119 S2317 IS: Federal Advisory Committee Database Act
U.S. Senate
2025-07-17
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
II
119th CONGRESS
1st Session
S. 2317
IN THE SENATE OF THE UNITED STATES
July 17, 2025
Mr. Peters (for himself and Mr. Cassidy) introduced the following bill; which was read twice and referred to the Committee on Homeland Security and Governmental Affairs
A BILL
To amend title 5, United States Code, to address the responsibilities of the Administrator of General Services with respect to Federal advisory committees, and for other purposes.
1.

Short title
This Act may be cited as the “Federal Advisory Committee Database Act”.
2.

Federal advisory committees
Chapter 10 of title 5, United States Code, is amended—
(1)
in section 1006—
(A)
in subsection (a)—
(i)
by striking “The Administrator” and inserting the following:
“(1)

In general
The Administrator”; and
(ii)
by adding at the end the following:
“(2)

Collection of information
(A)

In general
The Committee Management Secretariat established and maintained under paragraph (1) shall continually collect from the head of each agency such information as is necessary for the Administrator to carry out the responsibilities of the Administrator under this section, which shall include, at a minimum, the following with respect to each advisory committee within the jurisdiction of that agency:
(i)
The name of the advisory committee.
(ii)
The authority under which the advisory committee is established.
(iii)
A copy of the charter of the advisory committee.
(iv)
The interest areas of the advisory committee.
(v)
The means by which the advisory committee complies with the requirements of section 1004(b)(2) (commonly referred to as a “Membership Balance Plan”).
(vi)
The current (as of the date on which the information is collected) membership of the advisory committee, which shall include, at a minimum, the following with respect to each member of the advisory committee:
(I)
The name of the member.
(II)
The ethics designation of the member, such as whether the member is an employee, a special Government employee (as defined in section 202 of title 18), or a representative member.
(III)
The entity or individual who appointed the member to the advisory committee, which shall include an identification of the authority for that appointment.
(IV)
The term of the appointment of the member to the advisory committee, as appropriate.
(vii)
The Advisory Committee Management Officer designated under section 1007(b) with respect to the advisory committee.
(viii)
The officer or employee designated under section 1009(e) with respect to the advisory committee.
(ix)
The termination date of the advisory committee, if applicable.
(x)
With respect to a particular fiscal year, the total operational and staff costs of the advisory committee for that fiscal year, and with respect to the forthcoming fiscal year, the estimated total operational and staff costs of the advisory committee for that forthcoming fiscal year.
(xi)
The frequency with which the advisory committee (excluding any subcommittee or other subgroup of the advisory committee) has met and the dates on which those meetings have taken place.
(xii)
A summary of the business conducted at each meeting of the advisory committee.
(xiii)
The recommendations issued by the advisory committee, which shall include—
(I)
the number of those recommendations; and
(II)
if feasible, information regarding whether those recommendations were partially or fully implemented.
(B)

Publication
The Committee Management Secretariat established and maintained under paragraph (1) shall, with respect to the information collected under subparagraph (A) of this paragraph—
(i)
annually publish that information on a public website of the General Services Administration, which shall allow for that information to be downloaded in a format that is machine-readable, as defined in section 3502 of title 44; and
(ii)
on the website described in clause (i) of this subparagraph, maintain access to that information from previous years, as applicable with respect to relevant records schedules.”;
(B)
in subsection (b)—
(i)
in paragraph (1)—
(I)
in the matter preceding subparagraph (A), by inserting “, in consultation with the head of each agency,” after “the Administrator”;
(II)
by redesignating subparagraphs (C) and (D) as subparagraphs (D) and (E), respectively; and
(III)
by inserting after subparagraph (B) the following:
“(C)
whether the committee, for the period covered by the review, complied with the requirements of subsection (a)(2);”; and
(ii)
by amending paragraph (3) to read as follows:
“(3)

Biennial report and recommendations
The Administrator shall biennially submit to the Committee on Homeland Security and Governmental Affairs of the Senate and the Committee on Oversight and Government Reform of the House of Representatives a report containing the results of the 2 most recent reviews conducted under this subsection, which shall include recommendations to the President and to either the agency head or Congress with respect to action the Administrator believes should be taken.”; and
(C)
in subsection (c)—
(i)
in the first sentence—
(I)
by striking “administrative guidelines and management controls” and inserting “regulations, administrative guidelines, and management controls”; and
(II)
by inserting after “their performance” the following: “, which shall include guidance regarding how the agency and the advisory committees of the agency should prepare the information that is required to be submitted under subsection (a)(2) to ensure standardization and consistency in the reporting of that information”; and
(ii)
by adding at the end the following: “The Administrator may update the regulations, administrative guidelines, and management controls prescribed under this subsection, as determined necessary by the Administrator.”; and
(2)
in section 1007—
(A)
by amending subsection (a) to read as follows:
“(a)

Administrative guidelines and management controls
Each agency head shall—
(1)
establish uniform administrative guidelines and management controls for advisory committees established by that agency, which shall be consistent with directives of the Administrator under sections 1006 and 1009 of this title;
(2)
maintain systematic information on the nature, functions, and operations of each advisory committee established by that agency;
(3)
ensure timely and accurate reporting to the Administrator regarding the activities of each advisory committee established by that agency, including with respect to the information required to be submitted under section 1006(a)(2);
(4)
in coordination with each officer or employee of the Federal Government designated under section 1009(e), establish relevant and appropriate performance measures and outcomes for each advisory committee established by that agency; and
(5)
ensure that each advisory committee established by that agency, and the staff of each such advisory committee (including each officer or employee of the Federal Government designated under section 1009(e)), complies with the requirements of this chapter and the rules, orders, and regulations promulgated under this chapter.”; and
(B)
in subsection (b)—
(i)
in paragraph (2)—
(I)
by inserting “recommendations,” after “records,”; and
(II)
by striking “and” at the end;
(ii)
in paragraph (3)—
(I)
by striking “such reports, records, and other papers” and inserting “the reports, records, recommendations, and other papers described in paragraph (2)”; and
(II)
by striking the period at the end and inserting “; and”; and
(iii)
by adding at the end the following:
“(4)
serve as the primary liaison between the agency and the Administrator.”.
3.

No additional funds
No additional funds are authorized to be appropriated for the purpose of carrying out this Act or the amendments made by this Act.