3.0.0
2937
2025-12-19T09:07:06Z
2025-12-19T09:07:06Z
House
H
HR
2025-04-17
119
https://www.congress.gov/bill/119th-congress/house-bill/2937
[Congressional Record Volume 171, Number 67 (Thursday, April 17, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Ms. KELLY of Illinois:H.R. 2937.Congress has the power to enact this legislation pursuantto the following:Clause 18 of Section 8 of Article 1 of the Constitution[Page H1613]
- hsif00
Energy and Commerce Committee
House
Standing
  - Referred To
2025-04-17T13:30:05Z
- 2025-04-17
Referred to the House Committee on Energy and Commerce.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2025-04-17
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-04-17
Introduced in House
IntroReferral
1000
9
Library of Congress
- K000385
Rep. Kelly, Robin L. [D-IL-2]
Robin
Kelly
D
IL
L.
2
N
- F000466
Rep. Fitzpatrick, Brian K. [R-PA-1]
Brian
Fitzpatrick
R
PA
K.
1
2025-04-17
True
- T000474
Rep. Torres, Norma J. [D-CA-35]
Norma
Torres
D
CA
J.
35
2025-04-17
True
- N000191
Rep. Neguse, Joe [D-CO-2]
Joe
Neguse
D
CO
2
2025-04-17
True
- S001221
Rep. Scholten, Hillary J. [D-MI-3]
Hillary
Scholten
D
MI
J.
3
2025-04-17
True
- V000131
Rep. Veasey, Marc A. [D-TX-33]
Marc
Veasey
D
TX
A.
33
2025-04-28
False
- B001315
Rep. Budzinski, Nikki [D-IL-13]
Nikki
Budzinski
D
IL
13
2025-06-17
False
- N000193
Rep. Nunn, Zachary [R-IA-3]
Zachary
Nunn
R
IA
3
2025-09-30
False
- R000305
Rep. Ross, Deborah K. [D-NC-2]
Deborah
Ross
D
NC
K.
2
2025-12-03
False
- M001237
Rep. McDonald Rivet, Kristen [D-MI-8]
Kristen
McDonald Rivet
D
MI
8
2025-12-18
False
Health
Health
2025-05-20T13:34:06Z

PROTECT 911 Act
- Display Title
45

PROTECT 911 Act
2025-05-02T03:08:19Z
- Short Title(s) as Introduced
101

PROTECT 911 Act
2025-05-02T03:08:18Z
Introduced in House
IH
- Short Title(s) as Introduced
101

Providing Resources and Occupational Training for Emotional Crisis and Trauma in 911 Act
2025-05-02T03:08:18Z
Introduced in House
IH
- Official Title as Introduced
6

To require the Secretary of Health and Human Services to improve the detection, prevention, and treatment of mental health issues among public safety telecommunicators.
2025-05-02T03:03:30Z
Introduced in House
IH
- Introduced in House
2025-04-17T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2937ih/xml/BILLS-119hr2937ih.xml
2025-04-17
Referred to the House Committee on Energy and Commerce.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.