91 HR 1455 RH: Institute for Telecommunication Sciences Codification Act
U.S. House of Representatives
2025-06-30
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
IB
Union Calendar No. 142
119th CONGRESS
1st Session
H. R. 1455
[Report No. 119–176]
IN THE HOUSE OF REPRESENTATIVES
February 21, 2025
Mr. Carter of Georgia (for himself and Ms. Pettersen) introduced the following bill; which was referred to the Committee on Energy and Commerce
June 30, 2025
Committed to the Committee of the Whole House on the State of the Union and ordered to be printed
A BILL
To codify the Institute for Telecommunication Sciences and to direct the Assistant Secretary of Commerce for Communications and Information to establish an initiative to support the development of emergency communication and tracking technologies, and for other purposes.
1.

Short title
This Act may be cited as the “Institute for Telecommunication Sciences Codification Act” or the “ITS Codification Act”.
2.

Institute for Telecommunication Sciences
(a)

Findings
Congress finds the following:
(1)
The test center within the National Telecommunications and Information Administration (in this subsection referred to as the “NTIA”) represents executive branch agencies on spectrum issues before the Federal Communications Commission.
(2)
Understanding radio frequency propagation characteristics and modeling is a critical component of making spectrum decisions.
(3)
Federal agencies rely on expert engineering studies, simulations, and analyses to make determinations about how to make spectrum available for commercial use, including through system relocations and identifying spectrum sharing opportunities through the NTIA.
(4)
Clearing of Federal spectrum, when feasible, is the priority action to take to make Federal spectrum available for commercial uses as required by section 113(j)(1) of the National Telecommunications and Information Administration Organization Act (47 U.S.C. 923(j)(1)).
(5)
Sharing of Federal spectrum between Federal entities and commercial entities provides access to Federal spectrum for commercial uses in circumstances where clearing is not feasible.
(6)
The test center within the NTIA is the Government’s premier expert laboratory for spectrum research activities, spectrum sharing innovation and testing, spectrum interference studies, and all activities related to advancing next generation wireless technologies.
(7)
The test center within the NTIA is critical for undertaking engineering studies and analyses that inform clearing or sharing opportunities and facilitate policy decisions to maximize the efficient use of spectrum resources.
(b)

Operation of test center
Part A of the National Telecommunications and Information Administration Organization Act (47 U.S.C. 901 et seq.) is amended by adding at the end the following:
“106.

Institute for Telecommunication Sciences
(a)

Establishment
(1)

In general
Under the authority provided to the Assistant Secretary under section 103, the Assistant Secretary shall operate a test center to be known as the Institute for Telecommunication Sciences (in this section referred to as “ITS”).
(2)

Functions
(A)

In general
In addition to any functions delegated by the Assistant Secretary under subparagraph (B), ITS shall serve as the primary laboratory for the executive branch of the Federal Government to—
(i)
study radio frequency emissions, including technologies and techniques to control such emissions and interference caused by such emissions;
(ii)
determine spectrum propagation characteristics;
(iii)
conduct tests on technology that enhances the sharing of electromagnetic spectrum between Federal and non-Federal users;
(iv)
improve the interference tolerance of Federal systems operating with, or using, Federal spectrum;
(v)
promote activities relating to access to Federal spectrum by non-Federal users and the sharing of Federal spectrum between Federal and non-Federal users; and
(vi)
conduct such other activities as determined necessary by the Assistant Secretary.
(B)

Additional functions
The Assistant Secretary may delegate to ITS any of the functions assigned to the Assistant Secretary under section 103(b)(1).
(3)

Agreements and transactions
In carrying out the functions described in paragraph (2), the Assistant Secretary, acting through the head of ITS, may enter into agreements as provided under the following authorities:
(A)
Sections 11 and 12 of the Stevenson-Wydler Technology Innovation Act of 1980 (15 U.S.C. 3710; 3710a).
(B)
Section 1535 of title 31, United States Code.
(C)
Sections 207 and 209 of title 35, United States Code.
(D)
Section 103(b)(2) of this Act.
(E)
Section 113(g) of this Act.
(F)
The first undesignated section of Public Law 91–412.
(G)
Any authorization in any other Federal statute.
(4)

Federal spectrum defined
In this subsection, the term Federal spectrum means frequencies assigned on a primary basis to a Federal entity (as defined in section 113(l)).
(b)

Emergency communication and tracking technologies initiative
(1)

Establishment
The Assistant Secretary, acting through the head of ITS, shall establish an initiative to support the development of emergency communication and tracking technologies for use in locating trapped individuals in confined spaces, such as underground mines, and other shielded environments, such as high-rise buildings or collapsed structures, where conventional radio communication is limited.
(2)

Activities
In order to carry out this subsection, the Assistant Secretary, acting through the head of ITS, shall work with private sector entities and the heads of appropriate Federal agencies, to—
(A)
perform a needs assessment to identify and evaluate the measurement, technical specifications, and conformity assessment needs required to improve the operation and reliability of such emergency communication and tracking technologies; and
(B)
support the development of technical specifications and conformance architecture to improve the operation and reliability of such emergency communication and tracking technologies.
(3)

Report
Not later than 18 months after the date of the enactment of this section, the Assistant Secretary shall submit to Congress, and make publicly available, a report on the assessment performed under paragraph (2)(A).”.
June 30, 2025
Committed to the Committee of the Whole House on the State of the Union and ordered to be printed