3.0.0
758
2025-10-09T03:26:13Z
2025-10-09T03:26:13Z
House
H
HR
2025-01-28
119
https://www.congress.gov/bill/119th-congress/house-bill/758
[Congressional Record Volume 171, Number 18 (Tuesday, January 28, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. CONNOLLY:H.R. 758.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8 of the United States Constitution.[Page H406]
- ssga00
Homeland Security and Governmental Affairs Committee
Senate
Standing
  - Referred To
2025-03-04T17:41:32Z
- hsgo00
Oversight and Government Reform Committee
House
Standing
  - Referred To
2025-01-28T16:01:40Z
- 2025-03-04
  - ssga00
Homeland Security and Governmental Affairs Committee
Senate
Received in the Senate and Read twice and referred to the Committee on Homeland Security and Governmental Affairs.
IntroReferral
- 2025-03-03
19:03:49
Motion to reconsider laid on the table Agreed to without objection.
Floor
H38310
2
House floor actions
- 2025-03-03
19:03:47
On motion to suspend the rules and pass the bill Agreed to by the Yeas and Nays: (2/3 required): 402 - 16 (Roll no. 55). (text: CR H933-934)
Floor
H37300
2
House floor actions
55
https://clerk.house.gov/evs/2025/roll055.xml
House
119
2025-03-04T00:03:47Z
1
- 2025-03-03
19:03:47
Passed/agreed to in House: On motion to suspend the rules and pass the bill Agreed to by the Yeas and Nays: (2/3 required): 402 - 16 (Roll no. 55). (text: CR H933-934)
Floor
8000
9
Library of Congress
55
https://clerk.house.gov/evs/2025/roll055.xml
House
119
2025-03-04T00:03:47Z
1
- 2025-03-03
18:57:17
Considered as unfinished business. (consideration: CR H938-939)
Floor
H30000
2
House floor actions
- 2025-03-03
16:20:48
At the conclusion of debate, the Yeas and Nays were demanded and ordered. Pursuant to the provisions of clause 8, rule XX, the Chair announced that further proceedings on the motion would be postponed.
Floor
H37220
2
House floor actions
- 2025-03-03
16:13:26
DEBATE - The House proceeded with forty minutes of debate on H.R. 758.
Floor
H8D000
2
House floor actions
- 2025-03-03
16:13:24
Considered under suspension of the rules. (consideration: CR H933-935)
Floor
H30000
2
House floor actions
- 2025-03-03
16:13:10
Mr. Comer moved to suspend the rules and pass the bill.
Floor
H30300
2
House floor actions
- 2025-01-28
Referred to the House Committee on Oversight and Government Reform.
IntroReferral
H11100
2
House floor actions
  - hsgo00
Oversight and Government Reform Committee
- 2025-01-28
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-01-28
Introduced in House
IntroReferral
1000
9
Library of Congress
- C001078
Rep. Connolly, Gerald E. [D-VA-11]
Gerald
Connolly
D
VA
E.
11
N
- C001108
Rep. Comer, James [R-KY-1]
James
Comer
R
KY
1
2025-01-28
True
- T000481
Rep. Tlaib, Rashida [D-MI-12]
Rashida
Tlaib
D
MI
12
2025-02-14
False
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
Eleanor
Norton
D
DC
Holmes
0
2025-02-21
False
Government Operations and Politics
- Administrative law and regulatory procedures
2025-03-05T16:03:53Z
- Government employee pay, benefits, personnel management
2025-03-05T16:03:53Z
- Government information and archives
2025-03-05T16:03:53Z
- Motor carriers
2025-03-05T16:03:53Z
- Motor vehicles
2025-03-05T16:03:53Z
- Postal service
2025-03-05T16:03:53Z
- Public contracts and procurement
2025-03-05T16:03:53Z
- Transportation safety and security
2025-03-05T16:03:53Z
- U.S. Postal Service
2025-03-05T16:03:53Z
Government Operations and Politics
2025-03-01T13:57:26Z
00
2025-01-28
Introduced in House
2025-03-03T15:00:41Z
Mail Traffic Deaths Reporting Act of 2025
This bill requires the U.S. Postal Service to issue regulations to mandate collecting, tracking, and publicly reporting information related to deaths and injuries resulting from traffic crashes involving vehicles transporting mail.
The bill also requires (1) Postal Service employees and contractors to report within three days any traffic crash involving a vehicle used in the transportation of mail and resulting in injury or death, (2) the Postal Service to maintain an internal database that includes comprehensive information related to such injuries and deaths, and (3) the Postal Service to provide an annual report to the public summarizing such injuries and deaths.

Mail Traffic Deaths Reporting Act of 2025
- Short Titles from RFS (Referred to Senate) bill text
255

Mail Traffic Deaths Reporting Act of 2025
2025-03-07T04:23:18Z
S
Senate
Referred in Senate
RFS
- Short Title(s) as Passed House
104

Mail Traffic Deaths Reporting Act of 2025
2025-03-05T05:08:18Z
H
House
Engrossed in House
EH
- Display Title
45

Mail Traffic Deaths Reporting Act of 2025
2025-02-26T11:23:20Z
- Short Title(s) as Introduced
101

Mail Traffic Deaths Reporting Act of 2025
2025-02-26T11:23:18Z
Introduced in House
IH
- Official Title as Introduced
6

To direct the United States Postal Service to issue regulations requiring Postal Service employees and contractors to report to the Postal Service traffic crashes involving vehicles carrying mail that result in injury or death, and for other purposes.
2025-02-26T11:18:31Z
Introduced in House
IH
- Referred in Senate
2025-03-04T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr758rfs/xml/BILLS-119hr758rfs.xml
- Engrossed in House
2025-03-03T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr758eh/xml/BILLS-119hr758eh.xml
- Introduced in House
2025-01-28T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr758ih/xml/BILLS-119hr758ih.xml
2025-03-04
Received in the Senate and Read twice and referred to the Committee on Homeland Security and Governmental Affairs.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.