided training referred to in paragraph (1), there is documented acknowledgment of such training having been provided.
(3)

Deadline for policies to be prescribed.—
The policies required by paragraph (1) shall be prescribed not later than 180 days after the date of the enactment of this Act.
(b)

Army Field Manual.—
(1)

Translation.—
The Secretary of Defense shall provide for the United States Army Field Manual on Intelligence Interrogation to be translated into arabic and any other language the Secretary determines appropriate for use by members of the Iraqi military forces.
(2)

Distribution.—
The Secretary of Defense shall provide for such manual, as translated, to be provided to each unit of the Iraqi military forces trained by Department of Defense personnel or contractor personnel of the Department of Defense.
(c)

Transmittal of Regulations.—
Not less than 30 days after the date on which regulations, policies, and orders are first prescribed under subsection (a), the Secretary of Defense shall submit to the Committee on Armed Services of the Senate and the Committee on Armed Services of the House of Representatives copies of such regulations, policies, or orders, together with a report on steps taken to the date of the report to implement this section.
(d)

Annual Report.—
Not less than one year after the date of the enactment of this Act, and annually thereafter, the Secretary of Defense shall submit to the Committee on Armed Services of the Senate and the Committee on Armed Services of the House of Representatives a report on the implementation of this section.