3.0.0
6842
2025-12-20T09:05:44Z
2025-12-21T09:28:15Z
House
H
HR
2025-12-18
119
https://www.congress.gov/bill/119th-congress/house-bill/6842
[Congressional Record Volume 171, Number 214 (Thursday, December 18, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Ms. CHU:H.R. 6842.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8, Clause 1[Page H6116]
- hswm00
Ways and Means Committee
House
Standing
  - Referred To
2025-12-18T14:07:20Z
- 2025-12-18
Referred to the House Committee on Ways and Means.
IntroReferral
H11100
2
House floor actions
  - hswm00
Ways and Means Committee
- 2025-12-18
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-12-18
Introduced in House
IntroReferral
1000
9
Library of Congress
- C001080
Rep. Chu, Judy [D-CA-28]
Judy
Chu
D
CA
28
N
- S000344
Rep. Sherman, Brad [D-CA-32]
Brad
Sherman
D
CA
32
2025-12-18
True
- T000460
Rep. Thompson, Mike [D-CA-4]
Mike
Thompson
D
CA
4
2025-12-18
True
- P000197
Rep. Pelosi, Nancy [D-CA-11]
Nancy
Pelosi
D
CA
11
2025-12-18
True
- A000371
Rep. Aguilar, Pete [D-CA-33]
Pete
Aguilar
D
CA
33
2025-12-18
True
- B001300
Rep. Barragán, Nanette Diaz [D-CA-44]
Nanette
Barragán
D
CA
Diaz
44
2025-12-18
True
- B001285
Rep. Brownley, Julia [D-CA-26]
Julia
Brownley
D
CA
26
2025-12-18
True
- C001112
Rep. Carbajal, Salud O. [D-CA-24]
Salud
Carbajal
D
CA
O.
24
2025-12-18
True
- C001059
Rep. Costa, Jim [D-CA-21]
Jim
Costa
D
CA
21
2025-12-18
True
- D000623
Rep. DeSaulnier, Mark [D-CA-10]
Mark
DeSaulnier
D
CA
10
2025-12-18
True
- F000483
Rep. Friedman, Laura [D-CA-30]
Laura
Friedman
D
CA
30
2025-12-18
True
- G000559
Rep. Garamendi, John [D-CA-8]
John
Garamendi
D
CA
8
2025-12-18
True
- G000598
Rep. Garcia, Robert [D-CA-42]
Robert
Garcia
D
CA
42
2025-12-18
True
- J000305
Rep. Jacobs, Sara [D-CA-51]
Sara
Jacobs
D
CA
51
2025-12-18
True
- K000400
Rep. Kamlager-Dove, Sydney [D-CA-37]
Sydney
Kamlager-Dove
D
CA
37
2025-12-18
True
- L000593
Rep. Levin, Mike [D-CA-49]
Mike
Levin
D
CA
49
2025-12-18
True
- L000607
Rep. Liccardo, Sam T. [D-CA-16]
Sam
Liccardo
D
CA
T.
16
2025-12-18
True
- L000582
Rep. Lieu, Ted [D-CA-36]
Ted
Lieu
D
CA
36
2025-12-18
True
- L000397
Rep. Lofgren, Zoe [D-CA-18]
Zoe
Lofgren
D
CA
18
2025-12-18
True
- M001163
Rep. Matsui, Doris O. [D-CA-7]
Doris
Matsui
D
CA
O.
7
2025-12-18
True
- M001241
Rep. Min, Dave [D-CA-47]
Dave
Min
D
CA
47
2025-12-18
True
- M001225
Rep. Mullin, Kevin [D-CA-15]
Kevin
Mullin
D
CA
15
2025-12-18
True
- P000613
Rep. Panetta, Jimmy [D-CA-19]
Jimmy
Panetta
D
CA
19
2025-12-18
True
- P000608
Rep. Peters, Scott H. [D-CA-50]
Scott
Peters
D
CA
H.
50
2025-12-18
True
- R000620
Rep. Rivas, Luz M. [D-CA-29]
Luz
Rivas
D
CA
M.
29
2025-12-18
True
- R000599
Rep. Ruiz, Raul [D-CA-25]
Raul
Ruiz
D
CA
25
2025-12-18
True
- S001156
Rep. Sánchez, Linda T. [D-CA-38]
Linda
Sánchez
D
CA
T.
38
2025-12-18
True
- S001193
Rep. Swalwell, Eric [D-CA-14]
Eric
Swalwell
D
CA
14
2025-12-18
True
- T000472
Rep. Takano, Mark [D-CA-39]
Mark
Takano
D
CA
39
2025-12-18
True
- T000491
Rep. Tran, Derek [D-CA-45]
Derek
Tran
D
CA
45
2025-12-18
True
- W000830
Rep. Whitesides, George [D-CA-27]
George
Whitesides
D
CA
27
2025-12-18
True

To provide tax relief with respect to certain Federal disasters, and for other purposes.
- Display Title
45

To provide tax relief with respect to certain Federal disasters, and for other purposes.
2025-12-19T09:07:39Z
- Official Title as Introduced
6

To provide tax relief with respect to certain Federal disasters, and for other purposes.
2025-12-19T09:07:39Z
2025-12-18
Referred to the House Committee on Ways and Means.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.