90 S1383 ES: Veterans Accessibility Advisory Committee Act of 2025
U.S. Senate
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
119th CONGRESS
1st Session
S. 1383
IN THE SENATE OF THE UNITED STATES
AN ACT
To establish the Veterans Advisory Committee on Equal Access, and for other purposes.
1.

Short title
This Act may be cited as the “Veterans Accessibility Advisory Committee Act of 2025”.
2.

Veterans Advisory Committee on Equal Access
(a)

Establishment
(1)

In general
Not later than 180 days after the date of the enactment of this Act, the Secretary of Veterans Affairs shall establish within the Department of Veterans Affairs an advisory committee on matters relating to accessibility of the Department for individuals with disabilities.
(2)

Designation
The advisory committee established by paragraph (1) shall be known as the “Veterans Advisory Committee on Equal Access” (in this section the “Advisory Committee”).
(b)

Membership
(1)

Voting members
The Advisory Committee shall be composed of 15 voting members, appointed by the Secretary. In appointing such members, the Secretary shall ensure the following:
(A)
Four are veterans with disabilities, including mobility impairment, hearing, visual, and mental or cognitive disabilities.
(B)
Four are experts on issues described in subsection (f)(1)(A) or the provisions of law set forth under subsection (f)(1)(B).
(C)
Two are employees of the Department, one from the Section 508 Office and one from the Architectural Accessibility Program, or successor programs or offices, who oversee the compliance of the Department with Federal accessibility laws.
(D)
Five are representatives nominated by national veterans service organizations that advocate for veterans with physical, sensory, mental, or cognitive disabilities.
(2)

Ex officio members
The Advisory Committee shall also include four ex officio members (or their designees):
(A)
The Under Secretary for Health.
(B)
The Under Secretary for Benefits.
(C)
The Under Secretary for Memorial Affairs.
(D)
The chairperson of the Architectural and Transportation Barriers Compliance Board (known as the “Access Board”).
(3)

Qualifications
In selecting members under paragraph (1), in addition to any qualifications described in such paragraph, the Secretary of Veterans Affairs shall ensure that members are selected based on their ability to support the success of the Advisory Committee.
(c)

Terms; vacancies
(1)

Terms
A member of the Advisory Committee shall be appointed for a term of two years. The Secretary may reappoint members to the Advisory Committee for such additional two-year terms as the Secretary determines appropriate.
(2)

Vacancies
The Secretary shall fill a vacancy in the Advisory Committee in the same manner as the original appointment not later than 180 days after such vacancy occurs.
(d)

Meetings
(1)

Frequency
The Advisory Committee shall meet not less frequently than twice each year.
(2)

Subcommittees
The Advisory Committee may form subcommittees, which shall meet as often as required.
(3)

Quorum
A majority of the members of the Advisory Committee shall constitute a quorum.
(e)

Chairperson and Vice Chairperson
The Secretary shall select a Chairperson and Vice Chairperson from among the members of the Advisory Committee. If the position of Chairperson or Vice Chairperson becomes vacant, the Secretary of Veterans Affairs shall select a new Chairperson or Vice Chairperson, as the case may be, not later than 30 days after the date on which the position became vacant.
(f)

Duties
(1)

Requirement to consult and seek advice
On a regular basis, the Secretary shall consult with and seek the advice of the Advisory Committee—
(A)
on improving the accessibility of the Department for individuals with disabilities, including improving—
(i)
the accessibility of information of the Department, including electronic information;
(ii)
the accessibility of the services and benefits furnished by the Department;
(iii)
the accessibility in facilities or on property of the Department;
(iv)
the accessibility of facilities of non-Department benefits services providers or health care providers furnishing care or services under programs administered by the Department, including under the Veterans Community Care Program under section 1703 of title 38, United States Code; and
(v)
the acquisition process of the Department to ensure that products and services, including information technology and information and communication technology (as defined in the standards issued by the Architectural and Transportation Barriers Compliance Board pursuant to section 508 of the Rehabilitation Act of 1973 (29 U.S.C. 794d)), are accessible when purchased; and
(B)
for ensuring the compliance of the Department with provisions of law, where applicable, relating to disability and accessibility, including—
(i)
the Americans with Disabilities Act of 1990 (42 U.S.C. 12184 et seq.);
(ii)
sections 504 and 508 of the Rehabilitation Act of 1973 (29 U.S.C. 791, 794, and 794d);
(iii)
the Plain Writing Act of 2010 (5 U.S.C. 301 note);
(iv)
the 21st Century Integrated Digital Experience Act (44 U.S.C. 3501 note);
(v)
the Architectural Barriers Act of 1968 (Public Law 90–480); and
(vi)
such other provisions of Federal law as may be that ensure equal access to Federal properties and facilities, benefits, or services for individuals with disabilities.
(2)

Provision of advice
In providing advice to the Secretary, the Advisory Committee shall, focusing on the areas of greatest need for the Department—
(A)
assess the disability access needs of veterans, the public, and Department employees for full access to the Department’s information, services, and benefits by reviewing relevant information, such as filed complaints by people with disabilities or physical assessments of the Department’s properties and facilities;
(B)
provide assessments of accessibility at the Department and the compliance of the Department with applicable provisions of law relating to disability and accessibility; and
(C)
provide advice on improving accessibility at the Department, including the accessibility of all—
(i)
communications, including internal and public facing;
(ii)
services and benefits; and
(iii)
facilities.
(3)

Reports
(A)

Reports to the Secretary
Not later than two years after the date of the first meeting of the Advisory Committee, and not less frequently than once every two years thereafter, the Advisory Committee shall submit to the Secretary a report that, focusing on areas of greatest need for the Department—
(i)
identifies and assesses access barriers affecting veterans, the public, and employees of the Department;
(ii)
determines the extent to which the programs and activities of the Department address the barriers identified in clause (i), including compliance of the Department with provisions of law relating to accessibility law and reporting;
(iii)
provides recommendations and access priorities to improve the accessibility of the Department’s services, benefits, information, technology, and facilities;
(iv)
provides a description of access improvements and assesses the Department’s implementation of recommendations from previous reports of the Advisory Committee, including any unmet recommendations that remain necessary for improving accessibility for the Department; and
(v)
provides any recommendations for legislation, administrative action, or other actions that the Advisory Committee determines appropriate.
(B)

Reports to Congress and Federal agencies
(i)

In general
Not later than 180 days after the receipt of a report required under subparagraph (A), the Secretary shall submit to the appropriate congressional committees a copy of such report and any comments and recommendations of the Secretary concerning such report that the Secretary determines appropriate.
(ii)

Availability to the public
The Secretary shall publish on a publicly accessible website of the Department such report and such comments and recommendations as may have been submitted along with such report.
(iii)

Appropriate congressional committees
In this subparagraph, the term appropriate congressional committees means—
(I)
the Committees on Veterans’ Affairs of the Senate and House of Representatives;
(II)
the Special Committee on Aging of the Senate; and
(III)
the Committee on Education and the Workforce of the House of Representatives.
(g)

Advisory Committee personnel and resource matters
(1)

Compensation of members
(A)
A member of the Advisory Committee who is not an officer or employee of the Federal Government shall not be compensated for the performance of the duties of the Advisory Committee.
(B)
Members of the Advisory Committee who are officers or employees of the Federal Government shall not receive additional compensation beyond travel for the performance of the duties of the Advisory Committee.
(2)

Travel expenses
A member of the Advisory Committee shall be allowed travel expenses, including per diem in lieu of subsistence, at rates authorized for employees of agencies under subchapter I of chapter 57 of title 5, United States Code, while away from their homes or regular places of business in the performance of services for the Advisory Committee.
(3)

Resources
The Secretary shall ensure that such personnel, funding, and other resources are made available to the Advisory Committee as the Secretary determines appropriate to carry out the duties of the Advisory Committee.
(4)

Information
The Secretary shall furnish to the Advisory Committee such information as the Advisory Committee may request from the Secretary, subject to applicable provisions of law.
(h)

Termination of Advisory Committee
The Advisory Committee shall terminate on the date that is 10 years after the date of the enactment of this Act.
Passed the Senate December 18, 2025.
Secretary