119 S2681 IS: Lowering Electric Bills Act
U.S. Senate
2025-08-02
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
II
119th CONGRESS
1st Session
S. 2681
IN THE SENATE OF THE UNITED STATES
August 2, 2025
Mr. Schumer (for himself, Mr. Wyden, Mr. Warner, Ms. Cantwell, Mr. Bennet, Mr. Schatz, Mr. Durbin, Ms. Duckworth, Mr. Reed, Mr. Hickenlooper, Mr. Gallego, Mr. Blumenthal, Mr. Van Hollen, Mr. Kim, Ms. Warren, Mrs. Gillibrand, Ms. Klobuchar, Mrs. Shaheen, Ms. Rosen, Mr. Padilla, Mr. Booker, Mr. Kelly, Ms. Smith, Mr. King, Ms. Hirono, Mrs. Murray, Mr. Markey, Ms. Slotkin, Mr. Coons, Mr. Whitehouse, Ms. Alsobrooks, Ms. Blunt Rochester, Mr. Merkley, and Mr. Ossoff) introduced the following bill; which was read twice and referred to the Committee on Finance
A BILL
To amend the Internal Revenue Code of 1986 to extend the availability of certain clean energy credits.
1.

Short title
This Act may be cited as the “Lowering Electric Bills Act”.
2.

Extension of certain clean energy credits
(a)

Residential clean energy credit
(1)

In general
Section 25D(h) of the Internal Revenue Code of 1986, as amended by section 70506(a) of Public Law 119–21, is amended by striking “December 31, 2025” and inserting “December 31, 2034”.
(2)

Effective date
The amendment made by this section shall take effect as if included in the enactment of section 70506 of Public Law 119–21.
(b)

Clean electricity production credit
(1)

In general
Section 45Y of the Internal Revenue Code of 1986, as amended by section 70512 of Public Law 119–21, is amended—
(A)
in subsection (d)—
(i)
in paragraph (1), by striking “Subject to paragraph (4), the amount of” and inserting “The amount of”, and
(ii)
by striking paragraphs (3) and (4) and inserting the following new paragraph:
“(3)

Applicable year
For purposes of this subsection, the term applicable year means the later of—
(A)
the calendar year in which the Secretary determines that the annual greenhouse gas emissions from the production of electricity in the United States are equal to or less than 25 percent of the annual greenhouse gas emissions from the production of electricity in the United States for calendar year 2022, or
(B)
2032.”, and
(B)
by striking subsection (h).
(2)

Effective date
The amendments made by this section shall take effect as if included in the enactment of section 70512 of Public Law 119–21.
(c)

Clean electricity investment credit
(1)

In general
Section 48E of the Internal Revenue Code of 1986, as amended by section 70513 of Public Law 119–21, is amended—
(A)
in subsection (e)—
(i)
in paragraph (1), by striking “Subject to paragraph (4), the amount of” and inserting “The amount of”, and
(ii)
by striking paragraph (4),
(B)
by striking subsection (i), and
(C)
by redesignating subsection (j) as subsection (i).
(2)

Effective date
The amendments made by this section shall take effect as if included in the enactment of section 70513 of Public Law 119–21.