42
Public Health
5
2017-10-01
2017-10-01
false

CONDITIONS OF PARTICIPATION FOR HOSPITALS
482

PART 482
Public Health
CENTERS FOR MEDICARE & MEDICAID SERVICES, DEPARTMENT OF HEALTH AND HUMAN SERVICES (CONTINUED)
STANDARDS AND CERTIFICATION
Pt. 482

PART 482—CONDITIONS OF PARTICIPATION FOR HOSPITALS

Subpart A—General Provisions
Sec.
482.1
Basis and scope.
482.2
Provision of emergency services by nonparticipating hospitals.

Subpart B—Administration
482.11
Condition of participation: Compliance with Federal, State and local laws.
482.12
Condition of participation: Governing body.
482.13
Condition of participation: Patient's rights.
482.15
Condition of participation: Emergency preparedness.

Subpart C—Basic Hospital Functions
482.21
Condition of participation: Quality assessment and performance improvement program.
482.22
Condition of participation: Medical staff.
482.23
Condition of participation: Nursing services.
482.24
Condition of participation: Medical record services.
482.25
Condition of participation: Pharmaceutical services.
482.26
Condition of participation: Radiologic services.
482.27
Condition of participation: Laboratory services.
482.28
Condition of participation: Food and dietetic services.
482.30
Condition of participation: Utilization review.
482.41
Condition of participation: Physical environment.
482.42
Condition of participation: Infection control.
482.43
Condition of participation: Discharge planning.
482.45
Condition of participation: Organ, tissue, and eye procurement.

Subpart D—Optional Hospital Services
482.51
Condition of participation: Surgical services.
482.52
Condition of participation: Anesthesia services.
482.53
Condition of participation: Nuclear medicine services.
482.54
Condition of participation: Outpatient services.
482.55
Condition of participation: Emergency services.
482.56
Condition of participation: Rehabilitation services.
482.57
Condition of participation: Respiratory care services.
482.58
Special requirements for hospital providers of long-term care services (“swing-beds”).

Subpart E—Requirements for Specialty Hospitals
482.60
Special provisions applying to psychiatric hospitals.
482.61
Condition of participation: Special medical record requirements for psychiatric hospitals.
482.62
Condition of participation: Special staff requirements for psychiatric hospitals.
482.68
Special requirements for transplant centers.
482.70
Definitions.

General Requirements for Transplant Centers
482.72
Condition of participation: OPTN Membership.
482.74
Condition of participation: Notification to CMS.
482.76
Condition of participation: Pediatric Transplants.
482.78
Condition of participation: Emergency preparedness for transplant centers.

Transplant Center Data Submission, Clinical Experience, and Outcome Requirements
482.80
Condition of participation: Data submission, clinical experience, and outcome requirements for initial approval of transplant centers.
482.82
Condition of participation: Data submission, clinical experience, and outcome requirements for re-approval of transplant centers.

Transplant Center Process Requirements
482.90
Condition of participation: Patient and living donor selection.
482.92
Condition of participation: Organ recovery and receipt.
482.94
Condition of participation: Patient and living donor management.
482.96
Condition of participation: Quality assessment and performance improvement (QAPI).
482.98
Condition of participation: Human resources.
482.100
Condition of participation: Organ procurement.
482.102
Condition of participation: Patient and living donor rights.
482.104
Condition of participation: Additional requirements for kidney transplant centers.

Authority:
Secs. 1102, 1871 and 1881 of the Social Security Act (42 U.S.C. 1302, 1395hh, and 1395rr), unless otherwise noted.

Source:
51 FR 22042, June 17, 1986, unless otherwise noted.

Subpart A—General Provisions
§ 482.1
Basis and scope.
(a) Statutory basis. (1) Section 1861(e) of the Act provides that—
(i) Hospitals participating in Medicare must meet certain specified requirements; and
(ii) The Secretary may impose additional requirements if they are found necessary in the interest of the health and safety of the individuals who are furnished services in hospitals.
(2) Section 1861(f) of the Act provides that an institution participating in Medicare as a psychiatric hospital must meet certain specified requirements imposed on hospitals under section 1861(e), must be primarily engaged in providing, by or under the supervision of a physician, psychiatric services for the diagnosis and treatment of mentally ill persons, must maintain clinical records and other records that the Secretary finds necessary, and must meet staffing requirements that the Secretary finds necessary to carry out an active program of treatment for individuals who are furnished services in the hospital. A distinct part of an institution can participate as a psychiatric hospital if the institution meets the specified 1861(e) requirements and is primarily engaged in providing psychiatric services, and if the distinct part meets the records and staffing requirements that the Secretary finds necessary.
(3) Sections 1861(k) and 1902(a)(30) of the Act provide that hospitals participating in Medicare and Medicaid must have a utilization review plan that meets specified requirements.
(4) Section 1883 of the Act sets forth the requirements for hospitals that provide long term care under an agreement with the Secretary.
(5) Section 1905(a) of the Act provides that “medical assistance” (Medicaid) payments may be applied to various hospital services. Regulations interpreting those provisions specify that hospitals receiving payment under Medicaid must meet the requirements for participation in Medicare (except in the case of medical supervision of nurse-midwife services. See §§ 440.10 and 440.165 of this chapter.).
(b) Scope. Except as provided in subpart A of part 488 of this chapter, the provisions of this part serve as the basis of survey activities for the purpose of determining whether a hospital qualifies for a provider agreement under Medicare and Medicaid.
[51 FR 22042, June 17, 1986, as amended at 60 FR 50442, Sept. 29, 1995]
§ 482.2
Provision of emergency services by nonparticipating hospitals.
(a) The services of an institution that does not have an agreement to participate in the Medicare program may, nevertheless, be reimbursed under the program if—
(1) The services are emergency services; and
(2) The institution meets the requirements of section 1861(e) (1) through (5) and (7) of the Act. Rules applicable to emergency services furnished by nonparticipating hospitals are set forth in subpart G of part 424 of this chapter.
(b) Section 440.170(e) of this chapter defines emergency hospital services for purposes of Medicaid reimbursement.
[51 FR 22042, June 17, 1986, as amended at 53 FR 6648, Mar. 2, 1988]

Subpart B—Administration
§ 482.11
Condition of participation: Compliance with Federal, State and local laws.
(a) The hospital must be in compliance with applicable Federal laws related to the health and safety of patients.
(b) The hospital must be—
(1) Licensed; or
(2) Approved as meeting standards for licensing established by the agency of the State or locality responsible for licensing hospitals.
(c) The hospital must assure that personnel are licensed or meet other applicable standards that are required by State or local laws.
§ 482.12
Condition of participation: Governing body.
There must be an effective governing body that is legally responsible for the conduct of the hospital. If a hospital does not have an organized governing body, the persons legally responsible for the conduct of the hospital must carry out the functions specified in this part that pertain to the governing body.
(a) Standard: Medical staff. The governing body must:
(1) Determine, in accordance with State law, which categories of practitioners are eligible candidates for appointment to the medical staff;
(2) Appoint members of the medical staff after considering the recommendations of the existing members of the medical staff;
(3) Assure that the medical staff has bylaws;
(4) Approve medical staff bylaws and other medical staff rules and regulations;
(5) Ensure that the medical staff is accountable to the governing body for the quality of care provided to patients;
(6) Ensure the criteria for selection are individual character, competence, training, experience, and judgment; and
(7) Ensure that under no circumstances is the accordance of staff membership or professional privileges in the hospital dependent solely upon certification, fellowship, or membership in a specialty body or society.
(8) Ensure that, when telemedicine services are furnished to the hospital's patients through an agreement with a distant-site hospital, the agreement is written and that it specifies that it is the responsibility of the governing body of the distant-site hospital to meet the requirements in paragraphs (a)(1) through (a)(7) of this section with regard to the distant-site hospital's physicians and practitioners providing telemedicine services. The governing body of the hospital whose patients are receiving the telemedicine services may, in accordance with § 482.22(a)(3) of this part, grant privileges based on its medical staff recommendations that rely on information provided by the distant-site hospital.
(9) Ensure that when telemedicine services are furnished to the hospital's patients through an agreement with a distant-site telemedicine entity, the written agreement specifies that the distant-site telemedicine entity is a contractor of services to the hospital and as such, in accordance with § 482.12(e), furnishes the contracted services in a manner that permits the hospital to comply with all applicable conditions of participation for the contracted services, including, but not limited to, the requirements in paragraphs (a)(1) through (a)(7) of this section with regard to the distant-site telemedicine entity's physicians and practitioners providing telemedicine services. The governing body of the hospital whose patients are receiving the telemedicine services may, in accordance with § 482.22(a)(4) of this part, grant privileges to physicians and practitioners employed by the distant-site telemedicine entity based on such hospital's medical staff recommendations; such staff recommendations may rely on information provided by the distant-site telemedicine entity.
(10) Consult directly with the individual assigned the responsibility for the organization and conduct of the hospital's medical staff, or his or her designee. At a minimum, this direct consultation must occur periodically throughout the fiscal or calendar year and include discussion of matters related to the quality of medical care provided to patients of the hospital. For a multi-hospital system using a single governing body, the single multi-hospital system governing body must consult directly with the individual responsible for the organized medical staff (or his or her designee) of each hospital within its system in addition to the other requirements of this paragraph (a).
(b) Standard: Chief executive officer. The governing body must appoint a chief executive officer who is responsible for managing the hospital.
(c) Standard: Care of patients. In accordance with hospital policy, the governing body must ensure that the following requirements are met:
(1) Every Medicare patient is under the care of:
(i) A doctor of medicine or osteopathy (This provision is not to be construed to limit the authority of a doctor of medicine or osteopathy to delegate tasks to other qualified health care personnel to the extent recognized under State law or a State's regulatory mechanism.);
(ii) A doctor of dental surgery or dental medicine who is legally authorized to practice dentistry by the State and who is acting within the scope of his or her license;
(iii) A doctor of podiatric medicine, but only with respect to functions which he or she is legally authorized by the State to perform;
(iv) A doctor of optometry who is legally authorized to practice optometry by the State in which he or she practices;
(v) A chiropractor who is licensed by the State or legally authorized to perform the services of a chiropractor, but only with respect to treatment by means of manual manipulation of the spine to correct a subluxation demonstrated by x-ray to exist; and
(vi) A clinical psychologist as defined in § 410.71 of this chapter, but only with respect to clinical psychologist services as defined in § 410.71 of this chapter and only to the extent permitted by State law.
(2) Patients are admitted to the hospital only on the recommendation of a licensed practitioner permitted by the State to admit patients to a hospital. If a Medicare patient is admitted by a practitioner not specified in paragraph (c)(1) of this section, that patient is under the care of a doctor of medicine or osteopathy.
(3) A doctor of medicine or osteopathy is on duty or on call at all times.
(4) A doctor of medicine or osteopathy is responsible for the care of each Medicare patient with respect to any medical or psychiatric problem that—
(i) is present on admission or develops during hospitalization; and
(ii) Is not specifically within the scope of practice of a doctor of dental surgery, dental medicine, podiatric medicine, or optometry; a chiropractor; or clinical psychologist, as that scope is—
(A) Defined by the medical staff;
(B) Permitted by State law; and
(C) Limited, under paragraph (c)(1)(v) of this section, with respect to chiropractors.
(d) Standard: Institutional plan and budget. The institution must have an overall institutional plan that meets the following conditions:
(1) The plan must include an annual operating budget that is prepared according to generally accepted accounting principles.
(2) The budget must include all anticipated income and expenses. This provision does not require that the budget identify item by item the components of each anticipated income or expense.
(3) The plan must provide for capital expenditures for at least a 3-year period, including the year in which the operating budget specified in paragraph (d)(2) of this section is applicable.
(4) The plan must include and identify in detail the objective of, and the anticipated sources of financing for, each anticipated capital expenditure in excess of $600,000 (or a lesser amount that is established, in accordance with section 1122(g)(1) of the Act, by the State in which the hospital is located) that relates to any of the following:
(i) Acquisition of land;
(ii) Improvement of land, buildings, and equipment; or
(iii) The replacement, modernization, and expansion of buildings and equipment.
(5) The plan must be submitted for review to the planning agency designated in accordance with section 1122(b) of the Act, or if an agency is not designated, to the appropriate health planning agency in the State. (See part 100 of this title.) A capital expenditure is not subject to section 1122 review if 75 percent of the health care facility's patients who are expected to use the service for which the capital expenditure is made are individuals enrolled in a health maintenance organization (HMO) or competitive medical plan (CMP) that meets the requirements of section 1876(b) of the Act, and if the Department determines that the capital expenditure is for services and facilities that are needed by the HMO or CMP in order to operate efficiently and economically and that are not otherwise readily accessible to the HMO or CMP because—
(i) The facilities do not provide common services at the same site;
(ii) The facilities are not available under a contract of reasonable duration;
(iii) Full and equal medical staff privileges in the facilities are not available;
(iv) Arrangements with these facilities are not administratively feasible; or
(v) The purchase of these services is more costly than if the HMO or CMP provided the services directly.
(6) The plan must be reviewed and updated annually.
(7) The plan must be prepared—
(i) Under the direction of the governing body; and
(ii) By a committee consisting of representatives of the governing body, the administrative staff, and the medical staff of the institution.
(e) Standard: Contracted services. The governing body must be responsible for services furnished in the hospital whether or not they are furnished under contracts. The governing body must ensure that a contractor of services (including one for shared services and joint ventures) furnishes services that permit the hospital to comply with all applicable conditions of participation and standards for the contracted services.
(1) The governing body must ensure that the services performed under a contract are provided in a safe and effective manner.
(2) The hospital must maintain a list of all contracted services, including the scope and nature of the services provided.
(f) Standard: Emergency services. (1) If emergency services are provided at the hospital, the hospital must comply with the requirements of § 482.55.
(2) If emergency services are not provided at the hospital, the governing body must assure that the medical staff has written policies and procedures for appraisal of emergencies, initial treatment, and referral when appropriate.
(3) If emergency services are provided at the hospital but are not provided at one or more off-campus departments of the hospital, the governing body of the hospital must assure that the medical staff has written policies and procedures in effect with respect to the off-campus department(s) for appraisal of emergencies and referral when appropriate.
[51 FR 22042, June 17, 1986; 51 FR 27847, Aug. 4, 1986, as amended at 53 FR 6549, Mar. 1, 1988; 53 FR 18987, May 26, 1988; 56 FR 8852, Mar. 1, 1991; 56 FR 23022, May 20, 1991; 59 FR 46514, Sept. 8, 1994; 63 FR 20130, Apr. 23, 1998; 63 FR 33874, June 22, 1998; 68 FR 53262, Sept. 9, 2003; 76 FR 25562, May 5, 2011; 77 FR 29074, May 16, 2012; 79 FR 27154, May 12, 2014]
§ 482.13
Condition of participation: Patient's rights.
A hospital must protect and promote each patient's rights.
(a) Standard: Notice of rights—(1) A hospital must inform each patient, or when appropriate, the patient's representative (as allowed under State law), of the patient's rights, in advance of furnishing or discontinuing patient care whenever possible.
(2) The hospital must establish a process for prompt resolution of patient grievances and must inform each patient whom to contact to file a grievance. The hospital's governing body must approve and be responsible for the effective operation of the grievance process and must review and resolve grievances, unless it delegates the responsibility in writing to a grievance committee. The grievance process must include a mechanism for timely referral of patient concerns regarding quality of care or premature discharge to the appropriate Utilization and Quality Control Quality Improvement Organization. At a minimum:
(i) The hospital must establish a clearly explained procedure for the submission of a patient's written or verbal grievance to the hospital.
(ii) The grievance process must specify time frames for review of the grievance and the provision of a response.
(iii) In its resolution of the grievance, the hospital must provide the patient with written notice of its decision that contains the name of the hospital contact person, the steps taken on behalf of the patient to investigate the grievance, the results of the grievance process, and the date of completion.
(b) Standard: Exercise of rights. (1) The patient has the right to participate in the development and implementation of his or her plan of care.
(2) The patient or his or her representative (as allowed under State law) has the right to make informed decisions regarding his or her care. The patient's rights include being informed of his or her health status, being involved in care planning and treatment, and being able to request or refuse treatment. This right must not be construed as a mechanism to demand the provision of treatment or services deemed medically unnecessary or inappropriate.
(3) The patient has the right to formulate advance directives and to have hospital staff and practitioners who provide care in the hospital comply with these directives, in accordance with § 489.100 of this part (Definition), § 489.102 of this part (Requirements for providers), and § 489.104 of this part (Effective dates).
(4) The patient has the right to have a family member or representative of his or her choice and his or her own physician notified promptly of his or her admission to the hospital.
(c) Standard: Privacy and safety. (1) The patient has the right to personal privacy.
(2) The patient has the right to receive care in a safe setting.
(3) The patient has the right to be free from all forms of abuse or harassment.
(d) Standard: Confidentiality of patient records. (1) The patient has the right to the confidentiality of his or her clinical records.
(2) The patient has the right to access information contained in his or her clinical records within a reasonable time frame. The hospital must not frustrate the legitimate efforts of individuals to gain access to their own medical records and must actively seek to meet these requests as quickly as its record keeping system permits.
(e) Standard: Restraint or seclusion. All patients have the right to be free from physical or mental abuse, and corporal punishment. All patients have the right to be free from restraint or seclusion, of any form, imposed as a means of coercion, discipline, convenience, or retaliation by staff. Restraint or seclusion may only be imposed to ensure the immediate physical safety of the patient, a staff member, or others and must be discontinued at the earliest possible time.
(1) Definitions. (i) A restraint is—
(A) Any manual method, physical or mechanical device, material, or equipment that immobilizes or reduces the ability of a patient to move his or her arms, legs, body, or head freely; or
(B) A drug or medication when it is used as a restriction to manage the patient's behavior or restrict the patient's freedom of movement and is not a standard treatment or dosage for the patient's condition.
(C) A restraint does not include devices, such as orthopedically prescribed devices, surgical dressings or bandages, protective helmets, or other methods that involve the physical holding of a patient for the purpose of conducting routine physical examinations or tests, or to protect the patient from falling out of bed, or to permit the patient to participate in activities without the risk of physical harm (this does not include a physical escort).
(ii) Seclusion is the involuntary confinement of a patient alone in a room or area from which the patient is physically prevented from leaving. Seclusion may only be used for the management of violent or self-destructive behavior.
(2) Restraint or seclusion may only be used when less restrictive interventions have been determined to be ineffective to protect the patient a staff member or others from harm.
(3) The type or technique of restraint or seclusion used must be the least restrictive intervention that will be effective to protect the patient, a staff member, or others from harm.
(4) The use of restraint or seclusion must be—
(i) In accordance with a written modification to the patient's plan of care; and
(ii) Implemented in accordance with safe and appropriate restraint and seclusion techniques as determined by hospital policy in accordance with State law.
(5) The use of restraint or seclusion must be in accordance with the order of a physician or other licensed independent practitioner who is responsible for the care of the patient as specified under § 482.12(c) and authorized to order restraint or seclusion by hospital policy in accordance with State law.
(6) Orders for the use of restraint or seclusion must never be written as a standing order or on an as needed basis (PRN).
(7) The attending physician must be consulted as soon as possible if the attending physician did not order the restraint or seclusion.
(8) Unless superseded by State law that is more restrictive—
(i) Each order for restraint or seclusion used for the management of violent or self-destructive behavior that jeopardizes the immediate physical safety of the patient, a staff member, or others may only be renewed in accordance with the following limits for up to a total of 24 hours:
(A) 4 hours for adults 18 years of age or older;
(B) 2 hours for children and adolescents 9 to 17 years of age; or
(C) 1 hour for children under 9 years of age; and
(ii) After 24 hours, before writing a new order for the use of restraint or seclusion for the management of violent or self-destructive behavior, a physician or other licensed independent practitioner who is responsible for the care of the patient as specified under § 482.12(c) of this part and authorized to order restraint or seclusion by hospital policy in accordance with State law must see and assess the patient.
(iii) Each order for restraint used to ensure the physical safety of the non-violent or non-self-destructive patient may be renewed as authorized by hospital policy.
(9) Restraint or seclusion must be discontinued at the earliest possible time, regardless of the length of time identified in the order.
(10) The condition of the patient who is restrained or secluded must be monitored by a physician, other licensed independent practitioner or trained staff that have completed the training criteria specified in paragraph (f) of this section at an interval determined by hospital policy.
(11) Physician and other licensed independent practitioner training requirements must be specified in hospital policy. At a minimum, physicians and other licensed independent practitioners authorized to order restraint or seclusion by hospital policy in accordance with State law must have a working knowledge of hospital policy regarding the use of restraint or seclusion.
(12) When restraint or seclusion is used for the management of violent or self-destructive behavior that jeopardizes the immediate physical safety of the patient, a staff member, or others, the patient must be seen face-to-face within 1 hour after the initiation of the intervention—
(i) By a—
(A) Physician or other licensed independent practitioner; or
(B) Registered nurse or physician assistant who has been trained in accordance with the requirements specified in paragraph (f) of this section.
(ii) To evaluate—
(A) The patient's immediate situation;
(B) The patient's reaction to the intervention;
(C) The patient's medical and behavioral condition; and
(D) The need to continue or terminate the restraint or seclusion.
(13) States are free to have requirements by statute or regulation that are more restrictive than those contained in paragraph (e)(12)(i) of this section.
(14) If the face-to-face evaluation specified in paragraph (e)(12) of this section is conducted by a trained registered nurse or physician assistant, the trained registered nurse or physician assistant must consult the attending physician or other licensed independent practitioner who is responsible for the care of the patient as specified under § 482.12(c) as soon as possible after the completion of the 1-hour face-to-face evaluation.
(15) All requirements specified under this paragraph are applicable to the simultaneous use of restraint and seclusion. Simultaneous restraint and seclusion use is only permitted if the patient is continually monitored—
(i) Face-to-face by an assigned, trained staff member; or
(ii) By trained staff using both video and audio equipment. This monitoring must be in close proximity to the patient.
(16) When restraint or seclusion is used, there must be documentation in the patient's medical record of the following:
(i) The 1-hour face-to-face medical and behavioral evaluation if restraint or seclusion is used to manage violent or self-destructive behavior;
(ii) A description of the patient's behavior and the intervention used;
(iii) Alternatives or other less restrictive interventions attempted (as applicable);
(iv) The patient's condition or symptom(s) that warranted the use of the restraint or seclusion; and
(v) The patient's response to the intervention(s) used, including the rationale for continued use of the intervention.
(f) Standard: Restraint or seclusion: Staff training requirements. The patient has the right to safe implementation of restraint or seclusion by trained staff.
(1) Training intervals. Staff must be trained and able to demonstrate competency in the application of restraints, implementation of seclusion, monitoring, assessment, and providing care for a patient in restraint or seclusion—
(i) Before performing any of the actions specified in this paragraph;
(ii) As part of orientation; and
(iii) Subsequently on a periodic basis consistent with hospital policy.
(2) Training content. The hospital must require appropriate staff to have education, training, and demonstrated knowledge based on the specific needs of the patient population in at least the following:
(i) Techniques to identify staff and patient behaviors, events, and environmental factors that may trigger circumstances that require the use of a restraint or seclusion.
(ii) The use of nonphysical intervention skills.
(iii) Choosing the least restrictive intervention based on an individualized assessment of the patient's medical, or behavioral status or condition.
(iv) The safe application and use of all types of restraint or seclusion used in the hospital, including training in how to recognize and respond to signs of physical and psychological distress (for example, positional asphyxia);
(v) Clinical identification of specific behavioral changes that indicate that restraint or seclusion is no longer necessary.
(vi) Monitoring the physical and psychological well-being of the patient who is restrained or secluded, including but not limited to, respiratory and circulatory status, skin integrity, vital signs, and any special requirements specified by hospital policy associated with the 1-hour face-to-face evaluation.
(vii) The use of first aid techniques and certification in the use of cardiopulmonary resuscitation, including required periodic recertification.
(3) Trainer requirements. Individuals providing staff training must be qualified as evidenced by education, training, and experience in techniques used to address patients' behaviors.
(4) Training documentation. The hospital must document in the staff personnel records that the training and demonstration of competency were successfully completed.
(g) Standard: Death reporting requirements: Hospitals must report deaths associated with the use of seclusion or restraint.
(1) With the exception of deaths described under paragraph (g)(2) of this section, the hospital must report the following information to CMS by telephone, facsimile, or electronically, as determined by CMS, no later than the close of business on the next business day following knowledge of the patient's death:
(i) Each death that occurs while a patient is in restraint or seclusion.
(ii) Each death that occurs within 24 hours after the patient has been removed from restraint or seclusion.
(iii) Each death known to the hospital that occurs within 1 week after restraint or seclusion where it is reasonable to assume that use of restraint or placement in seclusion contributed directly or indirectly to a patient's death, regardless of the type(s) of restraint used on the patient during this time. “Reasonable to assume” in this context includes, but is not limited to, deaths related to restrictions of movement for prolonged periods of time, or death related to chest compression, restriction of breathing, or asphyxiation.
(2) When no seclusion has been used and when the only restraints used on the patient are those applied exclusively to the patient's wrist(s), and which are composed solely of soft, non-rigid, cloth-like materials, the hospital staff must record in an internal log or other system, the following information:
(i) Any death that occurs while a patient is in such restraints.
(ii) Any death that occurs within 24 hours after a patient has been removed from such restraints.
(3) The staff must document in the patient's medical record the date and time the death was:
(i) Reported to CMS for deaths described in paragraph (g)(1) of this section; or
(ii) Recorded in the internal log or other system for deaths described in paragraph (g)(2) of this section.
(4) For deaths described in paragraph (g)(2) of this section, entries into the internal log or other system must be documented as follows:
(i) Each entry must be made not later than seven days after the date of death of the patient.
(ii) Each entry must document the patient's name, date of birth, date of death, name of attending physician or other licensed independent practitioner who is responsible for the care of the patient as specified under § 482.12(c), medical record number, and primary diagnosis(es).
(iii) The information must be made available in either written or electronic form to CMS immediately upon request.
(h) Standard: Patient visitation rights. A hospital must have written policies and procedures regarding the visitation rights of patients, including those setting forth any clinically necessary or reasonable restriction or limitation that the hospital may need to place on such rights and the reasons for the clinical restriction or limitation. A hospital must meet the following requirements:
(1) Inform each patient (or support person, where appropriate) of his or her visitation rights, including any clinical restriction or limitation on such rights, when he or she is informed of his or her other rights under this section.
(2) Inform each patient (or support person, where appropriate) of the right, subject to his or her consent, to receive the visitors whom he or she designates, including, but not limited to, a spouse, a domestic partner (including a same-sex domestic partner), another family member, or a friend, and his or her right to withdraw or deny such consent at any time.
(3) Not restrict, limit, or otherwise deny visitation privileges on the basis of race, color, national origin, religion, sex, gender identity, sexual orientation, or disability.
(4) Ensure that all visitors enjoy full and equal visitation privileges consistent with patient preferences.
[71 FR 71426, Dec. 8, 2006, as amended at 75 FR 70844, Nov. 19, 2010; 77 FR 29074, May 16, 2012]
§ 482.15
Condition of participation: Emergency preparedness.
The hospital must comply with all applicable Federal, State, and local emergency preparedness requirements. The hospital must develop and maintain a comprehensive emergency preparedness program that meets the requirements of this section, utilizing an all-hazards approach. The emergency preparedness program must include, but not be limited to, the following elements:
(a) Emergency plan. The hospital must develop and maintain an emergency preparedness plan that must be reviewed, and updated at least annually. The plan must do the following:
(1) Be based on and include a documented, facility-based and community-based risk assessment, utilizing an all-hazards approach.
(2) Include strategies for addressing emergency events identified by the risk assessment.
(3) Address patient population, including, but not limited to, persons at-risk; the type of services the hospital has the ability to provide in an emergency; and continuity of operations, including delegations of authority and succession plans.
(4) Include a process for cooperation and collaboration with local, tribal, regional, State, and Federal emergency preparedness officials' efforts to maintain an integrated response during a disaster or emergency situation, including documentation of the hospital's efforts to contact such officials and, when applicable, its participation in collaborative and cooperative planning efforts.
(b) Policies and procedures. The hospital must develop and implement emergency preparedness policies and procedures, based on the emergency plan set forth in paragraph (a) of this section, risk assessment at paragraph (a)(1) of this section, and the communication plan at paragraph (c) of this section. The policies and procedures must be reviewed and updated at least annually. At a minimum, the policies and procedures must address the following:
(1) The provision of subsistence needs for staff and patients, whether they evacuate or shelter in place, include, but are not limited to the following:
(i) Food, water, medical, and pharmaceutical supplies.
(ii) Alternate sources of energy to maintain the following:
(A) Temperatures to protect patient health and safety and for the safe and sanitary storage of provisions.
(B) Emergency lighting.
(C) Fire detection, extinguishing, and alarm systems.
(D) Sewage and waste disposal.
(2) A system to track the location of on-duty staff and sheltered patients in the hospital's care during an emergency. If on-duty staff and sheltered patients are relocated during the emergency, the hospital must document the specific name and location of the receiving facility or other location.
(3) Safe evacuation from the hospital, which includes consideration of care and treatment needs of evacuees; staff responsibilities; transportation; identification of evacuation location(s); and primary and alternate means of communication with external sources of assistance.
(4) A means to shelter in place for patients, staff, and volunteers who remain in the facility.
(5) A system of medical documentation that preserves patient information, protects confidentiality of patient information, and secures and maintains the availability of records.
(6) The use of volunteers in an emergency and other emergency staffing strategies, including the process and role for integration of State and Federally designated health care professionals to address surge needs during an emergency.
(7) The development of arrangements with other hospitals and other providers to receive patients in the event of limitations or cessation of operations to maintain the continuity of services to hospital patients.
(8) The role of the hospital under a waiver declared by the Secretary, in accordance with section 1135 of the Act, in the provision of care and treatment at an alternate care site identified by emergency management officials.
(c) Communication plan. The hospital must develop and maintain an emergency preparedness communication plan that complies with Federal, State, and local laws and must be reviewed and updated at least annually. The communication plan must include all of the following:
(1) Names and contact information for the following:
(i) Staff.
(ii) Entities providing services under arrangement.
(iii) Patients' physicians.
(iv) Other hospitals and CAHs
(v) Volunteers.
(2) Contact information for the following:
(i) Federal, State, tribal, regional, and local emergency preparedness staff.
(ii) Other sources of assistance.
(3) Primary and alternate means for communicating with the following:
(i) Hospital's staff.
(ii) Federal, State, tribal, regional, and local emergency management agencies.
(4) A method for sharing information and medical documentation for patients under the hospital's care, as necessary, with other health care providers to maintain the continuity of care.
(5) A means, in the event of an evacuation, to release patient information as permitted under 45 CFR 164.510(b)(1)(ii).
(6) A means of providing information about the general condition and location of patients under the facility's care as permitted under 45 CFR 164.510(b)(4).
(7) A means of providing information about the hospital's occupancy, needs, and its ability to provide assistance, to the authority having jurisdiction, the Incident Command Center, or designee.
(d) Training and testing. The hospital must develop and maintain an emergency preparedness training and testing program that is based on the emergency plan set forth in paragraph (a) of this section, risk assessment at paragraph (a)(1) of this section, policies and procedures at paragraph (b) of this section, and the communication plan at paragraph (c) of this section. The training and testing program must be reviewed and updated at least annually.
(1) Training program. The hospital must do all of the following:
(i) Initial training in emergency preparedness policies and procedures to all new and existing staff, individuals providing services under arrangement, and volunteers, consistent with their expected role.
(ii) Provide emergency preparedness training at least annually.
(iii) Maintain documentation of the training.
(iv) Demonstrate staff knowledge of emergency procedures.
(2) Testing. The hospital must conduct exercises to test the emergency plan at least annually. The hospital must do all of the following:
(i) Participate in a full-scale exercise that is community-based or when a community-based exercise is not accessible, an individual, facility-based. If the hospital experiences an actual natural or man-made emergency that requires activation of the emergency plan, the hospital is exempt from engaging in a community-based or individual, facility-based full-scale exercise for 1 year following the onset of the actual event.
(ii) Conduct an additional exercise that may include, but is not limited to the following:
(A) A second full-scale exercise that is community-based or individual, facility-based.
(B) A tabletop exercise that includes a group discussion led by a facilitator, using a narrated, clinically-relevant emergency scenario, and a set of problem statements, directed messages, or prepared questions designed to challenge an emergency plan.
(iii) Analyze the hospital's response to and maintain documentation of all drills, tabletop exercises, and emergency events, and revise the hospital's emergency plan, as needed.
(e) Emergency and standby power systems. The hospital must implement emergency and standby power systems based on the emergency plan set forth in paragraph (a) of this section and in the policies and procedures plan set forth in paragraphs (b)(1)(i) and (ii) of this section.
(1) Emergency generator location. The generator must be located in accordance with the location requirements found in the Health Care Facilities Code (NFPA 99 and Tentative Interim Amendments TIA 12-2, TIA 12-3, TIA 12-4, TIA 12-5, and TIA 12-6), Life Safety Code (NFPA 101 and Tentative Interim Amendments TIA 12-1, TIA 12-2, TIA 12-3, and TIA 12-4), and NFPA 110, when a new structure is built or when an existing structure or building is renovated.
(2) Emergency generator inspection and testing. The hospital must implement the emergency power system inspection, testing, and maintenance requirements found in the Health Care Facilities Code, NFPA 110, and Life Safety Code.
(3) Emergency generator fuel. Hospitals that maintain an onsite fuel source to power emergency generators must have a plan for how it will keep emergency power systems operational during the emergency, unless it evacuates.
(f) Integrated healthcare systems. If a hospital is part of a healthcare system consisting of multiple separately certified healthcare facilities that elects to have a unified and integrated emergency preparedness program, the hospital may choose to participate in the healthcare system's coordinated emergency preparedness program. If elected, the unified and integrated emergency preparedness program must—
(1) Demonstrate that each separately certified facility within the system actively participated in the development of the unified and integrated emergency preparedness program.
(2) Be developed and maintained in a manner that takes into account each separately certified facility's unique circumstances, patient populations, and services offered.
(3) Demonstrate that each separately certified facility is capable of actively using the unified and integrated emergency preparedness program and is in compliance with the program.
(4) Include a unified and integrated emergency plan that meets the requirements of paragraphs (a)(2), (3), and (4) of this section. The unified and integrated emergency plan must also be based on and include the following:
(i) A documented community-based risk assessment, utilizing an all-hazards approach.
(ii) A documented individual facility-based risk assessment for each separately certified facility within the health system, utilizing an all-hazards approach.
(5) Include integrated policies and procedures that meet the requirements set forth in paragraph (b) of this section, a coordinated communication plan and training and testing programs that meet the requirements of paragraphs (c) and (d) of this section, respectively.
(g) Transplant hospitals. If a hospital has one or more transplant centers (as defined in § 482.70)—
(1) A representative from each transplant center must be included in the development and maintenance of the hospital's emergency preparedness program; and
(2) The hospital must develop and maintain mutually agreed upon protocols that address the duties and responsibilities of the hospital, each transplant center, and the OPO for the DSA where the hospital is situated, unless the hospital has been granted a waiver to work with another OPO, during an emergency.
(h) The standards incorporated by reference in this section are approved for incorporation by reference by the Director of the Office of the Federal Register in accordance with 5 U.S.C. 552(a) and 1 CFR part 51. You may obtain the material from the sources listed below. You may inspect a copy at the CMS Information Resource Center, 7500 Security Boulevard, Baltimore, MD or at the National Archives and Records Administration (NARA). For information on the availability of this material at NARA, call 202-741-6030, or go to: http://www.archives.gov/federal_register/code_of_federal_regulations/ibr_locations.html. If any changes in this edition of the Code are incorporated by reference, CMS will publish a document in the Federal Register to announce the changes.
(1) National Fire Protection Association, 1 Batterymarch Park, Quincy, MA 02169, www.nfpa.org, 1.617.770.3000.
(i) NFPA 99, Health Care Facilities Code, 2012 edition, issued August 11, 2011.
(ii) Technical interim amendment (TIA) 12-2 to NFPA 99, issued August 11, 2011.
(iii) TIA 12-3 to NFPA 99, issued August 9, 2012.
(iv) TIA 12-4 to NFPA 99, issued March 7, 2013.
(v) TIA 12-5 to NFPA 99, issued August 1, 2013.
(vi) TIA 12-6 to NFPA 99, issued March 3, 2014.
(vii) NFPA 101, Life Safety Code, 2012 edition, issued August 11, 2011.
(viii) TIA 12-1 to NFPA 101, issued August 11, 2011.
(ix) TIA 12-2 to NFPA 101, issued October 30, 2012.
(x) TIA 12-3 to NFPA 101, issued October 22, 2013.
(xi) TIA 12-4 to NFPA 101, issued October 22, 2013.
(xii) NFPA 110, Standard for Emergency and Standby Power Systems, 2010 edition, including TIAs to chapter 7, issued August 6, 2009.
(2) [Reserved]
[81 FR 64028, Sept. 16, 2016; 81 FR 80594, Nov. 16, 2016]

Subpart C—Basic Hospital Functions
§ 482.21
Condition of participation: Quality assessment and performance improvement program.
The hospital must develop, implement, and maintain an effective, ongoing, hospital-wide, data-driven quality assessment and performance improvement program. The hospital's governing body must ensure that the program reflects the complexity of the hospital's organization and services; involves all hospital departments and services (including those services furnished under contract or arrangement); and focuses on indicators related to improved health outcomes and the prevention and reduction of medical errors. The hospital must maintain and demonstrate evidence of its QAPI program for review by CMS.
(a) Standard: Program scope. (1) The program must include, but not be limited to, an ongoing program that shows measurable improvement in indicators for which there is evidence that it will improve health outcomes and identify and reduce medical errors.
(2) The hospital must measure, analyze, and track quality indicators, including adverse patient events, and other aspects of performance that assess processes of care, hospital service and operations.
(b) Standard: Program data. (1) The program must incorporate quality indicator data including patient care data, and other relevant data, for example, information submitted to, or received from, the hospital's Quality Improvement Organization.
(2) The hospital must use the data collected to—
(i) Monitor the effectiveness and safety of services and quality of care; and
(ii) Identify opportunities for improvement and changes that will lead to improvement.
(3) The frequency and detail of data collection must be specified by the hospital's governing body.
(c) Standard: Program activities. (1) The hospital must set priorities for its performance improvement activities that—
(i) Focus on high-risk, high-volume, or problem-prone areas;
(ii) Consider the incidence, prevalence, and severity of problems in those areas; and
(iii) Affect health outcomes, patient safety, and quality of care.
(2) Performance improvement activities must track medical errors and adverse patient events, analyze their causes, and implement preventive actions and mechanisms that include feedback and learning throughout the hospital.
(3) The hospital must take actions aimed at performance improvement and, after implementing those actions, the hospital must measure its success, and track performance to ensure that improvements are sustained.
(d) Standard: Performance improvement projects. As part of its quality assessment and performance improvement program, the hospital must conduct performance improvement projects.
(1) The number and scope of distinct improvement projects conducted annually must be proportional to the scope and complexity of the hospital's services and operations.
(2) A hospital may, as one of its projects, develop and implement an information technology system explicitly designed to improve patient safety and quality of care. This project, in its initial stage of development, does not need to demonstrate measurable improvement in indicators related to health outcomes.
(3) The hospital must document what quality improvement projects are being conducted, the reasons for conducting these projects, and the measurable progress achieved on these projects.
(4) A hospital is not required to participate in a QIO cooperative project, but its own projects are required to be of comparable effort.
(e) Standard: Executive responsibilities. The hospital's governing body (or organized group or individual who assumes full legal authority and responsibility for operations of the hospital), medical staff, and administrative officials are responsible and accountable for ensuring the following:
(1) That an ongoing program for quality improvement and patient safety, including the reduction of medical errors, is defined, implemented, and maintained.
(2) That the hospital-wide quality assessment and performance improvement efforts address priorities for improved quality of care and patient safety; and that all improvement actions are evaluated.
(3) That clear expectations for safety are established.
(4) That adequate resources are allocated for measuring, assessing, improving, and sustaining the hospital's performance and reducing risk to patients.
(5) That the determination of the number of distinct improvement projects is conducted annually.
[68 FR 3454, Jan. 24, 2003]
§ 482.22
Condition of participation: Medical staff.
The hospital must have an organized medical staff that operates under bylaws approved by the governing body, and which is responsible for the quality of medical care provided to patients by the hospital.
(a) Standard: Eligibility and process for appointment to medical staff. The medical staff must be composed of doctors of medicine or osteopathy. In accordance with State law, including scope-of-practice laws, the medical staff may also include other categories of physicians (as listed at § 482.12(c)(1)) and non-physician practitioners who are determined to be eligible for appointment by the governing body.
(1) The medical staff must periodically conduct appraisals of its members.
(2) The medical staff must examine the credentials of all eligible candidates for medical staff membership and make recommendations to the governing body on the appointment of these candidates in accordance with State law, including scope-of-practice laws, and the medical staff bylaws, rules, and regulations. A candidate who has been recommended by the medical staff and who has been appointed by the governing body is subject to all medical staff bylaws, rules, and regulations, in addition to the requirements contained in this section.
(3) When telemedicine services are furnished to the hospital's patients through an agreement with a distant-site hospital, the governing body of the hospital whose patients are receiving the telemedicine services may choose, in lieu of the requirements in paragraphs (a)(1) and (a)(2) of this section, to have its medical staff rely upon the credentialing and privileging decisions made by the distant-site hospital when making recommendations on privileges for the individual distant-site physicians and practitioners providing such services, if the hospital's governing body ensures, through its written agreement with the distant-site hospital, that all of the following provisions are met:
(i) The distant-site hospital providing the telemedicine services is a Medicare-participating hospital.
(ii) The individual distant-site physician or practitioner is privileged at the distant-site hospital providing the telemedicine services, which provides a current list of the distant-site physician's or practitioner's privileges at the distant-site hospital.
(iii) The individual distant-site physician or practitioner holds a license issued or recognized by the State in which the hospital whose patients are receiving the telemedicine services is located.
(iv) With respect to a distant-site physician or practitioner, who holds current privileges at the hospital whose patients are receiving the telemedicine services, the hospital has evidence of an internal review of the distant-site physician's or practitioner's performance of these privileges and sends the distant-site hospital such performance information for use in the periodic appraisal of the distant-site physician or practitioner. At a minimum, this information must include all adverse events that result from the telemedicine services provided by the distant-site physician or practitioner to the hospital's patients and all complaints the hospital has received about the distant-site physician or practitioner.
(4) When telemedicine services are furnished to the hospital's patients through an agreement with a distant-site telemedicine entity, the governing body of the hospital whose patients are receiving the telemedicine services may choose, in lieu of the requirements in paragraphs (a)(1) and (a)(2) of this section, to have its medical staff rely upon the credentialing and privileging decisions made by the distant-site telemedicine entity when making recommendations on privileges for the individual distant-site physicians and practitioners providing such services, if the hospital's governing body ensures, through its written agreement with the distant-site telemedicine entity, that the distant-site telemedicine entity furnishes services that, in accordance with § 482.12(e), permit the hospital to comply with all applicable conditions of participation for the contracted services. The hospital's governing body must also ensure, through its written agreement with the distant-site telemedicine entity, that all of the following provisions are met:
(i) The distant-site telemedicine entity's medical staff credentialing and privileging process and standards at least meet the standards at § 482.12(a)(1) through (a)(7) and § 482.22(a)(1) through (a)(2).
(ii) The individual distant-site physician or practitioner is privileged at the distant-site telemedicine entity providing the telemedicine services, which provides the hospital with a current list of the distant-site physician's or practitioner's privileges at the distant-site telemedicine entity.
(iii) The individual distant-site physician or practitioner holds a license issued or recognized by the State in which the hospital whose patients are receiving such telemedicine services is located.
(iv) With respect to a distant-site physician or practitioner, who holds current privileges at the hospital whose patients are receiving the telemedicine services, the hospital has evidence of an internal review of the distant-site physician's or practitioner's performance of these privileges and sends the distant-site telemedicine entity such performance information for use in the periodic appraisal of the distant-site physician or practitioner. At a minimum, this information must include all adverse events that result from the telemedicine services provided by the distant-site physician or practitioner to the hospital's patients, and all complaints the hospital has received about the distant-site physician or practitioner.
(b) Standard: Medical staff organization and accountability. The medical staff must be well organized and accountable to the governing body for the quality of the medical care provided to patients.
(1) The medical staff must be organized in a manner approved by the governing body.
(2) If the medical staff has an executive committee, a majority of the members of the committee must be doctors of medicine or osteopathy.
(3) The responsibility for organization and conduct of the medical staff must be assigned only to one of the following:
(i) An individual doctor of medicine or osteopathy.
(ii) A doctor of dental surgery or dental medicine, when permitted by State law of the State in which the hospital is located.
(iii) A doctor of podiatric medicine, when permitted by State law of the State in which the hospital is located.
(4) If a hospital is part of a hospital system consisting of multiple separately certified hospitals and the system elects to have a unified and integrated medical staff for its member hospitals, after determining that such a decision is in accordance with all applicable State and local laws, each separately certified hospital must demonstrate that:
(i) The medical staff members of each separately certified hospital in the system (that is, all medical staff members who hold specific privileges to practice at that hospital) have voted by majority, in accordance with medical staff bylaws, either to accept a unified and integrated medical staff structure or to opt out of such a structure and to maintain a separate and distinct medical staff for their respective hospital;
(ii) The unified and integrated medical staff has bylaws, rules, and requirements that describe its processes for self-governance, appointment, credentialing, privileging, and oversight, as well as its peer review policies and due process rights guarantees, and which include a process for the members of the medical staff of each separately certified hospital (that is, all medical staff members who hold specific privileges to practice at that hospital) to be advised of their rights to opt out of the unified and integrated medical staff structure after a majority vote by the members to maintain a separate and distinct medical staff for their hospital;
(iii) The unified and integrated medical staff is established in a manner that takes into account each member hospital's unique circumstances and any significant differences in patient populations and services offered in each hospital; and
(iv) The unified and integrated medical staff establishes and implements policies and procedures to ensure that the needs and concerns expressed by members of the medical staff, at each of its separately certified hospitals, regardless of practice or location, are given due consideration, and that the unified and integrated medical staff has mechanisms in place to ensure that issues localized to particular hospitals are duly considered and addressed.
(c) Standard: Medical staff bylaws. The medical staff must adopt and enforce bylaws to carry out its responsibilities. The bylaws must:
(1) Be approved by the governing body.
(2) Include a statement of the duties and privileges of each category of medical staff (e.g., active, courtesy, etc.)
(3) Describe the organization of the medical staff.
(4) Describe the qualifications to be met by a candidate in order for the medical staff to recommend that the candidate be appointed by the governing body.
(5) Include a requirement that—
(i) A medical history and physical examination be completed and documented for each patient no more than 30 days before or 24 hours after admission or registration, but prior to surgery or a procedure requiring anesthesia services. The medical history and physical examination must be completed and documented by a physician (as defined in section 1861(r) of the Act), an oromaxillofacial surgeon, or other qualified licensed individual in accordance with State law and hospital policy.
(ii) An updated examination of the patient, including any changes in the patient's condition, be completed and documented within 24 hours after admission or registration, but prior to surgery or a procedure requiring anesthesia services, when the medical history and physical examination are completed within 30 days before admission or registration. The updated examination of the patient, including any changes in the patient's condition, must be completed and documented by a physician (as defined in section 1861(r) of the Act), an oromaxillofacial surgeon, or other qualified licensed individual in accordance with State law and hospital policy.
(6) Include criteria for determining the privileges to be granted to individual practitioners and a procedure for applying the criteria to individuals requesting privileges. For distant-site physicians and practitioners requesting privileges to furnish telemedicine services under an agreement with the hospital, the criteria for determining privileges and the procedure for applying the criteria are also subject to the requirements in § 482.12(a)(8) and (a)(9), and § 482.22(a)(3) and (a)(4).
(d) Standard: Autopsies. The medical staff should attempt to secure autopsies in all cases of unusual deaths and of medical-legal and educational interest. The mechanism for documenting permission to perform an autopsy must be defined. There must be a system for notifying the medical staff, and specifically the attending practitioner, when an autopsy is being performed.
[51 FR 22042, June 17, 1986, as amended at 59 FR 64152, Dec. 13, 1994; 71 FR 68694, Nov. 27, 2006; 72 FR 66933, Nov. 27, 2007; 76 FR 25563, May 5, 2011; 77 FR 29074, May 16, 2012; 79 FR 27154, May 12, 2014]
§ 482.23
Condition of participation: Nursing services.
The hospital must have an organized nursing service that provides 24-hour nursing services. The nursing services must be furnished or supervised by a registered nurse.
(a) Standard: Organization. The hospital must have a well-organized service with a plan of administrative authority and delineation of responsibilities for patient care. The director of the nursing service must be a licensed registered nurse. He or she is responsible for the operation of the service, including determining the types and numbers of nursing personnel and staff necessary to provide nursing care for all areas of the hospital.
(b) Standard: Staffing and delivery of care. The nursing service must have adequate numbers of licensed registered nurses, licensed practical (vocational) nurses, and other personnel to provide nursing care to all patients as needed. There must be supervisory and staff personnel for each department or nursing unit to ensure, when needed, the immediate availability of a registered nurse for bedside care of any patient.
(1) The hospital must provide 24-hour nursing services furnished or supervised by a registered nurse, and have a licensed practical nurse or registered nurse on duty at all times, except for rural hospitals that have in effect a 24-hour nursing waiver granted under § 488.54(c) of this chapter.
(2) The nursing service must have a procedure to ensure that hospital nursing personnel for whom licensure is required have valid and current licensure.
(3) A registered nurse must supervise and evaluate the nursing care for each patient.
(4) The hospital must ensure that the nursing staff develops, and keeps current, a nursing care plan for each patient. The nursing care plan may be part of an interdisciplinary care plan.
(5) A registered nurse must assign the nursing care of each patient to other nursing personnel in accordance with the patient's needs and the specialized qualifications and competence of the nursing staff available.
(6) Non-employee licensed nurses who are working in the hospital must adhere to the policies and procedures of the hospital. The director of nursing service must provide for the adequate supervision and evaluation of the clinical activities of non-employee nursing personnel which occur within the responsibility of the nursing service.
(c) Standard: Preparation and administration of drugs. (1) Drugs and biologicals must be prepared and administered in accordance with Federal and State laws, the orders of the practitioner or practitioners responsible for the patient's care as specified under § 482.12(c), and accepted standards of practice.
(i) Drugs and biologicals may be prepared and administered on the orders of other practitioners not specified under § 482.12(c) only if such practitioners are acting in accordance with State law, including scope-of-practice laws, hospital policies, and medical staff bylaws, rules, and regulations.
(ii) Drugs and biologicals may be prepared and administered on the orders contained within pre-printed and electronic standing orders, order sets, and protocols for patient orders only if such orders meet the requirements of § 482.24(c)(3).
(2) All drugs and biologicals must be administered by, or under supervision of, nursing or other personnel in accordance with Federal and State laws and regulations, including applicable licensing requirements, and in accordance with the approved medical staff policies and procedures.
(3) With the exception of influenza and pneumococcal vaccines, which may be administered per physician-approved hospital policy after an assessment of contraindications, orders for drugs and biologicals must be documented and signed by a practitioner who is authorized to write orders in accordance with State law and hospital policy, and who is responsible for the care of the patient as specified under § 482.12(c).
(i) If verbal orders are used, they are to be used infrequently.
(ii) When verbal orders are used, they must only be accepted by persons who are authorized to do so by hospital policy and procedures consistent with Federal and State law.
(iii) Orders for drugs and biologicals may be documented and signed by other practitioners not specified under § 482.12(c) only if such practitioners are acting in accordance with State law, including scope-of-practice laws, hospital policies, and medical staff bylaws, rules, and regulations.
(4) Blood transfusions and intravenous medications must be administered in accordance with State law and approved medical staff policies and procedures.
(5) There must be a hospital procedure for reporting transfusion reactions, adverse drug reactions, and errors in administration of drugs.
(6) The hospital may allow a patient (or his or her caregiver/support person where appropriate) to self-administer both hospital-issued medications and the patient's own medications brought into the hospital, as defined and specified in the hospital's policies and procedures.
(i) If the hospital allows a patient to self-administer specific hospital-issued medications, then the hospital must have policies and procedures in place to:
(A) Ensure that a practitioner responsible for the care of the patient has issued an order, consistent with hospital policy, permitting self-administration.
(B) Assess the capacity of the patient (or the patient's caregiver/support person where appropriate) to self-administer the specified medication(s).
(C) Instruct the patient (or the patient's caregiver/support person where appropriate) in the safe and accurate administration of the specified medication(s).
(D) Address the security of the medication(s) for each patient.
(E) Document the administration of each medication, as reported by the patient (or the patient's caregiver/support person where appropriate), in the patient's medical record.
(ii) If the hospital allows a patient to self-administer his or her own specific medications brought into the hospital, then the hospital must have policies and procedures in place to:
(A) Ensure that a practitioner responsible for the care of the patient has issued an order, consistent with hospital policy, permitting self-administration of medications the patient brought into the hospital.
(B) Assess the capacity of the patient (or the patient's caregiver/support person where appropriate) to self-administer the specified medication(s), and also determine if the patient (or the patient's caregiver/support person where appropriate) needs instruction in the safe and accurate administration of the specified medication(s).
(C) Identify the specified medication(s) and visually evaluate the medication(s) for integrity.
(D) Address the security of the medication(s) for each patient.
(E) Document the administration of each medication, as reported by the patient (or the patient's caregiver/support person where appropriate), in the patient's medical record.
[51 FR 22042, June 17, 1986, as amended at 67 FR 61814, Oct. 2, 2002; 71 FR 68694, Nov. 27, 2006; 72 FR 66933, Nov. 27, 2007; 77 FR 29074, May 16, 2012; 78 FR 50970, Aug. 19, 2013; 79 FR 44129, July 30, 2014]
§ 482.24
Condition of participation: Medical record services.
The hospital must have a medical record service that has administrative responsibility for medical records. A medical record must be maintained for every individual evaluated or treated in the hospital.
(a) Standard: Organization and staffing. The organization of the medical record service must be appropriate to the scope and complexity of the services performed. The hospital must employ adequate personnel to ensure prompt completion, filing, and retrieval of records.
(b) Standard: Form and retention of record. The hospital must maintain a medical record for each inpatient and outpatient. Medical records must be accurately written, promptly completed, properly filed and retained, and accessible. The hospital must use a system of author identification and record maintenance that ensures the integrity of the authentification and protects the security of all record entries.
(1) Medical records must be retained in their original or legally reproduced form for a period of at least 5 years.
(2) The hospital must have a system of coding and indexing medical records. The system must allow for timely retrieval by diagnosis and procedure, in order to support medical care evaluation studies.
(3) The hospital must have a procedure for ensuring the confidentiality of patient records. In-formation from or copies of records may be released only to authorized individuals, and the hospital must ensure that unauthorized individuals cannot gain access to or alter patient records. Original medical records must be released by the hospital only in accordance with Federal or State laws, court orders, or subpoenas.
(c) Standard: Content of record. The medical record must contain information to justify admission and continued hospitalization, support the diagnosis, and describe the patient's progress and response to medications and services.
(1) All patient medical record entries must be legible, complete, dated, timed, and authenticated in written or electronic form by the person responsible for providing or evaluating the service provided, consistent with hospital policies and procedures.
(2) All orders, including verbal orders, must be dated, timed, and authenticated promptly by the ordering practitioner or by another practitioner who is responsible for the care of the patient only if such a practitioner is acting in accordance with State law, including scope-of-practice laws, hospital policies, and medical staff bylaws, rules, and regulations.
(3) Hospitals may use pre-printed and electronic standing orders, order sets, and protocols for patient orders only if the hospital:
(i) Establishes that such orders and protocols have been reviewed and approved by the medical staff and the hospital's nursing and pharmacy leadership;
(ii) Demonstrates that such orders and protocols are consistent with nationally recognized and evidence-based guidelines;
(iii) Ensures that the periodic and regular review of such orders and protocols is conducted by the medical staff and the hospital's nursing and pharmacy leadership to determine the continuing usefulness and safety of the orders and protocols; and
(iv) Ensures that such orders and protocols are dated, timed, and authenticated promptly in the patient's medical record by the ordering practitioner or by another practitioner responsible for the care of the patient only if such a practitioner is acting in accordance with State law, including scope-of-practice laws, hospital policies, and medical staff bylaws, rules, and regulations.
(4) All records must document the following, as appropriate:
(i) Evidence of—
(A) A medical history and physical examination completed and documented no more than 30 days before or 24 hours after admission or registration, but prior to surgery or a procedure requiring anesthesia services. The medical history and physical examination must be placed in the patient's medical record within 24 hours after admission or registration, but prior to surgery or a procedure requiring anesthesia services.
(B) An updated examination of the patient, including any changes in the patient's condition, when the medical history and physical examination are completed within 30 days before admission or registration. Documentation of the updated examination must be placed in the patient's medical record within 24 hours after admission or registration, but prior to surgery or a procedure requiring anesthesia services.
(ii) Admitting diagnosis.
(iii) Results of all consultative evaluations of the patient and appropriate findings by clinical and other staff involved in the care of the patient.
(iv) Documentation of complications, hospital acquired infections, and unfavorable reactions to drugs and anesthesia.
(v) Properly executed informed consent forms for procedures and treatments specified by the medical staff, or by Federal or State law if applicable, to require written patient consent.
(vi) All practitioners' orders, nursing notes, reports of treatment, medication records, radiology, and laboratory reports, and vital signs and other information necessary to monitor the patient's condition.
(vii) Discharge summary with outcome of hospitalization, disposition of case, and provisions for follow-up care.
(viii) Final diagnosis with completion of medical records within 30 days following discharge.
[51 FR 22042, June 17, 1986, as amended at 71 FR 68694, Nov. 27, 2006; 72 FR 66933, Nov. 27, 2007; 77 FR 29074, May 16, 2012]
§ 482.25
Condition of participation: Pharmaceutical services.
The hospital must have pharmaceutical services that meet the needs of the patients. The institution must have a pharmacy directed by a registered pharmacist or a drug storage area under competent supervision. The medical staff is responsible for developing policies and procedures that minimize drug errors. This function may be delegated to the hospital's organized pharmaceutical service.
(a) Standard: Pharmacy management and administration. The pharmacy or drug storage area must be administered in accordance with accepted professional principles.
(1) A full-time, part-time, or consulting pharmacist must be responsible for developing, supervising, and coordinating all the activities of the pharmacy services.
(2) The pharmaceutical service must have an adequate number of personnel to ensure quality pharmaceutical services, including emergency services.
(3) Current and accurate records must be kept of the receipt and disposition of all scheduled drugs.
(b) Standard: Delivery of services. In order to provide patient safety, drugs and biologicals must be controlled and distributed in accordance with applicable standards of practice, consistent with Federal and State law.
(1) All compounding, packaging, and dispensing of drugs and biologicals must be under the supervision of a pharmacist and performed consistent with State and Federal laws.
(2)(i) All drugs and biologicals must be kept in a secure area, and locked when appropriate.
(ii) Drugs listed in Schedules II, III, IV, and V of the Comprehensive Drug Abuse Prevention and Control Act of 1970 must be kept locked within a secure area.
(iii) Only authorized personnel may have access to locked areas.
(3) Outdated, mislabeled, or otherwise unusable drugs and biologicals must not be available for patient use.
(4) When a pharmacist is not available, drugs and biologicals must be removed from the pharmacy or storage area only by personnel designated in the policies of the medical staff and pharmaceutical service, in accordance with Federal and State law.
(5) Drugs and biologicals not specifically prescribed as to time or number of doses must automatically be stopped after a reasonable time that is predetermined by the medical staff.
(6) Drug administration errors, adverse drug reactions, and incompatibilities must be immediately reported to the attending physician and, if appropriate, to the hospital's quality assessment and performance improvement program.
(7) Abuses and losses of controlled substances must be reported, in accordance with applicable Federal and State laws, to the individual responsible for the pharmaceutical service, and to the chief executive officer, as appropriate.
(8) Information relating to drug interactions and information of drug therapy, side effects, toxicology, dosage, indications for use, and routes of administration must be available to the professional staff.
(9) A formulary system must be established by the medical staff to assure quality pharmaceuticals at reasonable costs.
[51 FR 22042, June 17, 1986; 51 FR 27848, Aug. 4, 1986; 71 FR 68694, Nov. 27, 2006; 77 FR 29075, May 16, 2012]
§ 482.26
Condition of participation: Radiologic services.
The hospital must maintain, or have available, diagnostic radiologic services. If therapeutic services are also provided, they, as well as the diagnostic services, must meet professionally approved standards for safety and personnel qualifications.
(a) Standard: Radiologic services. The hospital must maintain, or have available, radiologic services according to needs of the patients.
(b) Standard: Safety for patients and personnel. The radiologic services, particularly ionizing radiology procedures, must be free from hazards for patients and personnel.
(1) Proper safety precutions must be maintained against radiation hazards. This includes adequate shielding for patients, personnel, and facilities, as well as appropriate storage, use, and disposal of radioactive materials.
(2) Periodic inspection of equipment must be made and hazards identified must be promptly corrected.
(3) Radiation workers must be checked periodically, by the use of exposure meters or badge tests, for amount of radiation exposure.
(4) Radiologic services must be provided only on the order of practitioners with clinical privileges or, consistent with State law, of other practitioners authorized by the medical staff and the governing body to order the services.
(c) Standard: Personnel. (1) A qualified full-time, part-time, or consulting radiologist must supervise the ionizing radiology services and must interpret only those radiologic tests that are determined by the medical staff to require a radiologist's specialized knowledge. For purposes of this section, a radiologist is a doctor of medicine or osteopathy who is qualified by education and experience in radiology.
(2) Only personnel designated as qualified by the medical staff may use the radiologic equipment and administer procedures.
(d) Standard: Records. Records of radiologic services must be maintained.
(1) The radiologist or other practitioner who performs radiology services must sign reports of his or her interpretations.
(2) The hospital must maintain the following for at least 5 years:
(i) Copies of reports and printouts.
(ii) Films, scans, and other image records, as appropriate.
[51 FR 22042, June 17, 1986; 51 FR 27848, Aug. 4, 1986]
§ 482.27
Condition of participation: Laboratory services.
The hospital must maintain, or have available, adequate laboratory services to meet the needs of its patients. The hospital must ensure that all laboratory services provided to its patients are performed in a facility certified in accordance with part 493 of this chapter.
(a) Standard: Adequacy of laboratory services. The hospital must have laboratory services available, either directly or through a contractual agreement with a certified laboratory that meets requirements of part 493 of this chapter.
(1) Emergency laboratory services must be available 24 hours a day.
(2) A written description of services provided must be available to the medical staff.
(3) The laboratory must make provision for proper receipt and reporting of tissue specimens.
(4) The medical staff and a pathologist must determine which tissue specimens require a macroscopic (gross) examination and which require both macroscopic and microscopic examinations.
(b) Standard: Potentially infectious blood and blood components—(1) Potentially human immunodeficiency virus (HIV) infectious blood and blood components. Potentially HIV infectious blood and blood components are prior collections from a donor—
(i) Who tested negative at the time of donation but tests reactive for evidence of HIV infection on a later donation;
(ii) Who tests positive on the supplemental (additional, more specific) test or other follow-up testing required by FDA; and
(iii) For whom the timing of seroconversion cannot be precisely estimated.
(2) Potentially hepatitis C virus (HCV) infectious blood and blood components. Potentially HCV infectious blood and blood components are the blood and blood components identified in 21 CFR 610.47.
(3) Services furnished by an outside blood collecting establishment. If a hospital regularly uses the services of an outside blood collecting establishment, it must have an agreement with the blood collecting establishment that governs the procurement, transfer, and availability of blood and blood components. The agreement must require that the blood collecting establishment notify the hospital—
(i) Within 3 calendar days if the blood collecting establishment supplied blood and blood components collected from a donor who tested negative at the time of donation but tests reactive for evidence of HIV or HCV infection on a later donation or who is determined to be at increased risk for transmitting HIV or HCV infection;
(ii) Within 45 days of the test, of the results of the supplemental (additional, more specific) test for HIV or HCV, as relevant, or other follow-up testing required by FDA; and
(iii) Within 3 calendar days after the blood collecting establishment supplied blood and blood components collected from an infectious donor, whenever records are available, as set forth at 21 CFR 610.48(b)(3).
(4) Quarantine and disposition of blood and blood components pending completion of testing. If the blood collecting establishment (either internal or under an agreement) notifies the hospital of the reactive HIV or HCV screening test results, the hospital must determine the disposition of the blood or blood product and quarantine all blood and blood components from previous donations in inventory.
(i) If the blood collecting establishment notifies the hospital that the result of the supplemental (additional, more specific) test or other follow-up testing required by FDA is negative, absent other informative test results, the hospital may release the blood and blood components from quarantine.
(ii) If the blood collecting establishment notifies the hospital that the result of the supplemental, (additional, more specific) test or other follow-up testing required by FDA is positive, the hospital must—
(A) Dispose of the blood and blood components; and
(B) Notify the transfusion beneficiaries as set forth in paragraph (b)(6) of this section.
(iii) If the blood collecting establishment notifies the hospital that the result of the supplemental, (additional, more specific) test or other follow-up testing required by FDA is indeterminate, the hospital must destroy or label prior collections of blood or blood components held in quarantine as set forth at 21 CFR 610.46(b)(2), 610.47(b)(2), and 610.48(c)(2).
(5) Recordkeeping by the hospital. The hospital must maintain—
(i) Records of the source and disposition of all units of blood and blood components for at least 10 years from the date of disposition in a manner that permits prompt retrieval; and
(ii) A fully funded plan to transfer these records to another hospital or other entity if such hospital ceases operation for any reason.
(6) Patient notification. If the hospital has administered potentially HIV or HCV infectious blood or blood components (either directly through its own blood collecting establishment or under an agreement) or released such blood or blood components to another entity or individual, the hospital must take the following actions:
(i) Make reasonable attempts to notify the patient, or to notify the attending physician or the physician who ordered the blood or blood component and ask the physician to notify the patient, or other individual as permitted under paragraph (b)(10) of this section, that potentially HIV or HCV infectious blood or blood components were transfused to the patient and that there may be a need for HIV or HCV testing and counseling.
(ii) If the physician is unavailable or declines to make the notification, make reasonable attempts to give this notification to the patient, legal guardian, or relative.
(iii) Document in the patient's medical record the notification or attempts to give the required notification.
(7) Timeframe for notification—(i) For donors tested on or after February 20, 2008. For notifications resulting from donors tested on or after February 20, 2008 as set forth at 21 CFR 610.46 and 21 CFR 610.47 the notification effort begins when the blood collecting establishment notifies the hospital that it received potentially HIV or HCV infectious blood and blood components. The hospital must make reasonable attempts to give notification over a period of 12 weeks unless—
(A) The patient is located and notified; or
(B) The hospital is unable to locate the patient and documents in the patient's medical record the extenuating circumstances beyond the hospital's control that caused the notification timeframe to exceed 12 weeks.
(ii) For donors tested before February 20, 2008. For notifications resulting from donors tested before February 20, 2008 as set forth at 21 CFR 610.48(b) and (c), the notification effort begins when the blood collecting establishment notifies the hospital that it received potentially HCV infectious blood and blood components. The hospital must make reasonable attempts to give notification and must complete the actions within 1 year of the date on which the hospital received notification from the outside blood collecting establishment.
(8) Content of notification. The notification must include the following information:
(i) A basic explanation of the need for HIV or HCV testing and counseling;
(ii) Enough oral or written information so that an informed decision can be made about whether to obtain HIV or HCV testing and counseling; and
(iii) A list of programs or places where the person can obtain HIV or HCV testing and counseling, including any requirements or restrictions the program may impose.
(9) Policies and procedures. The hospital must establish policies and procedures for notification and documentation that conform to Federal, State, and local laws, including requirements for the confidentiality of medical records and other patient information.
(10) Notification to legal representative or relative. If the patient has been adjudged incompetent by a State court, the physician or hospital must notify a legal representative designated in accordance with State law. If the patient is competent, but State law permits a legal representative or relative to receive the information on the patient's behalf, the physician or hospital must notify the patient or his or her legal representative or relative. For possible HIV infectious transfusion beneficiaries that are deceased, the physician or hospital must inform the deceased patient's legal representative or relative. If the patient is a minor, the parents or legal guardian must be notified.
(11) Applicability. HCV notification requirements resulting from donors tested before February 20, 2008 as set forth at 21 CFR 610.48 will expire on August 24, 2015.
(c) General blood safety issues. For lookback activities only related to new blood safety issues that are identified after August 24, 2007, hospitals must comply with FDA regulations as they pertain to blood safety issues in the following areas:
(1) Appropriate testing and quarantining of infectious blood and blood components.
(2) Notification and counseling of beneficiaries that may have received infectious blood and blood components.
[57 FR 7136, Feb. 28, 1992, as amended at 61 FR 47433, Sept. 9, 1996; 72 FR 48573, Aug. 24, 2007]
§ 482.28
Condition of participation: Food and dietetic services.
The hospital must have organized dietary services that are directed and staffed by adequate qualified personnel. However, a hospital that has a contract with an outside food management company may be found to meet this Condition of participation if the company has a dietitian who serves the hospital on a full-time, part-time, or consultant basis, and if the company maintains at least the minimum standards specified in this section and provides for constant liaison with the hospital medical staff for recommendations on dietetic policies affecting patient treatment.
(a) Standard: Organization. (1) The hospital must have a full-time employee who—
(i) Serves as director of the food and dietetic service;
(ii) Is responsible for the daily management of the dietary services; and
(iii) Is qualified by experience or training.
(2) There must be a qualified dietitian, full-time, part-time, or on a consultant basis.
(3) There must be administrative and technical personnel competent in their respective duties.
(b) Standard: Diets. Menus must meet the needs of the patients.
(1) Individual patient nutritional needs must be met in accordance with recognized dietary practices.
(2) All patient diets, including therapeutic diets, must be ordered by a practitioner responsible for the care of the patient, or by a qualified dietitian or qualified nutrition professional as authorized by the medical staff and in accordance with State law governing dietitians and nutrition professionals.
(3) A current therapeutic diet manual approved by the dietitian and medical staff must be readily available to all medical, nursing, and food service personnel.
[51 FR 22042, June 17, 1986, as amended at 79 FR 27154, May 12, 2014]
§ 482.30
Condition of participation: Utilization review.
The hospital must have in effect a utilization review (UR) plan that provides for review of services furnished by the institution and by members of the medical staff to patients entitled to benefits under the Medicare and Medicaid programs.
(a) Applicability. The provisions of this section apply except in either of the following circumstances:
(1) A Utilization and Quality Control Quality Improvement Organization (QIO) has assumed binding review for the hospital.
(2) CMS has determined that the UR procedures established by the State under title XIX of the Act are superior to the procedures required in this section, and has required hospitals in that State to meet the UR plan requirements under §§ 456.50 through 456.245 of this chapter.
(b) Standard: Composition of utilization review committee. A UR committee consisting of two or more practitioners must carry out the UR function. At least two of the members of the committee must be doctors of medicine or osteopathy. The other members may be any of the other types of practitioners specified in § 482.12(c)(1).
(1) Except as specified in paragraphs (b) (2) and (3) of this section, the UR committee must be one of the following:
(i) A staff committee of the institution;
(ii) A group outside the institution—
(A) Established by the local medical society and some or all of the hospitals in the locality; or
(B) Established in a manner approved by CMS.
(2) If, because of the small size of the institution, it is impracticable to have a properly functioning staff committee, the UR committee must be established as specified in paragraph (b)(1)(ii) of this section.
(3) The committee's or group's reviews may not be conducted by any individual who—
(i) Has a direct financial interest (for example, an ownership interest) in that hospital; or
(ii) Was professionally involved in the care of the patient whose case is being reviewed.
(c) Standard: Scope and frequency of review. (1) The UR plan must provide for review for Medicare and Medicaid patients with respect to the medical necessity of—
(i) Admissions to the institution;
(ii) The duration of stays; and
(iii) Professional services furnished, including drugs and biologicals.
(2) Review of admissions may be performed before, at, or after hospital admission.
(3) Except as specified in paragraph (e) of this section, reviews may be conducted on a sample basis.
(4) Hospitals that are paid for inpatient hospital services under the prospective payment system set forth in part 412 of this chapter must conduct review of duration of stays and review of professional services as follows:
(i) For duration of stays, these hospitals need review only cases that they reasonably assume to be outlier cases based on extended length of stay, as described in § 412.80(a)(1)(i) of this chapter; and
(ii) For professional services, these hospitals need review only cases that they reasonably assume to be outlier cases based on extraordinarily high costs, as described in § 412.80(a)(1)(ii) of this chapter.
(d) Standard: Determination regarding admissions or continued stays. (1) The determination that an admission or continued stay is not medically necessary—
(i) May be made by one member of the UR committee if the practitioner or practitioners responsible for the care of the patient, as specified of § 482.12(c), concur with the determination or fail to present their views when afforded the opportunity; and
(ii) Must be made by at least two members of the UR committee in all other cases.
(2) Before making a determination that an admission or continued stay is not medically necessary, the UR committee must consult the practitioner or practitioners responsible for the care of the patient, as specified in § 482.12(c), and afford the practitioner or practitioners the opportunity to present their views.
(3) If the committee decides that admission to or continued stay in the hospital is not medically necessary, written notification must be given, no later than 2 days after the determination, to the hospital, the patient, and the practitioner or practitioners responsible for the care of the patient, as specified in § 482.12(c);
(e) Standard: Extended stay review. (1) In hospitals that are not paid under the prospective payment system, the UR committee must make a periodic review, as specified in the UR plan, of each current inpatient receiving hospital services during a continuous period of extended duration. The scheduling of the periodic reviews may—
(i) Be the same for all cases; or
(ii) Differ for different classes of cases.
(2) In hospitals paid under the prospective payment system, the UR committee must review all cases reasonably assumed by the hospital to be outlier cases because the extended length of stay exceeds the threshold criteria for the diagnosis, as described in § 412.80(a)(1)(i). The hospital is not required to review an extended stay that does not exceed the outlier threshold for the diagnosis.
(3) The UR committee must make the periodic review no later than 7 days after the day required in the UR plan.
(f) Standard: Review of professional services. The committee must review professional services provided, to determine medical necessity and to promote the most efficient use of available health facilities and services.
§ 482.41
Condition of participation: Physical environment.
The hospital must be constructed, arranged, and maintained to ensure the safety of the patient, and to provide facilities for diagnosis and treatment and for special hospital services appropriate to the needs of the community.
(a) Standard: Buildings. The condition of the physical plant and the overall hospital environment must be developed and maintained in such a manner that the safety and well-being of patients are assured.
(1) There must be emergency power and lighting in at least the operating, recovery, intensive care, and emergency rooms, and stairwells. In all other areas not serviced by the emergency supply source, battery lamps and flashlights must be available.
(2) There must be facilities for emergency gas and water supply.
(b) Standard: Life safety from fire. (1) Except as otherwise provided in this section—
(i) The hospital must meet the applicable provisions and must proceed in accordance with the Life Safety Code (NFPA 101 and Tentative Interim Amendments TIA 12-1, TIA 12-2, TIA 12-3, and TIA 12-4.) Outpatient surgical departments must meet the provisions applicable to Ambulatory Health Care Occupancies, regardless of the number of patients served.
(ii) Notwithstanding paragraph (b)(1)(i) of this section, corridor doors and doors to rooms containing flammable or combustible materials must be provided with positive latching hardware. Roller latches are prohibited on such doors.
(2) In consideration of a recommendation by the State survey agency or Accrediting Organization or at the discretion of the Secretary, may waive, for periods deemed appropriate, specific provisions of the Life Safety Code, which would result in unreasonable hardship upon a hospital, but only if the waiver will not adversely affect the health and safety of the patients.
(3) The provisions of the Life Safety Code do not apply in a State where CMS finds that a fire and safety code imposed by State law adequately protects patients in hospitals.
(4) The hospital must have procedures for the proper routine storage and prompt disposal of trash.
(5) The hospital must have written fire control plans that contain provisions for prompt reporting of fires; extinguishing fires; protection of patients, personnel and guests; evacuation; and cooperation with fire fighting authorities.
(6) The hospital must maintain written evidence of regular inspection and approval by State or local fire control agencies.
(7) A hospital may install alcohol-based hand rub dispensers in its facility if the dispensers are installed in a manner that adequately protects against inappropriate access;
(8) When a sprinkler system is shut down for more than 10 hours, the hospital must:
(i) Evacuate the building or portion of the building affected by the system outage until the system is back in service, or
(ii) Establish a fire watch until the system is back in service.
(9) Buildings must have an outside window or outside door in every sleeping room, and for any building constructed after July 5, 2016 the sill height must not exceed 36 inches above the floor. Windows in atrium walls are considered outside windows for the purposes of this requirement.
(i) The sill height requirement does not apply to newborn nurseries and rooms intended for occupancy for less than 24 hours.
(ii) The sill height in special nursing care areas of new occupancies must not exceed 60 inches.
(c) Standard: Building safety. Except as otherwise provided in this section, the hospital must meet the applicable provisions and must proceed in accordance with the Health Care Facilities Code (NFPA 99 and Tentative Interim Amendments TIA 12-2, TIA 12-3, TIA 12-4, TIA 12-5 and TIA 12-6).
(1) Chapters 7, 8, 12, and 13 of the adopted Health Care Facilities Code do not apply to a hospital.
(2) If application of the Health Care Facilities Code required under paragraph (c) of this section would result in unreasonable hardship for the hospital, CMS may waive specific provisions of the Health Care Facilities Code, but only if the waiver does not adversely affect the health and safety of patients.
(d) Standard: Facilities. The hospital must maintain adequate facilities for its services.
(1) Diagnostic and therapeutic facilities must be located for the safety of patients.
(2) Facilities, supplies, and equipment must be maintained to ensure an acceptable level of safety and quality.
(3) The extent and complexity of facilities must be determined by the services offered.
(4) There must be proper ventilation, light, and temperature controls in pharmaceutical, food preparation, and other appropriate areas.
(e) The standards incorporated by reference in this section are approved for incorporation by reference by the Director of the Office of the Federal Register in accordance with 5 U.S.C. 552(a) and 1 CFR part 51. You may inspect a copy at the CMS Information Resource Center, 7500 Security Boulevard, Baltimore, MD or at the National Archives and Records Administration (NARA). For information on the availability of this material at NARA, call 202-741-6030, or go to: http://www.archives.gov/federal_register/ code_of_federal_regulations/ibr_locations.html. If any changes in this edition of the Code are incorporated by reference, CMS will publish a document in the Federal Register to announce the changes.
(1) National Fire Protection Association, 1 Batterymarch Park, Quincy, MA 02169, www.nfpa.org, 1.617.770.3000.
(i) NFPA 99, Standards for Health Care Facilities Code of the National Fire Protection Association 99, 2012 edition, issued August 11, 2011.
(ii) TIA 12-2 to NFPA 99, issued August 11, 2011.
(iii) TIA 12-3 to NFPA 99, issued August 9, 2012.
(iv) TIA 12-4 to NFPA 99, issued March 7, 2013.
(v) TIA 12-5 to NFPA 99, issued August 1, 2013.
(vi) TIA 12-6 to NFPA 99, issued March 3, 2014.
(vii) NFPA 101, Life Safety Code, 2012 edition, issued August 11, 2011;
(viii) TIA 12-1 to NFPA 101, issued August 11, 2011.
(ix) TIA 12-2 to NFPA 101, issued October 30, 2012.
(x) TIA 12-3 to NFPA 101, issued October 22, 2013.
(xi) TIA 12-4 to NFPA 101, issued October 22, 2013.
(2) [Reserved]
[51 FR 22042, June 17, 1986, as amended at 53 FR 11509, Apr. 7, 1988; 68 FR 1386, Jan. 10, 2003; 69 FR 49267, Aug. 11, 2004; 70 FR 15238, Mar. 25, 2005; 71 FR 55340, Sept. 22, 2006; 81 FR 26899, May 4, 2016; 81 FR 42548, June 30, 2016]
§ 482.42
Condition of participation: Infection control.
The hospital must provide a sanitary environment to avoid sources and transmission of infections and communicable diseases. There must be an active program for the prevention, control, and investigation of infections and communicable diseases.
(a) Standard: Organization and policies. A person or persons must be designated as infection control officer or officers to develop and implement policies governing control of infections and communicable diseases. The infection control officer or officers must develop a system for identifying, reporting, investigating, and controlling infections and communicable diseases of patients and personnel.
(b) Standard: Responsibilities of chief executive officer, medical staff, and director of nursing services. The chief executive officer, the medical staff, and the director of nursing services must—
(1) Ensure that the hospital-wide quality assessment and performance improvement (QAPI) program and training programs address problems identified by the infection control officer or officers; and
(2) Be responsible for the implementation of successful corrective action plans in affected problem areas.
[51 FR 22042, June 17, 1986, as amended at 77 FR 29075, May 16, 2012; 79 FR 10396, Feb. 25, 2014]
§ 482.43
Condition of participation: Discharge planning.
The hospital must have in effect a discharge planning process that applies to all patients. The hospital's policies and procedures must be specified in writing.
(a) Standard: Identification of patients in need of discharge planning. The hospital must identify at an early stage of hospitalization all patients who are likely to suffer adverse health consequences upon discharge if there is no adequate discharge planning.
(b) Standard: Discharge planning evaluation. (1) The hospital must provide a discharge planning evaluation to the patients identified in paragraph (a) of this section, and to other patients upon the patient's request, the request of a person acting on the patient's behalf, or the request of the physician.
(2) A registered nurse, social worker, or other appropriately qualified personnel must develop, or supervise the development of, the evaluation.
(3) The discharge planning evaluation must include an evaluation of the likelihood of a patient needing post- hospital services and of the availability of the services.
(4) The discharge planning evaluation must include an evaluation of the likelihood of a patient's capacity for self-care or of the possibility of the patient being cared for in the environment from which he or she entered the hospital.
(5) The hospital personnel must complete the evaluation on a timely basis so that appropriate arrangements for post-hospital care are made before discharge, and to avoid unnecessary delays in discharge.
(6) The hospital must include the discharge planning evaluation in the patient's medical record for use in establishing an appropriate discharge plan and must discuss the results of the evaluation with the patient or individual acting on his or her behalf.
(c) Standard: Discharge plan. (1) A registered nurse, social worker, or other appropriately qualified personnel must develop, or supervise the development of, a discharge plan if the discharge planning evaluation indicates a need for a discharge plan.
(2) In the absence of a finding by the hospital that a patient needs a discharge plan, the patient's physician may request a discharge plan. In such a case, the hospital must develop a discharge plan for the patient.
(3) The hospital must arrange for the initial implementation of the patient's discharge plan.
(4) The hospital must reassess the patient's discharge plan if there are factors that may affect continuing care needs or the appropriateness of the discharge plan.
(5) As needed, the patient and family members or interested persons must be counseled to prepare them for post-hospital care.
(6) The hospital must include in the discharge plan a list of HHAs or SNFs that are available to the patient, that are participating in the Medicare program, and that serve the geographic area (as defined by the HHA) in which the patient resides, or in the case of a SNF, in the geographic area requested by the patient. HHAs must request to be listed by the hospital as available.
(i) This list must only be presented to patients for whom home health care or post-hospital extended care services are indicated and appropriate as determined by the discharge planning evaluation.
(ii) For patients enrolled in managed care organizations, the hospital must indicate the availability of home health and posthospital extended care services through individuals and entities that have a contract with the managed care organizations.
(iii) The hospital must document in the patient's medical record that the list was presented to the patient or to the individual acting on the patient's behalf.
(7) The hospital, as part of the discharge planning process, must inform the patient or the patient's family of their freedom to choose among participating Medicare providers of posthospital care services and must, when possible, respect patient and family preferences when they are expressed. The hospital must not specify or otherwise limit the qualified providers that are available to the patient.
(8) The discharge plan must identify any HHA or SNF to which the patient is referred in which the hospital has a disclosable financial interest, as specified by the Secretary, and any HHA or SNF that has a disclosable financial interest in a hospital under Medicare. Financial interests that are disclosable under Medicare are determined in accordance with the provisions of part 420, subpart C, of this chapter.
(d) Standard: Transfer or referral. The hospital must transfer or refer patients, along with necessary medical information, to appropriate facilities, agencies, or outpatient services, as needed, for followup or ancillary care.
(e) Standard: Reassessment. The hospital must reassess its discharge planning process on an on-going basis. The reassessment must include a review of discharge plans to ensure that they are responsive to discharge needs.
[59 FR 64152, Dec. 13, 1994, as amended at 69 FR 49268, Aug. 11, 2004]
§ 482.45
Condition of participation: Organ, tissue, and eye procurement.
(a) Standard: Organ procurement responsibilities. The hospital must have and implement written protocols that:
(1) Incorporate an agreement with an OPO designated under part 486 of this chapter, under which it must notify, in a timely manner, the OPO or a third party designated by the OPO of individuals whose death is imminent or who have died in the hospital. The OPO determines medical suitability for organ donation and, in the absence of alternative arrangements by the hospital, the OPO determines medical suitability for tissue and eye donation, using the definition of potential tissue and eye donor and the notification protocol developed in consultation with the tissue and eye banks identified by the hospital for this purpose;
(2) Incorporate an agreement with at least one tissue bank and at least one eye bank to cooperate in the retrieval, processing, preservation, storage and distribution of tissues and eyes, as may be appropriate to assure that all usable tissues and eyes are obtained from potential donors, insofar as such an agreement does not interfere with organ procurement;
(3) Ensure, in collaboration with the designated OPO, that the family of each potential donor is informed of its options to donate organs, tissues, or eyes or to decline to donate. The individual designated by the hospital to initiate the request to the family must be an organ procurement representative or a designated requestor. A designated requestor is an individual who has completed a course offered or approved by the OPO and designed in conjunction with the tissue and eye bank community in the methodology for approaching potential donor families and requesting organ or tissue donation;
(4) Encourage discretion and sensitivity with respect to the circumstances, views, and beliefs of the families of potential donors;
(5) Ensure that the hospital works cooperatively with the designated OPO, tissue bank and eye bank in educating staff on donation issues, reviewing death records to improve identification of potential donors, and maintaining potential donors while necessary testing and placement of potential donated organs, tissues, and eyes take place.
(b) Standard: Organ transplantation responsibilities. (1) A hospital in which organ transplants are performed must be a member of the Organ Procurement and Transplantation Network (OPTN) established and operated in accordance with section 372 of the Public Health Service (PHS) Act (42 U.S.C. 274) and abide by its rules. The term “rules of the OPTN” means those rules provided for in regulations issued by the Secretary in accordance with section 372 of the PHS Act which are enforceable under 42 CFR 121.10. No hospital is considered to be out of compliance with section 1138(a)(1)(B) of the Act, or with the requirements of this paragraph, unless the Secretary has given the OPTN formal notice that he or she approves the decision to exclude the hospital from the OPTN and has notified the hospital in writing.
(2) For purposes of these standards, the term “organ” means a human kidney, liver, heart, lung, or pancreas.
(3) If a hospital performs any type of transplants, it must provide organ-transplant-related data, as requested by the OPTN, the Scientific Registry, and the OPOs. The hospital must also provide such data directly to the Department when requested by the Secretary.
[63 FR 33875, June 22, 1998]

Subpart D—Optional Hospital Services
§ 482.51
Condition of participation: Surgical services.
If the hospital provides surgical services, the services must be well organized and provided in accordance with acceptable standards of practice. If outpatient surgical services are offered the services must be consistent in quality with inpatient care in accordance with the complexity of services offered.
(a) Standard: Organization and staffing. The organization of the surgical services must be appropriate to the scope of the services offered.
(1) The operating rooms must be supervised by an experienced registered nurse or a doctor of medicine or osteopathy.
(2) Licensed practical nurses (LPNs) and surgical technologists (operating room technicians) may serve as “scrub nurses” under the supervision of a registered nurse.
(3) Qualified registered nurses may perform circulating duties in the operating room. In accordance with applicable State laws and approved medical staff policies and procedures, LPNs and surgical technologists may assist in circulatory duties under the surpervision of a qualified registered nurse who is immediately available to respond to emergencies.
(4) Surgical privileges must be delineated for all practitioners performing surgery in accordance with the competencies of each practitioner. The surgical service must maintain a roster of practitioners specifying the surgical privileges of each practitioner.
(b) Standard: Delivery of service. Surgical services must be consistent with needs and resources. Policies governing surgical care must be designed to assure the achievement and maintenance of high standards of medical practice and patient care.
(1) Prior to surgery or a procedure requiring anesthesia services and except in the case of emergencies:
(i) A medical history and physical examination must be completed and documented no more than 30 days before or 24 hours after admission or registration.
(ii) An updated examination of the patient, including any changes in the patient's condition, must be completed and documented within 24 hours after admission or registration when the medical history and physical examination are completed within 30 days before admission or registration.
(2) A properly executed informed consent form for the operation must be in the patient's chart before surgery, except in emergencies.
(3) The following equipment must be available to the operating room suites: call-in-system, cardiac monitor, resuscitator, defibrillator, aspirator, and tracheotomy set.
(4) There must be adequate provisions for immediate post-operative care.
(5) The operating room register must be complete and up-to-date.
(6) An operative report describing techniques, findings, and tissues removed or altered must be written or dictated immediately following surgery and signed by the surgeon.
[51 FR 22042, June 17, 1986, as amended at 72 FR 66933, Nov. 27, 2007]
§ 482.52
Condition of participation: Anesthesia services.
If the hospital furnishes anesthesia services, they must be provided in a well-organized manner under the direction of a qualified doctor of medicine or osteopathy. The service is responsible for all anesthesia administered in the hospital.
(a) Standard: Organization and staffing. The organization of anesthesia services must be appropriate to the scope of the services offered. Anesthesia must be administered only by—
(1) A qualified anesthesiologist;
(2) A doctor of medicine or osteopathy (other than an anesthesiologist);
(3) A dentist, oral surgeon, or podiatrist who is qualified to administer anesthesia under State law;
(4) A certified registered nurse anesthetist (CRNA), as defined in § 410.69(b) of this chapter, who, unless exempted in accordance with paragraph (c)of this section, is under the supervision of the operating practitioner or of an anesthesiologist who is immediately available if needed; or
(5) An anesthesiologist's assistant, as defined in § 410.69(b) of this chapter, who is under the supervision of an anesthesiologist who is immediately available if needed.
(b) Standard: Delivery of services. Anesthesia services must be consistent with needs and resources. Policies on anesthesia procedures must include the delineation of preanesthesia and post anesthesia responsibilities. The policies must ensure that the following are provided for each patient:
(1) A preanesthesia evaluation completed and documented by an individual qualified to administer anesthesia, as specified in paragraph (a) of this section, performed within 48 hours prior to surgery or a procedure requiring anesthesia services.
(2) An intraoperative anesthesia record.
(3) A postanesthesia evaluation completed and documented by an individual qualified to administer anesthesia, as specified in paragraph (a) of this section, no later than 48 hours after surgery or a procedure requiring anesthesia services. The postanesthesia evaluation for anesthesia recovery must be completed in accordance with State law and with hospital policies and procedures that have been approved by the medical staff and that reflect current standards of anesthesia care.
(c) Standard: State exemption. (1) A hospital may be exempted from the requirement for physician supervision of CRNAs as described in paragraph (a)(4) of this section, if the State in which the hospital is located submits a letter to CMS signed by the Governor, following consultation with the State's Boards of Medicine and Nursing, requesting exemption from physician supervision of CRNAs. The letter from the Governor must attest that he or she has consulted with State Boards of Medicine and Nursing about issues related to access to and the quality of anesthesia services in the State and has concluded that it is in the best interests of the State's citizens to opt-out of the current physician supervision requirement, and that the opt-out is consistent with State law.
(2) The request for exemption and recognition of State laws, and the withdrawal of the request may be submitted at any time, and are effective upon submission.
[51 FR 22042, June 17, 1986, as amended at 57 FR 33900, July 31, 1992; 66 FR 56769, Nov. 13, 2001; 71 FR 68694, Nov. 27, 2006; 72 FR 66934, Nov. 27, 2007]
§ 482.53
Condition of participation: Nuclear medicine services.
If the hospital provides nuclear medicine services, those services must meet the needs of the patients in accordance with acceptable standards of practice.
(a) Standard: Organization and staffing. The organization of the nuclear medicine service must be appropriate to the scope and complexity of the services offered.
(1) There must be a director who is a doctor of medicine or osteopathy qualified in nuclear medicine.
(2) The qualifications, training, functions, and responsibilities of nuclear medicine personnel must be specified by the service director and approved by the medical staff.
(b) Standard: Delivery of service. Radioactive materials must be prepared, labeled, used, transported, stored, and disposed of in accordance with acceptable standards of practice.
(1) In-house preparation of radiopharmaceuticals is by, or under the supervision of, an appropriately trained registered pharmacist or a doctor of medicine or osteopathy.
(2) There is proper storage and disposal of radioactive material.
(3) If laboratory tests are performed in the nuclear medicine service, the service must meet the applicable requirement for laboratory services specified in § 482.27.
(c) Standard: Facilities. Equipment and supplies must be appropriate for the types of nuclear medicine services offered and must be maintained for safe and efficient performance. The equipment must be—
(1) Maintained in safe operating condition; and
(2) Inspected, tested, and calibrated at least annually by qualified personnel.
(d) Standard: Records. The hospital must maintain signed and dated reports of nuclear medicine interpretations, consultations, and procedures.
(1) The hospital must maintain copies of nuclear medicine reports for at least 5 years.
(2) The practitioner approved by the medical staff to interpret diagnostic procedures must sign and date the interpretation of these tests.
(3) The hospital must maintain records of the receipt and disposition of radiopharmaceuticals.
(4) Nuclear medicine services must be ordered only by practitioner whose scope of Federal or State licensure and whose defined staff privileges allow such referrals.
[51 FR 22042, June 17, 1986, as amended at 57 FR 7136, Feb. 28, 1992; 79 FR 27154, May 12, 2014]
§ 482.54
Condition of participation: Outpatient services.
If the hospital provides outpatient services, the services must meet the needs of the patients in accordance with acceptable standards of practice.
(a) Standard: Organization. Outpatient services must be appropriately organized and integrated with inpatient services.
(b) Standard: Personnel. The hospital must—
(1) Assign one or more individuals to be responsible for outpatient services.
(2) Have appropriate professional and nonprofessional personnel available at each location where outpatient services are offered, based on the scope and complexity of outpatient services.
(c) Standard: Orders for outpatient services. Outpatient services must be ordered by a practitioner who meets the following conditions:
(1) Is responsible for the care of the patient.
(2) Is licensed in the State where he or she provides care to the patient.
(3) Is acting within his or her scope of practice under State law.
(4) Is authorized in accordance with State law and policies adopted by the medical staff, and approved by the governing body, to order the applicable outpatient services. This applies to the following:
(i) All practitioners who are appointed to the hospital's medical staff and who have been granted privileges to order the applicable outpatient services.
(ii) All practitioners not appointed to the medical staff, but who satisfy the above criteria for authorization by the medical staff and the hospital for ordering the applicable outpatient services for their patients.
[51 FR 22042, June 17, 1986, as amended at 77 FR 29075, May 16, 2012; 79 FR 27154, May 12, 2014]
§ 482.55
Condition of participation: Emergency services.
The hospital must meet the emergency needs of patients in accordance with acceptable standards of practice.
(a) Standard: Organization and direction. If emergency services are provided at the hospital—
(1) The services must be organized under the direction of a qualified member of the medical staff;
(2) The services must be integrated with other departments of the hospital;
(3) The policies and procedures governing medical care provided in the emergency service or department are established by and are a continuing responsibility of the medical staff.
(b) Standard: Personnel. (1) The emergency services must be supervised by a qualified member of the medical staff.
(2) There must be adequate medical and nursing personnel qualified in emergency care to meet the written emergency procedures and needs anticipated by the facility.
§ 482.56
Condition of participation: Rehabilitation services.
If the hospital provides rehabilitation, physical therapy, occupational therapy, audiology, or speech pathology services, the services must be organized and staffed to ensure the health and safety of patients.
(a) Standard: Organization and staffing. The organization of the service must be appropriate to the scope of the services offered.
(1) The director of the services must have the necessary knowledge, experience, and capabilities to properly supervise and administer the services.
(2) Physical therapy, occupational therapy, speech-language pathology or audiology services, if provided, must be provided by qualified physical therapists, physical therapist assistants, occupational therapists, occupational therapy assistants, speech-language pathologists, or audiologists as defined in part 484 of this chapter.
(b) Standard: Delivery of services. Services must only be provided under the orders of a qualified and licensed practitioner who is responsible for the care of the patient, acting within his or her scope of practice under State law, and who is authorized by the hospital's medical staff to order the services in accordance with hospital policies and procedures and State laws.
(1) All rehabilitation services orders must be documented in the patient's medical record in accordance with the requirements at § 482.24.
(2) The provision of care and the personnel qualifications must be in accordance with national acceptable standards of practice and must also meet the requirements of § 409.17 of this chapter.
[51 FR 22042, June 17, 1986, as amended at 72 FR 66406, Nov. 27, 2007; 75 FR 50418, Aug. 16, 2010]
§ 482.57
Condition of participation: Respiratory care services.
The hospital must meet the needs of the patients in accordance with acceptable standards of practice. The following requirements apply if the hospital provides respiratory care service.
(a) Standard: Organization and Staffing. The organization of the respiratory care services must be appropriate to the scope and complexity of the services offered.
(1) There must be a director of respiratory care services who is a doctor of medicine or osteopathy with the knowledge experience, and capabilities to supervise and administer the service properly. The director may serve on either a full-time or part-time basis.
(2) There must be adequate numbers of respiratory therapists, respiratory therapy technicians, and other personnel who meet the qualifications specified by the medical staff, consistent with State law.
(b) Standard: Delivery of Services. Services must be delivered in accordance with medical staff directives.
(1) Personnel qualified to perform specific procedures and the amount of supervision required for personnel to carry out specific procedures must be designated in writing.
(2) If blood gases or other laboratory tests are performed in the respiratory care unit, the unit must meet the applicable requirements for laboratory services specified in § 482.27.
(3) Services must only be provided under the orders of a qualified and licensed practitioner who is responsible for the care of the patient, acting within his or her scope of practice under State law, and who is authorized by the hospital's medical staff to order the services in accordance with hospital policies and procedures and State laws.
(4) All respiratory care services orders must be documented in the patient's medical record in accordance with the requirements at § 482.24.
[51 FR 22042, June 17, 1986; 51 FR 27848, Aug. 4, 1986, as amended at 57 FR 7136, Feb. 28, 1992; 75 FR 50418, Aug. 16, 2010]
§ 482.58
Special requirements for hospital providers of long-term care services (“swing-beds”).
A hospital that has a Medicare provider agreement must meet the following requirements in order to be granted an approval from CMS to provide post-hospital extended care services, as specified in § 409.30 of this chapter, and be reimbursed as a swing-bed hospital, as specified in § 413.114 of this chapter:
(a) Eligibility. A hospital must meet the following eligibility requirements:
(1) The facility has fewer than 100 hospital beds, excluding beds for newborns and beds in intensive care type inpatient units (for eligibility of hospitals with distinct parts electing the optional reimbursement method, see § 413.24(d)(5) of this chapter).
(2) The hospital is located in a rural area. This includes all areas not delineated as “urbanized” areas by the Census Bureau, based on the most recent census.
(3) The hospital does not have in effect a 24-hour nursing waiver granted under § 488.54(c) of this chapter.
(4) The hospital has not had a swing-bed approval terminated within the two years previous to application.
(b) Skilled nursing facility services. The facility is substantially in compliance with the following skilled nursing facility requirements contained in subpart B of part 483 of this chapter.
(1) Resident rights (§ 483.10(b)(7), (c)(1), (c)(2)(iii), (c)(6), (d), (e)(2), (e)(4), (f)(4)(ii), (f)(4)(iii), (f)(9), (h), (g)(8), (g)(17), and (g)(18) introductory text.
(2) Admission, transfer, and discharge rights (§ 483.5 definition of transfer and discharge, § 483.15(c)(1), (c)(2)(i), (c)(2)(ii), (c)(3), (c)(4), (c)(5), and (c)(7)).
(3) Freedom from abuse, neglect, and exploitation (§ 483.12(a)(1), (a)(2), (a)(3)(i), (a)(3)(ii), (a)(4), (b)(1), (b)(2), (c)).
(4) Patient activities (§ 483.24(c)).
(5) Social services (§ 483.40(d) and 483.70(p)).
(6) Discharge planning (§ 483.20(e)).
(7) Specialized rehabilitative services (§ 483.65).
(8) Dental services (§ 483.55).
[72 FR 60788, Oct. 26, 2007. Redesignated at 79 FR 27155, May 12, 2014, as amended at 81 FR 68847, Oct. 4, 2016; 82 FR 32258, July 13, 2017]

Subpart E—Requirements for Specialty Hospitals

Source:
72 FR 15273, Mar. 30, 2007, unless otherwise noted.
§ 482.60
Special provisions applying to psychiatric hospitals.
Psychiatric hospital must—
(a) Be primarily engaged in providing, by or under the supervision of a doctor of medicine or osteopathy, psychiatric services for the diagnosis and treatment of mentally ill persons;
(b) Meet the conditions of participation specified in §§ 482.1 through 482.23 and §§ 482.25 through 482.57;
(c) Maintain clinical records on all patients, including records sufficient to permit CMS to determine the degree and intensity of treatment furnished to Medicare beneficiaries, as specified in § 482.61; and
(d) Meet the staffing requirements specified in § 482.62.
[72 FR 60788, Oct. 26, 2007]
§ 482.61
Condition of participation: Special medical record requirements for psychiatric hospitals.
The medical records maintained by a psychiatric hospital must permit determination of the degree and intensity of the treatment provided to individuals who are furnished services in the institution.
(a) Standard: Development of assessment/diagnostic data. Medical records must stress the psychiatric components of the record, including history of findings and treatment provided for the psychiatric condition for which the patient is hospitalized.
(1) The identification data must include the patient's legal status.
(2) A provisional or admitting diagnosis must be made on every patient at the time of admission, and must include the diagnoses of intercurrent diseases as well as the psychiatric diagnoses.
(3) The reasons for admission must be clearly documented as stated by the patient and/or others significantly involved.
(4) The social service records, including reports of interviews with patients, family members, and others, must provide an assessment of home plans and family attitudes, and community resource contacts as well as a social history.
(5) When indicated, a complete neurological examination must be recorded at the time of the admission physical examination.
(b) Standard: Psychiatric evaluation. Each patient must receive a psychiatric evaluation that must—
(1) Be completed within 60 hours of admission;
(2) Include a medical history;
(3) Contain a record of mental status;
(4) Note the onset of illness and the circumstances leading to admission;
(5) Describe attitudes and behavior;
(6) Estimate intellectual functioning, memory functioning, and orientation; and
(7) Include an inventory of the patient's assets in descriptive, not interpretative, fashion.
(c) Standard: Treatment plan. (1) Each patient must have an individual comprehensive treatment plan that must be based on an inventory of the patient's strengths and disabilities. The written plan must include—
(i) A substantiated diagnosis;
(ii) Short-term and long-range goals;
(iii) The specific treatment modalities utilized;
(iv) The responsibilities of each member of the treatment team; and
(v) Adequate documentation to justify the diagnosis and the treatment and rehabilitation activities carried out.
(2) The treatment received by the patient must be documented in such a way to assure that all active therapeutic efforts are included.
(d) Standard: Recording progress. Progress notes must be recorded by the doctor of medicine or osteopathy responsible for the care of the patient as specified in § 482.12(c), nurse, social worker and, when appropriate, others significantly involved in active treatment modalities. The frequency of progress notes is determined by the condition of the patient but must be recorded at least weekly for the first 2 months and at least once a month thereafter and must contain recommendations for revisions in the treatment plan as indicated as well as precise assessment of the patient's progress in accordance with the original or revised treatment plan.
(e) Standard: Discharge planning and discharge summary. The record of each patient who has been discharged must have a discharge summary that includes a recapitulation of the patient's hospitalization and recommendations from appropriate services concerning follow-up or aftercare as well as a brief summary of the patient's condition on discharge.
[72 FR 60788, Oct. 26, 2007]
§ 482.62
Condition of participation: Special staff requirements for psychiatric hospitals.
The hospital must have adequate numbers of qualified professional and supportive staff to evaluate patients, formulate written, individualized comprehensive treatment plans, provide active treatment measures, and engage in discharge planning.
(a) Standard: Personnel. The hospital must employ or undertake to provide adequate numbers of qualified professional, technical, and consultative personnel to:
(1) Evaluate patients;
(2) Formulate written individualized, comprehensive treatment plans;
(3) Provide active treatment measures; and
(4) Engage in discharge planning.
(b) Standard: Director of inpatient psychiatric services; medical staff. Inpatient psychiatric services must be under the supervision of a clinical director, service chief, or equivalent who is qualified to provide the leadership required for an intensive treatment program. The number and qualifications of doctors of medicine and osteopathy must be adequate to provide essential psychiatric services.
(1) The clinical director, service chief, or equivalent must meet the training and experience requirements for examination by the American Board of Psychiatry and Neurology or the American Osteopathic Board of Neurology and Psychiatry.
(2) The director must monitor and evaluate the quality and appropriateness of services and treatment provided by the medical staff.
(c) Standard: Availability of medical personnel. Doctors of medicine or osteopathy and other appropriate professional personnel must be available to provide necessary medical and surgical diagnostic and treatment services. If medical and surgical diagnostic and treatment services are not available within the institution, the institution must have an agreement with an outside source of these services to ensure that they are immediately available or a satisfactory agreement must be established for transferring patients to a general hospital that participates in the Medicare program.
(d) Standard: Nursing services. The hospital must have a qualified director of psychiatric nursing services. In addition to the director of nursing, there must be adequate numbers of registered nurses, licensed practical nurses, and mental health workers to provide nursing care necessary under each patient's active treatment program and to maintain progress notes on each patient.
(1) The director of psychiatric nursing services must be a registered nurse who has a master's degree in psychiatric or mental health nursing, or its equivalent from a school of nursing accredited by the National League for Nursing, or be qualified by education and experience in the care of the mentally ill. The director must demonstrate competence to participate in interdisciplinary formulation of individual treatment plans; to give skilled nursing care and therapy; and to direct, monitor, and evaluate the nursing care furnished.
(2) The staffing pattern must insure the availability of a registered professional nurse 24 hours each day. There must be adequate numbers of registered nurses, licensed practical nurses, and mental health workers to provide the nursing care necessary under each patient's active treatment program.
(e) Standard: Psychological services. The hospital must provide or have available psychological services to meet the needs of the patients.
(f) Standard: Social services. There must be a director of social services who monitors and evaluates the quality and appropriateness of social services furnished. The services must be furnished in accordance with accepted standards of practice and established policies and procedures.
(1) The director of the social work department or service must have a master's degree from an accredited school of social work or must be qualified by education and experience in the social services needs of the mentally ill. If the director does not hold a masters degree in social work, at least one staff member must have this qualification.
(2) Social service staff responsibilities must include, but are not limited to, participating in discharge planning, arranging for follow-up care, and developing mechanisms for exchange of appropriate, information with sources outside the hospital.
(g) Standard: Therapeutic activities. The hospital must provide a therapeutic activities program.
(1) The program must be appropriate to the needs and interests of patients and be directed toward restoring and maintaining optimal levels of physical and psychosocial functioning.
(2) The number of qualified therapists, support personnel, and consultants must be adequate to provide comprehensive therapeutic activities consistent with each patient's active treatment program.
[72 FR 60788, Oct. 26, 2007]
§ 482.68
Special requirement for transplant centers.
A transplant center located within a hospital that has a Medicare provider agreement must meet the conditions of participation specified in §§ 482.72 through 482.104 in order to be granted approval from CMS to provide transplant services.
(a) Unless specified otherwise, the conditions of participation at §§ 482.72 through 482.104 apply to heart, heart-lung, intestine, kidney, liver, lung, and pancreas centers.
(b) In addition to meeting the conditions of participation specified in §§ 482.72 through 482.104, a transplant center must also meet the conditions of participation in §§ 482.1 through 482.57, except for § 482.15.
[81 FR 64030, Sept. 16, 2016]
§ 482.70
Definitions.
As used in this subpart, the following definitions apply:
Adverse event means an untoward, undesirable, and usually unanticipated event that causes death or serious injury, or the risk thereof. As applied to transplant centers, examples of adverse events include (but are not limited to) serious medical complications or death caused by living donation; unintentional transplantation of organs of mismatched blood types; transplantation of organs to unintended beneficiaries; and unintended transmission of infectious disease to a beneficiary.
End-Stage Renal Disease (ESRD) means that stage of renal impairment that appears irreversible and permanent, and requires a regular course of dialysis or kidney transplantation to maintain life.
ESRD Network means all Medicare-approved ESRD facilities in a designated geographic area specified by CMS.
Heart-Lung transplant center means a transplant center that is located in a hospital with an existing Medicare-approved heart transplant center and an existing Medicare-approved lung center that performs combined heart-lung transplants.
Intestine transplant center means a Medicare-approved liver transplant center that performs intestine transplants, combined liver-intestine transplants, or multivisceral transplants.
Network organization means the administrative governing body to the network and liaison to the Federal government.
Pancreas transplant center means a Medicare-approved kidney transplant center that performs pancreas transplants alone or subsequent to a kidney transplant as well as kidney-pancreas transplants.
Transplant center means an organ-specific transplant program (as defined in this rule) within a transplant hospital (for example, a hospital's lung transplant program may also be referred to as the hospital's lung transplant center).
Transplant hospital means a hospital that furnishes organ transplants and other medical and surgical specialty services required for the care of transplant patients.
Transplant program means a component within a transplant hospital (as defined in this rule) that provides transplantation of a particular type of organ.

General Requirements for Transplant Centers
§ 482.72
Condition of participation: OPTN membership.
A transplant center must be located in a transplant hospital that is a member of and abides by the rules and requirements of the Organ Procurement and Transplantation Network (OPTN) established and operated in accordance with section 372 of the Public Health Service (PHS) Act (42 U.S.C. 274). The term “rules and requirements of the OPTN” means those rules and requirements approved by the Secretary pursuant to § 121.4 of this title. No hospital that provides transplantation services shall be deemed to be out of compliance with section 1138(a)(1)(B) of the Act or this section unless the Secretary has given the OPTN formal notice that he or she approves the decision to exclude the transplant hospital from the OPTN and also has notified the transplant hospital in writing.
§ 482.74
Condition of participation: Notification to CMS.
(a) A transplant center must notify CMS immediately of any significant changes related to the center's transplant program or changes that could affect its compliance with the conditions of participation. Instances in which CMS should receive information for follow up, as appropriate, include, but are not limited to:
(1) Change in key staff members of the transplant team, such as a change in the individual the transplant center designated to the OPTN as the center's “primary transplant surgeon” or “primary transplant physician;'
(2) Termination of an agreement between the hospital in which the transplant center is located and an OPO for the recovery and receipt of organs as required by section 482.100; and
(3) Inactivation of the transplant center.
(b) Upon receiving notification of significant changes, CMS will follow up with the transplant center as appropriate, including (but not limited to):
(1) Requesting additional information;
(2) Analyzing the information; or
(3) Conducting an on-site review.
[72 FR 15273, Mar. 30, 2007, as amended at 79 FR 27155, May 12, 2014]
§ 482.76
Condition of participation: Pediatric Transplants.
A transplant center that seeks Medicare approval to provide transplantation services to pediatric patients must submit to CMS a request specifically for Medicare approval to perform pediatric transplants using the procedures described at § 488.61 of this chapter.
(a) Except as specified in paragraph (d) of this section, a center requesting Medicare approval to perform pediatric transplants must meet all the conditions of participation at §§ 482.72 through 482.74 and §§ 482.80 through 482.104 with respect to its pediatric patients.
(b) A center that performs 50 percent or more of its transplants in a 12-month period on adult patients must be approved to perform adult transplants in order to be approved to perform pediatric transplants.
(1) Loss of Medicare approval to perform adult transplants, whether voluntary or involuntary, will result in loss of the center's approval to perform pediatric transplants.
(2) Loss of Medicare approval to perform pediatric transplants, whether voluntary or involuntary, may trigger a review of the center's Medicare approval to perform adult transplants.
(c) A center that performs 50 percent or more of its transplants in a 12-month period on pediatric patients must be approved to perform pediatric transplants in order to be approved to perform adult transplants.
(1) Loss of Medicare approval to perform pediatric transplants, whether voluntary or involuntary, will result in loss of the center's approval to perform adult transplants.
(2) Loss of Medicare approval to perform adult transplants, whether voluntary or involuntary, may trigger a review of the center's Medicare approval to perform pediatric transplants.
(3) A center that performs 50 percent or more of its transplants on pediatric patients in a 12-month period is not required to meet the clinical experience requirements prior to its request for approval as a pediatric transplant center.
(d) Instead of meeting all conditions of participation at §§ 482.72 through 482.74 and §§ 482.80 through 482.104, a heart transplant center that wishes to provide transplantation services to pediatric heart patients may be approved to perform pediatric heart transplants by meeting the Omnibus Budget Reconciliation Act of 1987 criteria in section 4009(b) (Pub. L. 100-203), as follows:
(1) The center's pediatric transplant program must be operated jointly by the hospital and another facility that is Medicare-approved;
(2) The unified program shares the same transplant surgeons and quality improvement program (including oversight committee, patient protocol, and patient selection criteria); and
(3) The center demonstrates to the satisfaction of the Secretary that it is able to provide the specialized facilities, services, and personnel that are required by pediatric heart transplant patients.
§ 482.78
Condition of participation: Emergency preparedness for transplant centers.
A transplant center must be included in the emergency preparedness planning and the emergency preparedness program as set forth in § 482.15 for the hospital in which it is located. However, a transplant center is not individually responsible for the emergency preparedness requirements set forth in § 482.15.
(a) Standard: Policies and procedures. A transplant center must have policies and procedures that address emergency preparedness. These policies and procedures must be included in the hospital's emergency preparedness program.
(b) Standard: Protocols with hospital and OPO. A transplant center must develop and maintain mutually agreed upon protocols that address the duties and responsibilities of the transplant center, the hospital in which the transplant center is operated, and the OPO designated by the Secretary, unless the hospital has an approved waiver to work with another OPO, during an emergency.
[81 FR 64030, Sept. 16, 2016]

Transplant Center Data Submission, Clinical Experience, and Outcome Requirements
§ 482.80
Condition of participation: Data submission, clinical experience, and outcome requirements for initial approval of transplant centers.
Except as specified in paragraph (d) of this section, and § 488.61 of this chapter, transplant centers must meet all data submission, clinical experience, and outcome requirements to be granted initial approval by CMS.
(a) Standard: Data submission. No later than 90 days after the due date established by the OPTN, a transplant center must submit to the OPTN at least 95 percent of required data on all transplants (deceased and living donor) it has performed. Required data submissions include, but are not limited to, submission of the appropriate OPTN forms for transplant candidate registration, transplant beneficiary registration and follow-up, and living donor registration and follow-up.
(b) Standard: Clinical experience. To be considered for initial approval, an organ-specific transplant center must generally perform 10 transplants over a 12-month period.
(c) Standard: Outcome requirements. CMS will review outcomes for all transplants performed at a center, including outcomes for living donor transplants, if applicable. CMS will review adult and pediatric outcomes separately when a center requests Medicare approval to perform both adult and pediatric transplants.
(1) CMS will compare each transplant center's observed number of patient deaths and graft failures 1-year post-transplant to the center's expected number of patient deaths and graft failures 1-year post-transplant using the data contained in the most recent Scientific Registry of Transplant Beneficiaries (SRTR) center-specific report.
(2) CMS will not consider a center's patient and graft survival rates to be acceptable if:
(i) A center's observed patient survival rate or observed graft survival rate is lower than its expected patient survival rate or expected graft survival rate; and
(ii) All three of the following thresholds are crossed over:
(A) The one-sided p-value is less than 0.05,
(B) The number of observed events (patient deaths or graft failures) minus the number of expected events is greater than 3, and
(C) The number of observed events divided by the number of expected events is greater than 1.85.
(d) Exceptions. (1) A heart-lung transplant center is not required to comply with the clinical experience requirements in paragraph (b) of this section or the outcome requirements in paragraph (c) of this section for heart-lung transplants performed at the center.
(2) An intestine transplant center is not required to comply with the outcome performance requirements in paragraph (c) of this section for intestine, combined liver-intestine or multivisceral transplants performed at the center.
(3) A pancreas transplant center is not required to comply with the clinical experience requirements in paragraph (b) of this section or the outcome requirements in paragraph (c) of this section for pancreas transplants performed at the center.
(4) A center that is requesting initial Medicare approval to perform pediatric transplants is not required to comply with the clinical experience requirements in paragraph (b) of this section prior to its request for approval as a pediatric transplant center.
(5) A kidney transplant center that is not Medicare-approved on the effective date of this rule is required to perform at least 3 transplants over a 12-month period prior to its request for initial approval.
[72 FR 15273, Mar. 30, 2007, as amended at 79 FR 27155, May 12, 2014; 81 FR 79880, Nov. 14, 2016]
§ 482.82
Condition of participation: Data submission, clinical experience, and outcome requirements for re-approval of transplant centers.
Except as specified in paragraph (d) of this section, and § 488.61 of this chapter, transplant centers must meet all data submission, clinical experience, and outcome requirements in order to be re-approved.
(a) Standard: Data submission. No later than 90 days after the due date established by the OPTN, a transplant center must submit to the OPTN at least 95 percent of the required data submissions on all transplants (deceased and living donors) performed during the prior 3 years. Required data submissions include, but are not limited to, submission of the appropriate OPTN forms for transplant candidate registration, transplant recipient registration and follow-up, and living donor registration and follow-up.
(b) Standard: Clinical experience. To be considered for re-approval, an organ-specific transplant center must generally perform an average of 10 transplants per year during the prior 3 years.
(c) Standard: Outcome requirements. CMS will review outcomes for all transplants performed at a center, including outcomes for living donor transplants, if applicable. CMS will review adult and pediatric outcomes separately when a center requests Medicare approval to perform both adult and pediatric transplants.
(1) CMS will compare each transplant center's observed number of patient deaths and graft failures 1-year post-transplant to the center's expected number of patient deaths and graft failures 1-year post-transplant using data contained in the most recent SRTR center-specific report.
(2) CMS will not consider a center's patient and graft survival rates to be acceptable if:
(i) A center's observed patient survival rate or observed graft survival rate is lower than its expected patient survival rate and graft survival rate; and
(ii) All three of the following thresholds are crossed over:
(A) The one-sided p-value is less than 0.05,
(B) The number of observed events (patient deaths or graft failures) minus the number of expected events is greater than 3, and
(C) The number of observed events divided by the number of expected events is greater than 1.85.
(d) Exceptions. (1) A heart-lung transplant center is not required to comply with the clinical experience requirements in paragraph (b) of this section or the outcome requirements in paragraph (c) of this section for heart-lung transplants performed at the center.
(2) An intestine transplant center is not required to comply with the outcome requirements in paragraph (c) of this section for intestine, combined liver-intestine, and multivisceral transplants performed at the center.
(3) A pancreas transplant center is not required to comply with the clinical experience requirements in paragraph (b) of this section or the outcome requirements in paragraph (c) of this section for pancreas transplants performed at the center.
(4) A center that is approved to perform pediatric transplants is not required to comply with the clinical experience requirements in paragraph (b) of this section to be re-approved.
[72 FR 15273, Mar. 30, 2007, as amended at 79 FR 27155, May 12, 2014; 81 FR 79880, Nov. 14, 2016]

Transplant Center Process Requirements
§ 482.90
Condition of participation: Patient and living donor selection.
The transplant center must use written patient selection criteria in determining a patient's suitability for placement on the waiting list or a patient's suitability for transplantation. If a center performs living donor transplants, the center also must use written donor selection criteria in determining the suitability of candidates for donation.
(a) Standard: Patient selection. Patient selection criteria must ensure fair and non-discriminatory distribution of organs.
(1) Prior to placement on the center's waiting list, a prospective transplant candidate must receive a psychosocial evaluation, if possible.
(2) Before a transplant center places a transplant candidate on its waiting list, the candidate's medical record must contain documentation that the candidate's blood type has been determined.
(3) When a patient is placed on a center's waiting list or is selected to receive a transplant, the center must document in the patient's medical record the patient selection criteria used.
(4) A transplant center must provide a copy of its patient selection criteria to a transplant patient, or a dialysis facility, as requested by a patient or a dialysis facility.
(b) Standard: Living donor selection. The living donor selection criteria must be consistent with the general principles of medical ethics. Transplant centers must:
(1) Ensure that a prospective living donor receives a medical and psychosocial evaluation prior to donation,
(2) Document in the living donor's medical records the living donor's suitability for donation, and
(3) Document that the living donor has given informed consent, as required under § 482.102.
§ 482.92
Condition of participation: Organ recovery and receipt.
Transplant centers must have written protocols for validation of donor-beneficiary blood type and other vital data for the deceased organ recovery, organ receipt, and living donor organ transplantation processes. The transplanting surgeon at the transplant center is responsible for ensuring the medical suitability of donor organs for transplantation into the intended beneficiary.
(a) Standard: Organ receipt. After an organ arrives at a transplant center, prior to transplantation, the transplanting surgeon and another licensed health care professional must verify that the donor's blood type and other vital data are compatible with transplantation of the intended beneficiary.
(b) Standard: Living donor transplantation. If a center performs living donor transplants, the transplanting surgeon and another licensed health care professional at the center must verify that the living donor's blood type and other vital data are compatible with transplantation of the intended beneficiary immediately before the removal of the donor organ(s) and, if applicable, prior to the removal of the beneficiary 's organ(s).
[51 FR 22042, June 17, 1986, as amended at 77 FR 29076, May 16, 2012]
§ 482.94
Condition of participation: Patient and living donor management.
Transplant centers must have written patient management policies for the transplant and discharge phases of transplantation. If a transplant center performs living donor transplants, the center also must have written donor management policies for the donor evaluation, donation, and discharge phases of living organ donation.
(a) Standard: Patient and living donor care. The transplant center's patient and donor management policies must ensure that:
(1) Each transplant patient is under the care of a multidisciplinary patient care team coordinated by a physician throughout the transplant and discharge phases of transplantation; and
(2) If a center performs living donor transplants, each living donor is under the care of a multidisciplinary patient care team coordinated by a physician throughout the donor evaluation, donation, and discharge phases of donation.
(b) Standard: Waiting list management. Transplant centers must keep their waiting lists up to date on an ongoing basis, including:
(1) Updating of waiting list patients' clinical information;
(2) Removing patients from the center's waiting list if a patient receives a transplant or dies, or if there is any other reason the patient should no longer be on a center's waiting list; and
(3) Notifying the OPTN no later than 24 hours after a patient's removal from the center's waiting list.
(c) Standard: Patient records. Transplant centers must maintain up-to-date and accurate patient management records for each patient who receives an evaluation for placement on a center's waiting list and who is admitted for organ transplantation.
(1) For each patient who receives an evaluation for placement on a center's waiting list, the center must document in the patient's record that the patient (and in the case of a kidney patient, the patient's usual dialysis facility) has been informed of his or her transplant status, including notification of:
(i) The patient's placement on the center's waiting list;
(ii) The center's decision not to place the patient on its waiting list; or
(iii) The center's inability to make a determination regarding the patient's placement on its waiting list because further clinical testing or documentation is needed.
(2) If a patient on the waiting list is removed from the waiting list for any reason other than death or transplantation, the transplant center must document in the patient's record that the patient (and in the case of a kidney patient, the patient's usual dialysis facility) was notified no later than 10 days after the date the patient was removed from the waiting list.
(3) In the case of patients admitted for organ transplants, transplant centers must maintain written records of:
(i) Multidisciplinary patient care planning during the transplant period; and
(ii) Multidisciplinary discharge planning for post-transplant care.
(d) Standard: Social services. The transplant center must make social services available, furnished by qualified social workers, to transplant patients, living donors, and their families. A qualified social worker is an individual who meets licensing requirements in the State in which he or she practices; and
(1) Completed a course of study with specialization in clinical practice and holds a master's degree from a graduate school of social work accredited by the Council on Social Work Education; or
(2) Is working as a social worker in a transplant center as of the effective date of this final rule and has served for at least 2 years as a social worker, 1 year of which was in a transplantation program, and has established a consultative relationship with a social worker who is qualified under (d)(1) of this paragraph.
(e) Standard: Nutritional services. Transplant centers must make nutritional assessments and diet counseling services, furnished by a qualified dietitian, available to all transplant patients and living donors. A qualified dietitian is an individual who meets practice requirements in the State in which he or she practices and is a registered dietitian with the Commission on Dietetic Registration.
§ 482.96
Condition of participation: Quality assessment and performance improvement (QAPI).
Transplant centers must develop, implement, and maintain a written, comprehensive, data-driven QAPI program designed to monitor and evaluate performance of all transplantation services, including services provided under contract or arrangement.
(a) Standard: Components of a QAPI program. The transplant center's QAPI program must use objective measures to evaluate the center's performance with regard to transplantation activities and outcomes. Outcome measures may include, but are not limited to, patient and donor selection criteria, accuracy of the waiting list in accordance with the OPTN waiting list requirements, accuracy of donor and beneficiary matching, patient and donor management, techniques for organ recovery, consent practices, patient education, patient satisfaction, and patient rights. The transplant center must take actions that result in performance improvements and track performance to ensure that improvements are sustained.
(b) Standard: Adverse events. A transplant center must establish and implement written policies to address and document adverse events that occur during any phase of an organ transplantation case.
(1) The policies must address, at a minimum, the process for the identification, reporting, analysis, and prevention of adverse events.
(2) The transplant center must conduct a thorough analysis of and document any adverse event and must utilize the analysis to effect changes in the transplant center's policies and practices to prevent repeat incidents.
§ 482.98
Condition of participation: Human resources.
The transplant center must ensure that all individuals who provide services and/or supervise services at the center, including individuals furnishing services under contract or arrangement, are qualified to provide or supervise such services.
(a) Standard: Director of a transplant center. The transplant center must be under the general supervision of a qualified transplant surgeon or a qualified physician-director. The director of a transplant center need not serve full-time and may also serve as a center's primary transplant surgeon or transplant physician in accordance with § 482.98(b). The director is responsible for planning, organizing, conducting, and directing the transplant center and must devote sufficient time to carry out these responsibilities, which include but are not limited to the following:
(1) Coordinating with the hospital in which the transplant center is located to ensure adequate training of nursing staff and clinical transplant coordinators in the care of transplant patients and living donors.
(2) Ensuring that tissue typing and organ procurement services are available.
(3) Ensuring that transplantation surgery is performed by, or under the direct supervision of, a qualified transplant surgeon in accordance with § 482.98(b).
(b) Standard: Transplant surgeon and physician. The transplant center must identify to the OPTN a primary transplant surgeon and a transplant physician with the appropriate training and experience to provide transplantation services, who are immediately available to provide transplantation services when an organ is offered for transplantation.
(1) The transplant surgeon is responsible for providing surgical services related to transplantation.
(2) The transplant physician is responsible for providing and coordinating transplantation care.
(c) Standard: Clinical transplant coordinator. The transplant center must have a clinical transplant coordinator to ensure the continuity of care of patients and living donors during the pre-transplant, transplant, and discharge phases of transplantation and the donor evaluation, donation, and discharge phases of donation. The clinical transplant coordinator must be a registered nurse or clinician licensed by the State in which the clinical transplant coordinator practices, who has experience and knowledge of transplantation and living donation issues. The clinical transplant coordinator's responsibilities must include, but are not limited to, the following:
(1) Ensuring the coordination of the clinical aspects of transplant patient and living donor care; and
(2) Acting as a liaison between a kidney transplant center and dialysis facilities, as applicable.
(d) Standard: Independent living donor advocate or living donor advocate team. The transplant center that performs living donor transplantation must identify either an independent living donor advocate or an independent living donor advocate team to ensure protection of the rights of living donors and prospective living donors.
(1) The living donor advocate or living donor advocate team must not be involved in transplantation activities on a routine basis.
(2) The independent living donor advocate or living donor advocate team must demonstrate:
(i) Knowledge of living organ donation, transplantation, medical ethics, and informed consent; and
(ii) Understanding of the potential impact of family and other external pressures on the prospective living donor's decision whether to donate and the ability to discuss these issues with the donor.
(3) The independent living donor advocate or living donor advocate team is responsible for:
(i) Representing and advising the donor;
(ii) Protecting and promoting the interests of the donor; and
(iii) Respecting the donor's decision and ensuring that the donor's decision is informed and free from coercion.
(e) Standard: Transplant team. The transplant center must identify a multidisciplinary transplant team and describe the responsibilities of each member of the team. The team must be composed of individuals with the appropriate qualifications, training, and experience in the relevant areas of medicine, nursing, nutrition, social services, transplant coordination, and pharmacology.
(f) Standard: Resource commitment. The transplant center must demonstrate availability of expertise in internal medicine, surgery, anesthesiology, immunology, infectious disease control, pathology, radiology, blood banking, and patient education as related to the provision of transplantation services.
§ 482.100
Condition of participation: Organ procurement.
The transplant center must ensure that the hospital in which it operates has a written agreement for the receipt of organs with an OPO designated by the Secretary that identifies specific responsibilities for the hospital and for the OPO with respect to organ recovery and organ allocation.
§ 482.102
Condition of participation: Patient and living donor rights.
In addition to meeting the condition of participation “Patients rights” requirements at § 482.13, the transplant center must protect and promote each transplant patient's and living donor's rights.
(a) Standard: Informed consent for transplant patients. Transplant centers must implement written transplant patient informed consent policies that inform each patient of:
(1) The evaluation process;
(2) The surgical procedure;
(3) Alternative treatments;
(4) Potential medical or psychosocial risks;
(5) National and transplant center-specific outcomes, from the most recent SRTR center-specific report, including (but not limited to) the transplant center's observed and expected 1-year patient and graft survival, national 1-year patient and graft survival, and notification about all Medicare outcome requirements not being met by the transplant center;
(6) Organ donor risk factors that could affect the success of the graft or the health of the patient, including, but not limited to, the donor's history, condition or age of the organs used, or the patient's potential risk of contracting the human immunodeficiency virus and other infectious diseases if the disease cannot be detected in an infected donor;
(7) His or her right to refuse transplantation; and
(8) The fact that if his or her transplant is not provided in a Medicare-approved transplant center it could affect the transplant beneficiary 's ability to have his or her immunosuppressive drugs paid for under Medicare Part B.
(b) Standard: Informed consent for living donors. Transplant centers must implement written living donor informed consent policies that inform the prospective living donor of all aspects of, and potential outcomes from, living donation. Transplant centers must ensure that the prospective living donor is fully informed about the following:
(1) The fact that communication between the donor and the transplant center will remain confidential, in accordance with the requirements at 45 CFR parts 160 and 164.
(2) The evaluation process;
(3) The surgical procedure, including post-operative treatment;
(4) The availability of alternative treatments for the transplant beneficiary;
(5) The potential medical or psychosocial risks to the donor;
(6) The national and transplant center-specific outcomes for beneficiaries, and the national and center-specific outcomes for living donors, as data are available;
(7) The possibility that future health problems related to the donation may not be covered by the donor's insurance and that the donor's ability to obtain health, disability, or life insurance may be affected;
(8) The donor's right to opt out of donation at any time during the donation process; and
(9) The fact that if a transplant is not provided in a Medicare-approved transplant center it could affect the transplant beneficiary's ability to have his or her immunosuppressive drugs paid for under Medicare Part B.
(c) Standard: Notification to patients. Transplant centers must notify patients placed on the center's waiting list of information about the center that could impact the patient's ability to receive a transplant should an organ become available, and what procedures are in place to ensure the availability of a transplant team.
(1) A transplant center served by a single transplant surgeon or physician must inform patients placed on the center's waiting list of:
(i) The potential unavailability of the transplant surgeon or physician; and
(ii) Whether the center has a mechanism to provide an alternate transplant surgeon or transplant physician.
(2) At least 30 days before a center's Medicare approval is terminated, whether voluntarily or involuntarily, the center must:
(i) Inform patients on the center's waiting list and provide assistance to waiting list patients who choose to transfer to the waiting list of another Medicare-approved transplant center without loss of time accrued on the waiting list; and
(ii) Inform Medicare beneficiaries on the center's waiting list that Medicare will no longer pay for transplants performed at the center after the effective date of the center's termination of approval.
(3) As soon as possible prior to a transplant center's voluntary inactivation, the center must inform patients on the center's waiting list and, as directed by the Secretary, provide assistance to waiting list patients who choose to transfer to the waiting list of another Medicare-approved transplant center without loss of time accrued on the waiting list.
§ 482.104
Condition of participation: Additional requirements for kidney transplant centers.
(a) Standard: End stage renal disease (ESRD) services. Kidney transplant centers must directly furnish transplantation and other medical and surgical specialty services required for the care of ESRD patients. A kidney transplant center must have written policies and procedures for ongoing communications with dialysis patients' local dialysis facilities.
(b) Standard: Dialysis services. Kidney transplant centers must furnish inpatient dialysis services directly or under arrangement.
(c) Standard: Participation in network activities. Kidney transplant centers must cooperate with the ESRD Network designated for their geographic area, in fulfilling the terms of the Network's current statement of work.