118 HR 6260 RH: Federal Oversight of Construction Use and Safety Act
U.S. House of Representatives
2024-03-06
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
IB
Union Calendar No. 337
118th CONGRESS
2d Session
H. R. 6260
[Report No. 118–410]
IN THE HOUSE OF REPRESENTATIVES
November 7, 2023
Mrs. Chavez-DeRemer introduced the following bill; which was referred to the Committee on Transportation and Infrastructure
March 6, 2024
Additional sponsor: Mr. Lawler
March 6, 2024
Reported with an amendment, committed to the Committee of the Whole House on the State of the Union, and ordered to be printed
Strike out all after the enacting clause and insert the part printed in italic
For text of introduced bill, see copy of bill as introduced on November 7, 2023
A BILL
To provide for certain reviews of the use and safety of Federal buildings, and for other purposes.
1.

Short title
This Act may be cited as the “Federal Oversight of Construction Use and Safety Act” or the “FOCUS Act”.
2.

Eliminating project escalations
Section 3307(c) of title 40, United States Code, is amended by adding at the end the following: “The Administrator shall notify, in writing, the Committee on Transportation and Infrastructure of the House of Representatives and the Committee on Environment and Public Works of the Senate of any increase of more than 5 percent of an estimated maximum cost or of any increase or decrease in the scope or size of a project of 5 or more percent. Such notification shall include an explanation regarding any such increase or decrease. The scope or size of a project shall not increase or decrease by more than 10 percent unless an amended prospectus is submitted and approved pursuant to this section.”
3.

Public safety at Federal buildings
(a)

Data collection
The Administrator of General Services shall collect data from tenant Federal agencies reports of any safety incidents as a result of criminal or other activity impacting public safety in and around public buildings, as defined in section 3301 of title 40, United States Code.
(b)

Report
Not later than 180 days after the date of enactment of this Act, the Administrator shall submit to the Committee on Transportation and Infrastructure of the House of Representatives and the Committee on Environment and Public Works of the Senate a report that—
(1)
contains the data collected under subsection (a); and
(2)
describes any actions taken or planned, if necessary, to improve building management and operations to address such incidents.
4.

Reducing waste in new projects
Section 3307(b) of title 40, United States Code, is amended—
(1)
in paragraph (7) by striking “and” at the end;
(2)
in paragraph (8) by striking the period at the end and inserting a semicolon; and
(3)
by adding at the end the following:
“(9)
information on any space occupied by the relevant agency in the geographical area of the proposed facility, including uses, utilization rates, any proposed consolidations, and, if not proposed to be consolidated, a justification for such determination;
(10)
a statement by the Administrator of whether the public building needs of the Government for the proposed space to be leased were formerly met by a federally owned building, including any building identified for disposal or sale; and
(11)
details on actual utilization rates, including number of personnel assigned to the facility, number of personnel expected to work in-person at the facility and whether all personnel identified reflect filled and authorized positions.”.
5.

Review of special use space
(a)

Review
The Comptroller General of the United States shall review the use of special use spaces in Federal buildings, including conference centers, fitness centers, and similar spaces to determine levels of utilization, opportunities for sharing, collocating, and other efficiencies.
(b)

Report
Not later than 1 year after the date of enactment of this Act, the Comptroller General shall submit to the Committee on Transportation and Infrastructure of the House of Representatives and the Committee on Environment and Public Works of the Senate a report containing the review under subsection (a).
6.

Interagency space coordination
(a)

In general
Chapter 33 of title 40, United States Code, is amended by adding at the end the following:
“3319.

Interagency space coordination
Unless a Federal agency specifically restricts the sharing of the information described in this section for national security purposes, the Administrator of General Services shall share with tenant Federal agencies pursuing new or replacement office space information on any other Federal agencies located in the same geographical area for purposes of determining opportunities for consolidations, collocations, or other space sharing to reduce the costs of space and maximize space utilization.”.
(b)

Clerical amendment
The analysis for chapter 33 of title 40, United States Code, is amended by adding at the end the following:
“3319. Interagency space coordination.”.
7.

Notification of milestones
Section 3307 of title 40, United States Code, is amended by adding at the end the following:
“(i)

Notification required
For each project approved under this section, the Administrator shall notify, in writing, the Committee on Transportation and Infrastructure of the House of Representatives and the Committee on Environment and Public Works of the Senate of any project milestones that are accomplished, including—
(1)
the solicitation and award of design and construction services;
(2)
the completion of any actions required for such project pursuant to the National Environmental Policy Act of 1969 (42 U.S.C. 4321 et seq.);
(3)
any ceremonies for the beginning or completion of such project;
(4)
a naming ceremony for such project; and
(5)
the completion of such project.”.
March 6, 2024
Reported with an amendment, committed to the Committee of the Whole House on the State of the Union, and ordered to be printed