3.0.0
2659
2025-11-20T05:38:25Z
2025-11-20T05:48:25Z
House
H
HR
2025-04-07
119
https://www.congress.gov/bill/119th-congress/house-bill/2659
[Congressional Record Volume 171, Number 62 (Monday, April 7, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. OGLES:H.R. 2659.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8[Page H1461]
- ssga00
Homeland Security and Governmental Affairs Committee
Senate
Standing
  - Referred To
2025-11-18T21:09:58Z
- hshm00
Homeland Security Committee
House
Standing
  - hshm08
Cybersecurity and Infrastructure Protection Subcommittee
    - Referred to
2025-04-07T17:10:23Z
  - Reported By
2025-08-15T16:44:31Z
  - Markup By
2025-04-09T17:11:14Z
  - Discharged from
2025-04-09T17:10:49Z
  - Referred To
2025-04-07T16:02:45Z
H. Rept. 119-230
- 2025-11-18
  - ssga00
Homeland Security and Governmental Affairs Committee
Senate
Received in the Senate and Read twice and referred to the Committee on Homeland Security and Governmental Affairs.
IntroReferral
- 2025-11-17
19:04:22
Motion to reconsider laid on the table Agreed to without objection.
Floor
H38310
2
House floor actions
- 2025-11-17
19:04:21
On motion to suspend the rules and pass the bill Agreed to by the Yeas and Nays: (2/3 required): 402 - 8 (Roll no. 287). (text: CR H4682-4684)
Floor
H37300
2
House floor actions
287
https://clerk.house.gov/evs/2025/roll287.xml
House
119
2025-11-18T00:04:21Z
1
- 2025-11-17
19:04:21
Passed/agreed to in House: On motion to suspend the rules and pass the bill Agreed to by the Yeas and Nays: (2/3 required): 402 - 8 (Roll no. 287). (text: CR H4682-4684)
Floor
8000
9
Library of Congress
287
https://clerk.house.gov/evs/2025/roll287.xml
House
119
2025-11-18T00:04:21Z
1
- 2025-11-17
18:56:39
Considered as unfinished business. (consideration: CR H4692)
Floor
H30000
2
House floor actions
- 2025-11-17
17:00:30
At the conclusion of debate, the Yeas and Nays were demanded and ordered. Pursuant to the provisions of clause 8, rule XX, the Chair announced that further proceedings on the motion would be postponed.
Floor
H37220
2
House floor actions
- 2025-11-17
16:47:18
DEBATE - The House proceeded with forty minutes of debate on H.R. 2659.
Floor
H8D000
2
House floor actions
- 2025-11-17
16:47:16
Considered under suspension of the rules. (consideration: CR H4682-4685)
Floor
H30000
2
House floor actions
- 2025-11-17
16:46:54
Mr. Garbarino moved to suspend the rules and pass the bill.
Floor
H30300
2
House floor actions
- 2025-08-15
Placed on the Union Calendar, Calendar No. 188.
Calendars
H12410
2
House floor actions
U00188
- 2025-08-15
Reported by the Committee on Homeland Security. H. Rept. 119-230.
Committee
H12200
2
House floor actions
  - hshm00
Homeland Security Committee
- 2025-08-15
Reported by the Committee on Homeland Security. H. Rept. 119-230.
Committee
5000
9
Library of Congress
  - hshm00
Homeland Security Committee
- 2025-04-09
  - hshm00
Homeland Security Committee
1
House committee actions
Ordered to be Reported by Voice Vote.
Committee
- 2025-04-09
  - hshm00
Homeland Security Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2025-04-09
  - hshm00
Homeland Security Committee
1
House committee actions
Subcommittee on Cybersecurity and Infrastructure Protection Discharged
Committee
- 2025-04-07
  - hshm08
Cybersecurity and Infrastructure Protection Subcommittee
1
House committee actions
Referred to the Subcommittee on Cybersecurity and Infrastructure Protection.
Committee
- 2025-04-07
Referred to the House Committee on Homeland Security.
IntroReferral
H11100
2
House floor actions
  - hshm00
Homeland Security Committee
- 2025-04-07
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-04-07
Introduced in House
IntroReferral
1000
9
Library of Congress
- O000175
Rep. Ogles, Andrew [R-TN-5]
Andrew
Ogles
R
TN
5
N
- G000590
Rep. Green, Mark E. [R-TN-7]
Mark
Green
R
TN
E.
7
2025-04-07
True
- L000597
Rep. Lee, Laurel M. [R-FL-15]
Laurel
Lee
R
FL
M.
15
2025-04-07
True
- M001194
Rep. Moolenaar, John R. [R-MI-2]
John
Moolenaar
R
MI
R.
2
2025-04-07
True
- G000597
Rep. Garbarino, Andrew R. [R-NY-2]
Andrew
Garbarino
R
NY
R.
2
2025-04-07
True
- 2025-05-05T18:55:00Z

H.R. 2659, Strengthening Cyber Resilience Against State-Sponsored Threats Act
https://www.cbo.gov/publication/61378
As ordered reported by the House Committee on Homeland Security on April 9, 2025
Science, Technology, Communications
- Asia
2025-04-10T14:58:45Z
- China
2025-04-10T14:58:45Z
- Computer security and identity theft
2025-04-10T14:58:45Z
- Congressional oversight
2025-04-10T14:58:45Z
- Federal officials
2025-04-10T14:58:45Z
- Government information and archives
2025-04-10T14:58:45Z
Science, Technology, Communications
2025-04-08T16:38:22Z
07
2025-08-15
Reported to House
2025-09-10T12:27:30Z
Strengthening Cyber Resilience Against State-Sponsored Threats Act
The bill creates a joint interagency task force to facilitate agency collaboration on efforts to respond to Chinese state-sponsored cyber actors, including Volt Typhoon.
The task force must be established and led by the Cybersecurity and Infrastructure Security Agency (CISA), an agency within the Department of Homeland Security (DHS). The task force must facilitate collaboration and coordination among the Sector Risk Management Agencies (SRMAs) specified in the President's National Security Memorandum- 22 (e.g., the Department of Defense, the Department of Energy, and the Department of Agriculture) to detect, analyze, and respond to Chinese state-sponsored cyber actors by ensuring that such agencies’ actions are aligned and mutually reinforcing.
The bill directs DHS, CISA, the Department of Justice, the Federal Bureau of Investigation, and specified SRMAs to provide the task force with analysis, inspections, audits, and other relevant information necessary for the task force to carry out its responsibilities. The production and use of information must comply with all applicable statutes, regulations, and executive orders, and task force members must have appropriate security clearances to access classified information.
The task force must provide annual reports and briefings to Congress detailing its assessment of cyber threats and recommendations to improve the detection and mitigation of the cybersecurity threat posed by Chinese state-sponsored cyber actors.
The first report must be provided no later than 540 days after the establishment of the task force, and additional reports must be provided annually thereafter for six years.

Strengthening Cyber Resilience Against State-Sponsored Threats Act
- Short Titles from RFS (Referred to Senate) bill text
255

Strengthening Cyber Resilience Against State-Sponsored Threats Act
2025-11-20T05:38:25Z
S
Senate
Referred in Senate
RFS
- Official Titles from EH (Engrossed in House) bill text
259

To ensure the security and integrity of United States critical infrastructure by establishing an interagency task force and requiring a comprehensive report on the targeting of United States critical infrastructure by People’s Republic of China state-sponsored cyber actors, and for other purposes.
2025-11-19T03:23:17Z
H
House
Engrossed in House
EH
- Short Title(s) as Passed House
104

Strengthening Cyber Resilience Against State-Sponsored Threats Act
2025-11-19T03:23:17Z
H
House
Engrossed in House
EH
- Short Title(s) as Reported to House
102

Strengthening Cyber Resilience Against State-Sponsored Threats Act
2025-08-16T03:53:18Z
H
House
Reported in House
RH
- Display Title
45

Strengthening Cyber Resilience Against State-Sponsored Threats Act
2025-04-08T10:53:16Z
- Short Title(s) as Introduced
101

Strengthening Cyber Resilience Against State-Sponsored Threats Act
2025-04-08T10:53:15Z
Introduced in House
IH
- Official Title as Introduced
6

To ensure the security and integrity of United States critical infrastructure by establishing an interagency task force and requiring a comprehensive report on the targeting of United States critical infrastructure by People's Republic of China state-sponsored cyber actors, and for other purposes.
2025-04-08T10:48:18Z
Introduced in House
IH
- Referred in Senate
2025-11-18T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2659rfs/xml/BILLS-119hr2659rfs.xml
- Engrossed in House
2025-11-17T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2659eh/xml/BILLS-119hr2659eh.xml
- Reported in House
2025-08-15T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2659rh/xml/BILLS-119hr2659rh.xml
- Introduced in House
2025-04-07T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2659ih/xml/BILLS-119hr2659ih.xml
2025-11-18
Received in the Senate and Read twice and referred to the Committee on Homeland Security and Governmental Affairs.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.