Public Law 118–157: To require Facility Security Committees to respond to security recommendations issued by the Federal Protective Service relating to facility security, and for other purposes.
Public Law
157
Public Law 118–157
138 Stat. 1719
2024-12-17
2024-12-17
United States Government Publishing Office
National Archives and Records Administration
Office of the Federal Register
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
GPO Locator to USLM Converter 4.15.31;Stage2.20250702
2026-01-02
118
public
PUBLIC LAW 118–157—DEC. 17, 2024
138 STAT. 1719
Public Law
118–157
118th Congress

An Act
To require Facility Security Committees to respond to security recommendations issued by the Federal Protective Service relating to facility security, and for other purposes.
Dec. 17, 2024
[S. 3613]
Be it enacted by the Senate and House of Representa­tives of the United States of America in Congress assembled,
Improving Federal Building Security Act of 2024.
40 USC 1315 note.
SECTION 1.

SHORT TITLE.
This Act may be cited as the “Improving Federal Building Security Act of 2024”.
SEC. 2.

RESPONDING TO SECURITY RECOMMENDATIONS.
(a)

Definitions.—
In this section:
(1)

Agency.—
The term “agency” has the meaning given the term in section 551 of title 5, United States Code.
(2)

Facility security committee.—
The term “Facility Security Committee” means a committee that—
(A)
consists of representatives of—
(i)
all Federal tenants in a specific non-military facility;
(ii)
the security organization for the facility; and
(iii)
the owning or leasing Federal tenant; and
(B)
is responsible for addressing facility-specific security issues and approving the implementation of security measures and practices in the facility.
(3)

Secretary.—
The term “Secretary” means the Secretary of Homeland Security.
(b)

Response.—
(1)
Deadline.

In general.—
Not later than 90 days after the date on which the Federal Protective Service issues a security recommendation to a Facility Security Committee to improve facility security, the head of the Facility Security Committee, or a designee thereof, shall—
(A)
respond to the Secretary—
(i)
indicating if the Facility Security Committee intends to adopt or reject the recommendation; and
(ii)
describing the financial implications of adopting or rejecting the recommendation, including if the benefits outweigh the costs; and
(B)
if the Facility Security Committee intends to reject the recommendation, provide the Secretary a justification for accepting the risk posed by rejecting the recommendation.
(2)

Method.—
The Secretary shall—138 STAT. 1720
(A)
develop a method to monitor the recommendations and responses described in paragraph (1); and
(B)
take reasonable action to ensure Facility Security Committee responsiveness under paragraph (1).
(c)

Annual Report.—
(1)
Time periods.

In general.—
Not later than 270 days after the date of enactment of this Act, and annually thereafter, the Secretary shall submit to the Committee on Homeland Security and Governmental Affairs of the Senate and the Committee on Homeland Security and the Committee on Transportation and Infrastructure of the House of Representatives a report that, for the fiscal year preceding the report, includes—
(A)
Summary.
a summary of the security recommendations issued by the Federal Protective Service to Facility Security Committees to improve facility security;
(B)
the percentage of recommendations described in subparagraph (A) that were accepted and the percentage of such recommendations that were rejected;
(C)
the percentage of Facility Security Committees that failed to respond to a recommendation described in subparagraph (A) in a timely manner;
(D)
Summary.
a summary of justifications provided by Facility Security Committees if a Facility Security Committee rejected a recommendation described in subparagraph (A);
(E)
Summary.
a summary of the financial implications of Facility Security Committee responses to recommendations described in subparagraph (A), including if the benefits outweigh the costs;
(F)
Analysis.
an analysis of steps taken by Facility Security Committees to mitigate the risk posed by rejecting a recommendation described in subparagraph (A); and
(G)
Analysis.
an analysis of any trends found among the findings in the report.
(2)

Form.—
Each report required under paragraph (1) shall be submitted in unclassified form, but may include a classified annex.
(3)

Briefing.—
The Secretary shall brief the Committee on Homeland Security and Governmental Affairs of the Senate and the Committee on Homeland Security and the Committee on Transportation and Infrastructure of the House of Representatives on an annual basis on the findings of the most recently submitted report under paragraph (1).
(d)

Report on Surveillance Technology.—
Not later than 180 days after the date of enactment of this Act, the Secretary shall submit to the Committee on Homeland Security and Governmental Affairs of the Senate and the Committee on Homeland Security and the Committee on Transportation and Infrastructure of the House of Representatives an unredacted report on—
(1)
all surveillance technology recommended by the Federal Protective Service; and
(2)
any intended use of the technology described in paragraph (1).
(e)

No Additional Funds.—
No additional funds are authorized to be appropriated for the purpose of carrying out this Act.
(f)

Sunset and Report.—
(1)

Sunset.—
This Act shall cease to be effective on the date that is 5 years after the date of enactment of this Act.138 STAT. 1721
(2)

GAO report.—
Not later than 5 years after the date of enactment of this Act, the Comptroller General of the United States shall submit to Congress a report on the effectiveness of this Act.
(g)

Application.—
This Act shall only apply to—
(1)
General Services Administration facilities under protection of the Federal Protective Service; and
(2)
non-General Services Administration facilities that pay fees to the Federal Protective Service for protection.
Approved
December 17, 2024
.

LEGISLATIVE HISTORY—S. 3613 (H.R. 8530):
HOUSE REPORTS: ┐No. 118–818 (Comm. on Transportation and Infrastructure) accompanying H.R. 8530.
SENATE REPORTS: ┐No. 118–160 (Comm. on Homeland Security and Governmental Affairs).

CONGRESSIONAL RECORD, Vol. 170 (2024):
Mar. 22, considered and passed Senate.
Dec. 9, 10, considered and passed House.
○