119 HR 6075 IH: Water Infrastructure Modernization Act of 2025
U.S. House of Representatives
2025-11-18
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
I
119th CONGRESS
1st Session
H. R. 6075
IN THE HOUSE OF REPRESENTATIVES
November 18, 2025
Mr. Bresnahan (for himself and Ms. McDonald Rivet) introduced the following bill; which was referred to the Committee on Transportation and Infrastructure
A BILL
To amend the Federal Water Pollution Control Act to reauthorize the pilot program for alternative water source projects, and for other purposes.
1.

Short title
This Act may be cited as the “Water Infrastructure Modernization Act of 2025”.
2.

Intelligent water infrastructure technology
Section 220 of the Federal Water Pollution Control Act (33 U.S.C. 1300) is amended—
(1)
in subsection (b), by adding at the end the following:
“(3)

Intelligent water infrastructure technology
The term intelligent water infrastructure technology means—
(A)
intelligent wastewater treatment and collection systems and stormwater management operations, including technologies that rely on—
(i)
the use of real-time monitoring, management, analytics, and data collection tools, embedded intelligence, and predictive maintenance capabilities that improve the energy efficiency, cost efficiency, reliability, and resiliency of wastewater treatment and collection systems;
(ii)
real-time remote sensors that provide continuous monitoring of water quality to support optimization; and
(iii)
the use of artificial intelligence and other intelligent optimization tools that—
(I)
reduce operational costs, including operational costs relating to energy consumption and chemical treatment; and
(II)
improve decisionmaking;
(B)
innovative and alternative combined sewer and stormwater control projects, including groundwater banking, that rely on real-time data acquisition to support predictive aquifer recharge through water reuse and stormwater management capabilities;
(C)
advanced digital design and construction management tools, including advanced digital technologies;
(D)
technology that can identify or reduce water losses in a nondestructive or nondisruptive manner, including through analytical software, flow and pressure monitoring, or acoustic data collection;
(E)
predictive and diagnostic tools for informed decisionmaking;
(F)
technology that can provide comprehensive data on pipe integrity to identify the presence of leaks or gas pockets;
(G)
technology that can provide information on the extent of leaks or gas pockets, with an emphasis on detecting weakness of, vulnerability of, or damage to pipe barrels, pipe joints, or other pipe features;
(H)
real-time remote sensing technologies, including the use of advanced data management and analytics, that detect and alert owners and operators to wastewater and water supply treatment facilities operations, including leakages, and pipe bursts on a real-time basis, including persistent sensor networks capable of measuring—
(i)
acoustic signals;
(ii)
pressure transient;
(iii)
water quality; or
(iv)
water flow;
(I)
advanced metering infrastructure, including meter data analytics and ratepayer technology—
(i)
to improve end-user conservation; and
(ii)
in support of disadvantaged communities;
(J)
resilient water supply projects that may provide real-time monitoring of weather patterns and weather-related impacts on water quality and flood protection reservoirs and dams that enhance operations, including—
(i)
improved water supply reliability and management;
(ii)
protection of natural resources, including fisheries; and
(iii)
temperature control;
(K)
innovative and alternative water supply projects, including groundwater banking, that rely on real-time data acquisition to support predictive aquifer recharge through water reuse and stormwater management capabilities;
(L)
artificial intelligence and other intelligent optimization tools that—
(i)
reduce operational costs, including costs relating to energy consumption and chemical treatment of wastewater and stormwater; and
(ii)
improve decisionmaking; and
(M)
advanced digital design and construction management technologies and tools relating to water treatment systems and distribution networks the development of advanced digital models.”;
(2)
by striking subsection (f) and inserting the following:
“(f)

Uses of grants
(1)

In general
Amounts from grants received under this section may be used for engineering, design, construction, and final testing of alternative water source projects designed to meet critical water supply needs.
(2)

Prohibition
Amounts from grants received under this section may not be used for planning, feasibility studies, operation, or maintenance.
(3)

Intelligent water infrastructure technologies
(A)

In general
Amounts from grants received under this section may be used for engineering, design, construction, implementation, training, and operations relating to the adoption and use of intelligent water infrastructure technology.
(B)

Applicability
For purposes of paragraph (2), any costs with respect to intelligent water infrastructure technology shall not be considered operation or maintenance costs.”;
(3)
by striking subsection (h) and inserting the following:
“(h)

Reports
(1)

In general
Not later than 180 days after the date of enactment of the Water Infrastructure Modernization Act of 2025, and not less frequently than annually thereafter, the Administrator shall submit to Congress a report that—
(A)
describes—
(i)
the projects awarded grants for the purposes described in subsection (f)(3); and
(ii)
the improvements in the resiliency that resulted from grants awarded under this section; and
(B)
includes any recommendations of the Administrator to improve the ability of grants under this section to achieve the uses described in subsection (f).
(2)

Initial report
In the initial report required under paragraph (1), the Administrator shall include a description of the implementation of this section, including a description of—
(A)
the projects for which a grant was sought under this section for the purposes described in subsection (f)(3) that were denied; and
(B)
for each of the projects described in subparagraph (A), the reasons for which the grant was denied.”; and
(4)
in subsection (i)(1)—
(A)
by striking “$25,000,000” and inserting “$50,000,000”; and
(B)
by striking “2026” and inserting “2028”.