3.0.0
2308
2025-09-03T08:05:23Z
2025-09-03T08:05:23Z
House
H
HR
2025-03-24
119
https://www.congress.gov/bill/119th-congress/house-bill/2308
[Congressional Record Volume 171, Number 53 (Monday, March 24, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. MOSKOWITZ:H.R. 2308.Congress has the power to enact this legislation pursuantto the following:Pursuant to clause 3(d)(1) of rule XIII of the Rules of theHouse of Representatives, the Committee find the authorityfor this legislation in article 1, section 8 of theConstitution.[Page H1219]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
    - Referred to
2025-03-24T20:44:39Z
  - Referred To
2025-03-24T16:02:25Z
- hshm00
Homeland Security Committee
House
Standing
  - hshm12
Emergency Management and Technology Subcommittee
    - Referred to
2025-03-24T17:51:25Z
  - Referred To
2025-03-24T16:02:30Z
- 2025-03-24
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
1
House committee actions
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
Committee
- 2025-03-24
  - hshm12
Emergency Management and Technology Subcommittee
1
House committee actions
Referred to the Subcommittee on Emergency Management and Technology.
Committee
- 2025-03-24
Referred to the Committee on Transportation and Infrastructure, and in addition to the Committee on Homeland Security, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hshm00
Homeland Security Committee
- 2025-03-24
Referred to the Committee on Transportation and Infrastructure, and in addition to the Committee on Homeland Security, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2025-03-24
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-03-24
Introduced in House
IntroReferral
1000
9
Library of Congress
- M001217
Rep. Moskowitz, Jared [D-FL-23]
Jared
Moskowitz
D
FL
23
N
- D000032
Rep. Donalds, Byron [R-FL-19]
Byron
Donalds
R
FL
19
2025-03-24
True
- L000397
Rep. Lofgren, Zoe [D-CA-18]
Zoe
Lofgren
D
CA
18
2025-09-02
False
Emergency Management
Emergency Management
2025-05-13T21:17:46Z

FEMA Independence Act of 2025
- Display Title
45

FEMA Independence Act of 2025
2025-04-04T05:08:22Z
- Short Title(s) as Introduced
101

FEMA Independence Act of 2025
2025-04-04T05:08:18Z
Introduced in House
IH
- Official Title as Introduced
6

To establish the Federal Emergency Management Agency as a cabinet-level independent agency, and for other purposes.
2025-04-04T05:03:35Z
Introduced in House
IH
- Introduced in House
2025-03-24T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2308ih/xml/BILLS-119hr2308ih.xml
2025-03-24
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.