3.0.0
161
2025-09-23T14:29:26Z
2025-09-23T14:29:26Z
House
H
HRES
2025-02-25
119
https://www.congress.gov/bill/119th-congress/house-resolution/161
- hsru00
Rules Committee
House
Standing
  - Reported Original Measure
2025-02-25T15:35:03Z
H. Rept. 119-5

- Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Department of Energy relating to "Energy Conservation Program: Energy Conservation Standards for Consumer Gas-fired Instantaneous Water Heaters".
119
20
HJRES
2025-05-09
Became Public Law No: 119-6.
  - Related bill
House
  - Procedurally related
House

- Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "Waste Emissions Charge for Petroleum and Natural Gas Systems: Procedures for Facilitating Compliance, Including Netting and Exemptions".
119
35
HJRES
2025-03-14
Became Public Law No: 119-2.
  - Related bill
House
  - Procedurally related
House

- Establishing the congressional budget for the United States Government for fiscal year 2025 and setting forth the appropriate budgetary levels for fiscal years 2026 through 2034.
119
14
HCONRES
2025-05-20
Star Print ordered on the reported concurrent resolution.
  - Procedurally related
House
- 2025-02-25
14:09:11
Motion to reconsider laid on the table Agreed to without objection.
Floor
H38310
2
House floor actions
- 2025-02-25
14:09:09
On agreeing to the resolution Agreed to by recorded vote: 217 - 211 (Roll no. 47). (text: CR H781)
Floor
H37100
2
House floor actions
47
https://clerk.house.gov/evs/2025/roll047.xml
House
119
2025-02-25T19:09:09Z
1
- 2025-02-25
14:09:09
Passed/agreed to in House: On agreeing to the resolution Agreed to by recorded vote: 217 - 211 (Roll no. 47). (text: CR H781)
Floor
8000
9
Library of Congress
47
https://clerk.house.gov/evs/2025/roll047.xml
House
119
2025-02-25T19:09:09Z
1
- 2025-02-25
14:01:07
On ordering the previous question Agreed to by the Yeas and Nays: 216 - 210 (Roll no. 46).
Floor
H35000
2
House floor actions
46
https://clerk.house.gov/evs/2025/roll046.xml
House
119
2025-02-25T19:01:07Z
1
- 2025-02-25
13:30:51
Considered as unfinished business. (consideration: CR H790-791)
Floor
H30000
2
House floor actions
- 2025-02-25
13:21:25
POSTPONED PROCEEDINGS - At the conclusion of debate on H. Res. 161, the Chair put the question on ordering the previous question and by voice vote announced that the ayes had prevailed. Mr. McGovern demanded the yeas and nays and the Chair postponed further proceedings until a time to be announced.
Floor
H8D000
2
House floor actions
- 2025-02-25
12:16:10
DEBATE - The House proceeded with one hour of debate on H. Res. 161.
Floor
H8D000
2
House floor actions
- 2025-02-25
12:13:01
Considered as privileged matter. (consideration: CR H781-790)
Floor
H30000
2
House floor actions
- 2025-02-25
Placed on the House Calendar, Calendar No. 4.
Calendars
H12420
2
House floor actions
- 2025-02-25
10:35:04
The resolution provides for consideration of two joint resolutions, H.J.Res.20, under a closed rule and H.J.Res. 35, under a closed rule. Also, the resolution provides for consideration of H. Con. Res. 14, under a closed rule. The joint resolutions are debated for one hour each and the concurrent resolution is debated for 3 hours.
Floor
H12700
2
House floor actions
- 2025-02-25
The House Committee on Rules reported an original measure, H. Rept. 119-5, by Mrs. Houchin.
Committee
H12100
2
House floor actions
  - hsru00
Rules Committee
- 2025-02-25
The House Committee on Rules reported an original measure, H. Rept. 119-5, by Mrs. Houchin.
Committee
5000
9
Library of Congress
  - hsru00
Rules Committee
- 2025-02-25
Reported in House
Committee
1010
9
Library of Congress
- 2025-02-25
Submitted in House
Committee
H12100
9
Library of Congress
- H001093
Rep. Houchin, Erin [R-IN-9]
Erin
Houchin
R
IN
9
N
Congress
- House of Representatives
2025-09-23T14:29:26Z
- Legislative rules and procedure
2025-09-23T14:29:20Z
Congress
2025-09-23T11:25:56Z

Providing for consideration of the joint resolution (H.J. Res. 20) providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Department of Energy relating to "Energy Conservation Program: Energy Conservation Standards for Consumer Gas-fired Instantaneous Water Heaters"; providing for consideration of the joint resolution (H.J. Res. 35) providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "Waste Emissions Charge for Petroleum and Natural Gas Systems: Procedures for Facilitating Compliance, Including Netting and Exemptions"; and providing for consideration of the concurrent resolution (H. Con. Res. 14) establishing the congressional budget for the United States Government for fiscal year 2025 and setting forth the appropriate budgetary levels for fiscal years 2026 through 2034.
- Display Title
45

Providing for consideration of the joint resolution (H.J. Res. 20) providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Department of Energy relating to "Energy Conservation Program: Energy Conservation Standards for Consumer Gas-fired Instantaneous Water Heaters"; providing for consideration of the joint resolution (H.J. Res. 35) providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "Waste Emissions Charge for Petroleum and Natural Gas Systems: Procedures for Facilitating Compliance, Including Netting and Exemptions"; and providing for consideration of the concurrent resolution (H. Con. Res. 14) establishing the congressional budget for the United States Government for fiscal year 2025 and setting forth the appropriate budgetary levels for fiscal years 2026 through 2034.
2025-02-26T09:06:29Z
- Official Title as Introduced
6

Providing for consideration of the joint resolution (H.J. Res. 20) providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Department of Energy relating to "Energy Conservation Program: Energy Conservation Standards for Consumer Gas-fired Instantaneous Water Heaters"; providing for consideration of the joint resolution (H.J. Res. 35) providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "Waste Emissions Charge for Petroleum and Natural Gas Systems: Procedures for Facilitating Compliance, Including Netting and Exemptions"; and providing for consideration of the concurrent resolution (H. Con. Res. 14) establishing the congressional budget for the United States Government for fiscal year 2025 and setting forth the appropriate budgetary levels for fiscal years 2026 through 2034.
2025-02-26T09:06:29Z
- Reported in House
2025-02-25T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hres161rh/xml/BILLS-119hres161rh.xml
- Engrossed in House
2025-02-25T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hres161eh/xml/BILLS-119hres161eh.xml
2025-02-25
Motion to reconsider laid on the table Agreed to without objection.
14:09:11
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.