3.0.0
2823
2025-12-05T21:58:36Z
2025-12-05T21:58:36Z
House
H
HR
2025-04-10
119
https://www.congress.gov/bill/119th-congress/house-bill/2823
[Congressional Record Volume 171, Number 65 (Thursday, April 10, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. CASTEN:H.R. 2823.Congress has the power to enact this legislation pursuantto the following:Clause 18 of Section 8 of Article 1 of the Constitution[Page H1601]
- hsif00
Energy and Commerce Committee
House
Standing
  - Referred To
2025-04-10T13:04:15Z
- hsba00
Financial Services Committee
House
Standing
  - Referred To
2025-04-10T13:04:10Z

- Climate Change Financial Risk Act of 2025
119
1471
S
2025-04-10
Read twice and referred to the Committee on Banking, Housing, and Urban Affairs.
  - Identical bill
CRS
- 2025-04-10
Referred to the Committee on Financial Services, and in addition to the Committee on Energy and Commerce, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2025-04-10
Referred to the Committee on Financial Services, and in addition to the Committee on Energy and Commerce, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsba00
Financial Services Committee
- 2025-04-10
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-04-10
Introduced in House
IntroReferral
1000
9
Library of Congress
- C001117
Rep. Casten, Sean [D-IL-6]
Sean
Casten
D
IL
6
N
- L000562
Rep. Lynch, Stephen F. [D-MA-8]
Stephen
Lynch
D
MA
F.
8
2025-04-29
False
- C001061
Rep. Cleaver, Emanuel [D-MO-5]
Emanuel
Cleaver
D
MO
5
2025-04-29
False
- H001068
Rep. Huffman, Jared [D-CA-2]
Jared
Huffman
D
CA
2
2025-04-29
False
- M001225
Rep. Mullin, Kevin [D-CA-15]
Kevin
Mullin
D
CA
15
2025-04-29
False
- E000301
Rep. Elfreth, Sarah [D-MD-3]
Sarah
Elfreth
D
MD
3
2025-04-29
False
- C001112
Rep. Carbajal, Salud O. [D-CA-24]
Salud
Carbajal
D
CA
O.
24
2025-04-29
False
- C001072
Rep. Carson, André [D-IN-7]
André
Carson
D
IN
7
2025-04-29
False
- M001223
Rep. Magaziner, Seth [D-RI-2]
Seth
Magaziner
D
RI
2
2025-05-19
False
- L000593
Rep. Levin, Mike [D-CA-49]
Mike
Levin
D
CA
49
2025-06-03
False
Finance and Financial Sector
Finance and Financial Sector
2025-05-19T14:29:07Z

Climate Change Financial Risk Act of 2025
- Display Title
45

Climate Change Financial Risk Act of 2025
2025-04-26T03:23:18Z
- Short Title(s) as Introduced
101

Climate Change Financial Risk Act of 2025
2025-04-26T03:23:17Z
Introduced in House
IH
- Official Title as Introduced
6

To require the Board of Governors of the Federal Reserve System, in consultation with the heads of other relevant Federal agencies, to develop and conduct financial risk analyses relating to climate change, and for other purposes.
2025-04-26T03:18:20Z
Introduced in House
IH
- Introduced in House
2025-04-10T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2823ih/xml/BILLS-119hr2823ih.xml
2025-04-10
Referred to the Committee on Financial Services, and in addition to the Committee on Energy and Commerce, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.