3.0.0
2718
2025-12-17T09:06:14Z
2025-12-17T09:06:14Z
House
H
HR
2025-04-08
119
https://www.congress.gov/bill/119th-congress/house-bill/2718
[Congressional Record Volume 171, Number 63 (Tuesday, April 8, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Ms. KAMLAGER-DOVE:H.R. 2718.Congress has the power to enact this legislation pursuantto the following:This bill is introduced pursuant to the powers granted toCongress under the General Welfare Clause (Art. 1 Sec. 8 Cl.1), the Commerce Clause (Art. 1 Sec. 8 Cl. 3), and theNecessary and Proper Clause (Art. 1 Sec. 8 Cl. 18). Further,this statement of constitutional authority is made for thesole purpose of compliance with clause 7 of Rule XII of theRules of the House of Representatives and shall have nobearing on judicial review of the accompanying bill.[Page H1508]
- hsju00
Judiciary Committee
House
Standing
  - Referred To
2025-04-08T14:02:20Z
- 2025-04-08
Referred to the House Committee on the Judiciary.
IntroReferral
H11100
2
House floor actions
  - hsju00
Judiciary Committee
- 2025-04-08
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-04-08
Introduced in House
IntroReferral
1000
9
Library of Congress
- K000400
Rep. Kamlager-Dove, Sydney [D-CA-37]
Sydney
Kamlager-Dove
D
CA
37
N
- M001212
Rep. Moore, Barry [R-AL-1]
Barry
Moore
R
AL
1
2025-04-08
True
- R000609
Rep. Rutherford, John H. [R-FL-5]
John
Rutherford
R
FL
H.
5
2025-04-08
True
- I000058
Rep. Ivey, Glenn [D-MD-4]
Glenn
Ivey
D
MD
4
2025-04-08
True
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
Eleanor
Norton
D
DC
Holmes
0
2025-04-08
True
- M001229
Rep. McIver, LaMonica [D-NJ-10]
LaMonica
McIver
D
NJ
10
2025-04-08
True
- U000040
Rep. Underwood, Lauren [D-IL-14]
Lauren
Underwood
D
IL
14
2025-04-09
False
- C001072
Rep. Carson, André [D-IN-7]
André
Carson
D
IN
7
2025-04-17
False
- V000131
Rep. Veasey, Marc A. [D-TX-33]
Marc
Veasey
D
TX
A.
33
2025-09-10
False
- F000477
Rep. Foushee, Valerie P. [D-NC-4]
Valerie
Foushee
D
NC
P.
4
2025-12-16
False
Crime and Law Enforcement
Crime and Law Enforcement
2025-05-05T13:25:13Z

Family Notification of Death, Injury, or Illness in Custody Act of 2025
- Display Title
45

Family Notification of Death, Injury, or Illness in Custody Act of 2025
2025-04-17T10:08:18Z
- Short Title(s) as Introduced
101

Family Notification of Death, Injury, or Illness in Custody Act of 2025
2025-04-17T10:08:17Z
Introduced in House
IH
- Official Title as Introduced
6

To establish Federal policies and procedures to notify the next-of-kin or other emergency contact upon the death, or serious illness or serious injury, of an individual in Federal custody, to provide model policies for States, units of local government, and Indian Tribes to implement and enforce similar policies and procedures, and for other purposes.
2025-04-17T10:03:22Z
Introduced in House
IH
- Introduced in House
2025-04-08T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2718ih/xml/BILLS-119hr2718ih.xml
2025-04-08
Referred to the House Committee on the Judiciary.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.