3.0.0
8
2025-07-31T10:56:34Z
2025-07-31T10:56:34Z
Senate
S
SCONRES
2025-03-03
119
- sscm00
Commerce, Science, and Transportation Committee
Senate
Standing
  - Referred To
2025-03-03T23:14:03Z

- Supporting the Local Radio Freedom Act.
119
12
HCONRES
2025-02-13
Referred to the House Committee on the Judiciary.
  - Related bill
CRS
- 2025-03-03
  - sscm00
Commerce, Science, and Transportation Committee
Senate
Referred to the Committee on Commerce, Science, and Transportation. (text: CR S1463)
IntroReferral
- 2025-03-03
Introduced in Senate
IntroReferral
10000
9
Library of Congress
- B001261
Sen. Barrasso, John [R-WY]
John
Barrasso
R
WY
N
- H001076
Sen. Hassan, Margaret Wood [D-NH]
Maggie
Hassan
D
NH
2025-03-03
True
- C001047
Sen. Capito, Shelley Moore [R-WV]
Shelley
Capito
R
WV
Moore
2025-03-03
True
- C001035
Sen. Collins, Susan M. [R-ME]
Susan
Collins
R
ME
M.
2025-03-03
True
- C001096
Sen. Cramer, Kevin [R-ND]
Kevin
Cramer
R
ND
2025-03-03
True
- C000880
Sen. Crapo, Mike [R-ID]
Mike
Crapo
R
ID
2025-03-03
True
- D000618
Sen. Daines, Steve [R-MT]
Steve
Daines
R
MT
2025-03-03
True
- F000463
Sen. Fischer, Deb [R-NE]
Deb
Fischer
R
NE
2025-03-03
True
- J000312
Sen. Justice, James C. [R-WV]
James
Justice
R
WV
C.
2025-03-03
True
- K000383
Sen. King, Angus S., Jr. [I-ME]
Angus
King
I
ME
S.
2025-03-03
True
- M001153
Sen. Murkowski, Lisa [R-AK]
Lisa
Murkowski
R
AK
2025-03-03
True
- R000618
Sen. Ricketts, Pete [R-NE]
Pete
Ricketts
R
NE
2025-03-03
True
- S001181
Sen. Shaheen, Jeanne [D-NH]
Jeanne
Shaheen
D
NH
2025-03-03
True
- S001232
Sen. Sheehy, Tim [R-MT]
Tim
Sheehy
R
MT
2025-03-03
True
- W000437
Sen. Wicker, Roger F. [R-MS]
Roger
Wicker
R
MS
F.
2025-03-03
True
- Y000064
Sen. Young, Todd [R-IN]
Todd
Young
R
IN
2025-03-03
True
- H001046
Sen. Heinrich, Martin [D-NM]
Martin
Heinrich
D
NM
2025-03-03
True
- H001061
Sen. Hoeven, John [R-ND]
John
Hoeven
R
ND
2025-03-03
True
- L000571
Sen. Lummis, Cynthia M. [R-WY]
Cynthia
Lummis
R
WY
M.
2025-03-03
True
- R000584
Sen. Risch, James E. [R-ID]
James
Risch
R
ID
E.
2025-03-03
True
- S001198
Sen. Sullivan, Dan [R-AK]
Dan
Sullivan
R
AK
2025-03-10
False
- E000295
Sen. Ernst, Joni [R-IA]
Joni
Ernst
R
IA
2025-03-11
False
- M001190
Sen. Mullin, Markwayne [R-OK]
Markwayne
Mullin
R
OK
2025-03-14
False
- M001243
Sen. McCormick, David [R-PA]
David
McCormick
R
PA
H.
2025-04-29
False
- B001236
Sen. Boozman, John [R-AR]
John
Boozman
R
AR
2025-05-06
False
- B001299
Sen. Banks, Jim [R-IN]
Jim
Banks
R
IN
2025-07-30
False
Science, Technology, Communications
Science, Technology, Communications
2025-03-07T14:18:54Z
00
2025-03-03
Introduced in Senate
2025-03-07T19:18:45Z
This concurrent resolution declares that Congress should not impose any new performance fee, tax, royalty, or other charge relating to the public performance of sound recordings on a local radio station for broadcasting sound recordings over the air, or on any business for the public performance of sound recordings broadcast on a local radio station.

A concurrent resolution supporting the Local Radio Freedom Act.
- Official Title as Introduced
6

A concurrent resolution supporting the Local Radio Freedom Act.
2025-03-05T05:03:27Z
Introduced in Senate
IS
- Display Title
45

A concurrent resolution supporting the Local Radio Freedom Act.
2025-03-04T11:56:18Z
- Introduced in Senate
2025-03-03T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119sconres8is/xml/BILLS-119sconres8is.xml
2025-03-03
Referred to the Committee on Commerce, Science, and Transportation. (text: CR S1463)
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.