3.0.0
6293
2025-12-17T09:06:30Z
2025-12-17T09:06:30Z
House
H
HR
2025-11-25
119
https://www.congress.gov/bill/119th-congress/house-bill/6293
[Congressional Record Volume 171, Number 198 (Tuesday, November 25, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. ROSE:H.R. 6293.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8[Page H4902]
- hsba00
Financial Services Committee
House
Standing
  - Referred To
2025-11-25T16:03:40Z

- Housing Supply Expansion Act of 2025
119
2414
S
2025-07-23
Read twice and referred to the Committee on Banking, Housing, and Urban Affairs.
  - Related bill
CRS
- 2025-11-25
Referred to the House Committee on Financial Services.
IntroReferral
H11100
2
House floor actions
  - hsba00
Financial Services Committee
- 2025-11-25
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-11-25
Introduced in House
IntroReferral
1000
9
Library of Congress
- R000612
Rep. Rose, John W. [R-TN-6]
John
Rose
R
TN
W.
6
N
- F000474
Rep. Flood, Mike [R-NE-1]
Mike
Flood
R
NE
1
2025-11-25
True
- C001061
Rep. Cleaver, Emanuel [D-MO-5]
Emanuel
Cleaver
D
MO
5
2025-11-25
True
- P000608
Rep. Peters, Scott H. [D-CA-50]
Scott
Peters
D
CA
H.
50
2025-11-25
True
- D000594
Rep. De La Cruz, Monica [R-TX-15]
Monica
De La Cruz
R
TX
15
2025-11-25
True
- C001110
Rep. Correa, J. Luis [D-CA-46]
J.
Correa
D
CA
Luis
46
2025-11-25
True
- M001215
Rep. Miller-Meeks, Mariannette [R-IA-1]
Mariannette
Miller-Meeks
R
IA
1
2025-12-04
False
- M001236
Rep. Moore, Tim [R-NC-14]
Tim
Moore
R
NC
14
2025-12-10
False
- V000138
Rep. Vindman, Eugene Simon [D-VA-7]
Eugene
Vindman
D
VA
Simon
7
2025-12-10
False
- D000626
Rep. Davidson, Warren [R-OH-8]
Warren
Davidson
R
OH
8
2025-12-16
False
Housing and Community Development
Housing and Community Development
2025-12-03T13:46:49Z

Housing Supply Expansion Act of 2025
- Display Title
45

Housing Supply Expansion Act of 2025
2025-12-02T11:08:39Z
- Short Title(s) as Introduced
101

Housing Supply Expansion Act of 2025
2025-12-02T11:08:39Z
Introduced in House
IH
- Official Title as Introduced
6

To update the definition of manufactured home, and for other purposes.
2025-12-02T11:03:25Z
Introduced in House
IH
- Introduced in House
2025-11-25T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr6293ih/xml/BILLS-119hr6293ih.xml
2025-11-25
Referred to the House Committee on Financial Services.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.