119 S1485 IS: North American Energy Act
U.S. Senate
2025-04-10
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
II
119th CONGRESS
1st Session
S. 1485
IN THE SENATE OF THE UNITED STATES
April 10, 2025
Mr. Hoeven introduced the following bill; which was read twice and referred to the Committee on Energy and Natural Resources
A BILL
To establish a more uniform, transparent, and modern process to authorize the construction, connection, operation, and maintenance of international border-crossing facilities for the import and export of oil and natural gas and the transmission of electricity.
1.

Short title
This Act may be cited as the “North American Energy Act”.
2.

Approval for border-crossing facilities
(a)

Definitions
In this section:
(1)

Appropriate Federal agencies
The term appropriate Federal agencies means the Secretary of Defense, the Attorney General, the Secretary of the Interior, the Secretary of Commerce, the Secretary of Transportation, the Secretary of Energy, the Secretary of Homeland Security, the Administrator of the Environmental Protection Agency, and, for applications concerning the border with Mexico, the United States Commissioner of the International Boundary and Water Commission.
(2)

Border-crossing facility
The term border-crossing facility means—
(A)
the portion of an oil pipeline between an international boundary and the first mainline valve on the United States side of an international boundary; and
(B)
the portion of a natural gas pipeline or electric transmission facility that is located at an international boundary of the United States.
(3)

Electric Reliability Organization; Regional entity
The terms Electric Reliability Organization and regional entity have the meanings given those terms in section 215 of the Federal Power Act (16 U.S.C. 824o).
(4)

Independent System Operator; Regional Transmission Organization
The terms Independent System Operator and Regional Transmission Organization have the meanings given those terms in section 3 of the Federal Power Act (16 U.S.C. 796).
(5)

Modification
The term modification includes a reversal of flow direction, change in ownership, change in flow volume, change in product delivered, addition or removal of an interconnection, or an adjustment to regulate flow (such as a reduction or increase in the number of pump or compressor stations or valves).
(6)

Natural gas
The term natural gas has the meaning given that term in section 2 of the Natural Gas Act (15 U.S.C. 717a).
(7)

Oil
The term oil means petroleum or a petroleum product.
(b)

Authorization of certain energy infrastructure projects at an international boundary of the United States
(1)

Authorization
Except as provided in paragraph (3) and subsection (f), no person may construct, connect, or operate, a border-crossing facility for the import or export of oil or natural gas, or the transmission of electricity, across an international border of the United States without obtaining a certificate of crossing for the border-crossing facility under this subsection.
(2)

Certificate of crossing
(A)

Requirement
Not later than 90 days after final action is taken, by the relevant official or agency identified under subparagraph (B), under the National Environmental Policy Act of 1969 (42 U.S.C. 4321 et seq.) with respect to a border-crossing facility for which a person requests a certificate of crossing under this subsection, the relevant official or agency, in consultation with appropriate Federal agencies, shall issue a certificate of crossing for the border-crossing facility unless the relevant official or agency finds that the construction, connection, or operation, of the border-crossing facility is not in the public interest of the United States.
(B)

Relevant official or agency
The relevant official or agency referred to in subparagraph (A) is—
(i)
the Federal Energy Regulatory Commission with respect to border-crossing facilities consisting of oil or natural gas pipelines; and
(ii)
the Secretary of Energy with respect to border-crossing facilities consisting of electric transmission facilities.
(C)

Additional requirement for electric transmission facilities
In the case of a request for a certificate of crossing for a border-crossing facility consisting of an electric transmission facility, the Secretary of Energy shall require, as a condition of issuing the certificate of crossing under subparagraph (A), that the border-crossing facility be constructed, connected, operated, or maintained consistent with all applicable policies and standards of—
(i)
the Electric Reliability Organization and the applicable regional entity; and
(ii)
any Regional Transmission Organization or Independent System Operator with operational or functional control over the border-crossing facility.
(3)

Exclusions
This subsection shall not apply to any construction, connection, operation, or maintenance of a border-crossing facility for the import or export of oil or natural gas, or the transmission of electricity—
(A)
if the border-crossing facility is operating for such import, export, or transmission as of the date of enactment of this Act;
(B)
if a permit described in subsection (e) for the construction, connection, operation, or maintenance has been issued; or
(C)
if an application for a permit described in subsection (e) for the construction, connection, operation, or maintenance is pending on the date of enactment of this Act, until the earlier of—
(i)
the date on which such application is denied; or
(ii)
2 years after the date of enactment of this Act, if such a permit has not been issued by such date.
(4)

Effect of other laws
(A)

Application to projects
Nothing in this subsection or subsection (f) shall affect the application of any other Federal statute to a project for which a certificate of crossing for a border-crossing facility is requested under this subsection.
(B)

Natural Gas Act
Nothing in this subsection or subsection (f) shall affect the requirement to obtain approval or authorization under sections 3 and 7 of the Natural Gas Act (15 U.S.C. 717b, 717f) for the siting, construction, or operation of any facility to import or export natural gas.
(C)

Oil pipelines
Nothing in this subsection or subsection (f) shall affect the authority of the Federal Energy Regulatory Commission with respect to oil pipelines under section 60502 of title 49, United States Code.
(D)

Scope of NEPA review
Nothing in this Act, or the amendments made by this Act, shall affect the scope of any review required to be conducted under section 102 of the National Environmental Policy Act of 1969 (42 U.S.C. 4332) with respect to a project for which a certificate of crossing for a border-crossing facility is requested under this subsection.
(c)

Importation or exportation of natural gas to canada and mexico
Section 3(c) of the Natural Gas Act (15 U.S.C. 717b(c)) is amended by adding at the end the following: “In the case of an application for the importation of natural gas from, or the exportation of natural gas to, Canada or Mexico, the Commission shall grant the application not later than 30 days after the date on which the Commission receives the complete application.”.
(d)

Transmission of electric energy to Canada and Mexico
(1)

Repeal of requirement to secure order
Section 202(e) of the Federal Power Act (16 U.S.C. 824a(e)) is repealed.
(2)

Conforming amendments
(A)

State regulations
Section 202(f) of the Federal Power Act (16 U.S.C. 824a(f)) is amended by striking “insofar as such State regulation does not conflict with the exercise of the Commission's powers under or relating to subsection (e)”.
(B)

Seasonal diversity electricity exchange
Section 602(b) of the Public Utility Regulatory Policies Act of 1978 (16 U.S.C. 824a–4(b)) is amended by striking “the Commission has conducted hearings and made the findings required under section 202(e) of the Federal Power Act” and all that follows through the period at the end and inserting “the Secretary has conducted hearings and finds that the proposed transmission facilities would not impair the sufficiency of electric supply within the United States or would not impede or tend to impede the coordination in the public interest of facilities subject to the jurisdiction of the Secretary.”.
(e)

No presidential permit required
No Presidential permit (or similar permit) shall be required pursuant to any provision of law or Executive order for the construction, connection, operation, or maintenance of an oil or natural gas pipeline or electric transmission facility, or any border-crossing facility thereof.
(f)

Modifications to and maintenance of existing projects
No certificate of crossing under subsection (b), or permit described in subsection (e), shall be required for a modification to or maintenance of—
(1)
an oil or natural gas pipeline or electric transmission facility that is operating for the import or export of oil or natural gas or the transmission of electricity as of the date of enactment of this Act;
(2)
an oil or natural gas pipeline or electric transmission facility for which a permit described in subsection (e) has been issued; or
(3)
a border-crossing facility for which a certificate of crossing has previously been issued under subsection (b).
(g)

Effective dates; rulemaking deadlines
(1)

Effective date
Subsections (b) through (f) and the amendments made by such subsections shall take effect on the date that is 1 year after the date of enactment of this Act.
(2)

Rulemaking deadlines
Each relevant official or agency described in subsection (b)(2)(B) shall—
(A)
not later than 180 days after the date of enactment of this Act, publish in the Federal Register notice of a proposed rulemaking to carry out the applicable requirements of subsection (b); and
(B)
not later than 1 year after the date of enactment of this Act, publish in the Federal Register a final rule to carry out the applicable requirements of subsection (b).
(h)

Judicial review
(1)

In general
Any entity aggrieved by a final agency action taken under this section may obtain a review of such action by filing a petition for review in the United States Court of Appeals for any circuit wherein an applicant for authorization under this section is located or has its principal place of business, or in the United States Court of Appeals for the District of Columbia.
(2)

Deadline
A petition for review under paragraph (1) must be filed not later than 60 days after a final agency action is taken under this section.