3.0.0
2613
2025-11-06T16:50:11Z
2025-11-06T16:50:11Z
House
H
HR
2025-04-02
119
https://www.congress.gov/bill/119th-congress/house-bill/2613
[Congressional Record Volume 171, Number 59 (Wednesday, April 2, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. WEBER of Texas:H.R. 2613.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8.[Page H1413]
- hssy00
Science, Space, and Technology Committee
House
Standing
  - Markup By
2025-04-29T21:09:55Z
  - Referred To
2025-04-02T22:03:35Z
- 2025-04-29
  - hssy00
Science, Space, and Technology Committee
1
House committee actions
Ordered to be Reported by Voice Vote.
Committee
- 2025-04-29
  - hssy00
Science, Space, and Technology Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2025-04-02
Referred to the House Committee on Science, Space, and Technology.
IntroReferral
H11100
2
House floor actions
  - hssy00
Science, Space, and Technology Committee
- 2025-04-02
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-04-02
Introduced in House
IntroReferral
1000
9
Library of Congress
- W000814
Rep. Weber, Randy K. Sr. [R-TX-14]
Randy
Weber
R
TX
K.
14
N
- R000305
Rep. Ross, Deborah K. [D-NC-2]
Deborah
Ross
D
NC
K.
2
2025-04-02
True
- 2025-11-06T16:45:00Z

H.R. 2613, Next Generation Pipelines Research and Development Act
https://www.cbo.gov/publication/61875
As ordered reported by the House Committee on Science, Space, and Technology on April 29, 2025
Energy
- Advanced technology and technological innovations
2025-05-12T16:21:54Z
- Air quality
2025-05-12T16:37:14Z
- Computer security and identity theft
2025-05-12T16:48:56Z
- Computers and information technology
2025-05-12T16:24:53Z
- Energy storage, supplies, demand
2025-05-12T16:21:06Z
- Geography and mapping
2025-05-12T16:22:38Z
- Hazardous wastes and toxic substances
2025-05-12T16:29:16Z
- Higher education
2025-05-12T16:20:48Z
- Oil and gas
2025-05-12T16:32:17Z
- Pipelines
2025-05-12T16:21:36Z
- Pollution liability
2025-05-12T16:22:16Z
- Public-private cooperation
2025-05-12T16:55:38Z
- Research and development
2025-05-12T16:23:04Z
- Soil pollution
2025-05-12T16:37:21Z
- Technology assessment
2025-05-12T16:29:52Z
- Technology transfer and commercialization
2025-05-12T16:28:33Z
- Water quality
2025-05-12T16:37:52Z
Energy
2025-04-09T14:18:14Z

Next Generation Pipelines Research and Development Act
- Display Title
45

Next Generation Pipelines Research and Development Act
2025-04-09T03:53:16Z
- Short Title(s) as Introduced
101

Next Generation Pipelines Research and Development Act
2025-04-09T03:53:15Z
Introduced in House
IH
- Official Title as Introduced
6

To improve public-private partnerships and increase Federal research, development, and demonstration related to the evolution of next generation pipeline systems, and for other purposes.
2025-04-09T03:48:16Z
Introduced in House
IH
- Introduced in House
2025-04-02T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2613ih/xml/BILLS-119hr2613ih.xml
2025-04-29
Ordered to be Reported by Voice Vote.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.