3.0.0
5549
2025-12-10T09:05:57Z
2025-12-10T09:05:57Z
House
H
HR
2025-09-23
119
https://www.congress.gov/bill/119th-congress/house-bill/5549
[Congressional Record Volume 171, Number 156 (Tuesday, September 23, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GRIFFITH:H.R. 5549.Congress has the power to enact this legislation pursuantto the following:Article I Section 8[Page H4494]
- hsif00
Energy and Commerce Committee
House
Standing
  - Referred To
2025-09-23T13:02:40Z

- Efficient Nuclear Licensing Hearings Act
119
1757
S
2025-05-14
Read twice and referred to the Committee on Environment and Public Works.
  - Related bill
CRS
- 2025-09-23
Referred to the House Committee on Energy and Commerce.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2025-09-23
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-09-23
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000568
Rep. Griffith, H. Morgan [R-VA-9]
H.
Griffith
R
VA
Morgan
9
N
- S001216
Rep. Schrier, Kim [D-WA-8]
Kim
Schrier
D
WA
8
2025-09-23
True
- V000131
Rep. Veasey, Marc A. [D-TX-33]
Marc
Veasey
D
TX
A.
33
2025-09-23
True
- B001316
Rep. Burlison, Eric [R-MO-7]
Eric
Burlison
R
MO
7
2025-09-30
False
- H001086
Rep. Harshbarger, Diana [R-TN-1]
Diana
Harshbarger
R
TN
1
2025-10-06
False
- B001322
Rep. Baumgartner, Michael [R-WA-5]
Michael
Baumgartner
R
WA
5
2025-10-06
False
- C001103
Rep. Carter, Earl L. "Buddy" [R-GA-1]
Earl
Carter
R
GA
L. "Buddy"
1
2025-10-21
False
- B001306
Rep. Balderson, Troy [R-OH-12]
Troy
Balderson
R
OH
12
2025-10-24
False
- W000804
Rep. Wittman, Robert J. [R-VA-1]
Robert
Wittman
R
VA
J.
1
2025-10-24
False
- C000059
Rep. Calvert, Ken [R-CA-41]
Ken
Calvert
R
CA
41
2025-10-31
False
- G000600
Rep. Perez, Marie Gluesenkamp [D-WA-3]
Marie
Perez
D
WA
Gluesenkamp
3
2025-11-12
False
- B000740
Rep. Bice, Stephanie I. [R-OK-5]
Stephanie
Bice
R
OK
I.
5
2025-12-09
False
Energy
Energy
2025-11-18T18:06:33Z

Efficient Nuclear Licensing Hearings Act
- Display Title
45

Efficient Nuclear Licensing Hearings Act
2025-10-03T04:23:19Z
- Short Title(s) as Introduced
101

Efficient Nuclear Licensing Hearings Act
2025-10-03T04:23:17Z
Introduced in House
IH
- Official Title as Introduced
6

To amend the Atomic Energy Act of 1954 to provide for more efficient hearings on nuclear facility construction applications, and for other purposes.
2025-10-03T04:18:33Z
Introduced in House
IH
- Introduced in House
2025-09-23T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr5549ih/xml/BILLS-119hr5549ih.xml
2025-09-23
Referred to the House Committee on Energy and Commerce.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.