3.0.0
2428
2025-07-23T14:12:24Z
2025-07-23T14:12:24Z
House
H
HR
2025-03-27
119
[Congressional Record Volume 171, Number 56 (Thursday, March 27, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Ms. FRIEDMAN:H.R. 2428.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8[Page H1338]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
    - Referred to
2025-03-27T21:09:54Z
  - Referred To
2025-03-27T13:02:10Z
- hsba00
Financial Services Committee
House
Standing
  - Referred To
2025-03-27T13:02:15Z
- 2025-03-27
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
1
House committee actions
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
Committee
- 2025-03-27
Referred to the Committee on Transportation and Infrastructure, and in addition to the Committee on Financial Services, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsba00
Financial Services Committee
- 2025-03-27
Referred to the Committee on Transportation and Infrastructure, and in addition to the Committee on Financial Services, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2025-03-27
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-03-27
Introduced in House
IntroReferral
1000
9
Library of Congress
- F000483
Rep. Friedman, Laura [D-CA-30]
Laura
Friedman
D
CA
30
N
- B001285
Rep. Brownley, Julia [D-CA-26]
Julia
Brownley
D
CA
26
2025-03-27
True
- L000582
Rep. Lieu, Ted [D-CA-36]
Ted
Lieu
D
CA
36
2025-03-27
True
- M001225
Rep. Mullin, Kevin [D-CA-15]
Kevin
Mullin
D
CA
15
2025-03-27
True
- S000344
Rep. Sherman, Brad [D-CA-32]
Brad
Sherman
D
CA
32
2025-03-27
True
- J000305
Rep. Jacobs, Sara [D-CA-51]
Sara
Jacobs
D
CA
51
2025-07-21
False
Emergency Management
Emergency Management
2025-05-21T13:51:52Z

Wildfire Homeowner Relief Act
- Display Title
45

Wildfire Homeowner Relief Act
2025-07-23T14:12:24Z
- Short Title(s) as Introduced
101

Wildfire Homeowner Relief Act
2025-04-04T05:08:19Z
Introduced in House
IH
- Official Title as Introduced
6

To require the Comptroller General of the United States to conduct a study regarding a Federal buyout program available to homeowners with properties in high-risk catastrophic wildfire disaster areas, and for other purposes.
2025-04-04T05:03:49Z
Introduced in House
IH
- Introduced in House
2025-03-27T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2428ih/xml/BILLS-119hr2428ih.xml
2025-03-27
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.