3.0.0
2084
2025-12-05T22:06:47Z
2025-12-05T22:06:47Z
House
H
HR
2025-03-11
119
https://www.congress.gov/bill/119th-congress/house-bill/2084
[Congressional Record Volume 171, Number 45 (Tuesday, March 11, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. THOMPSON of California:H.R. 2084.Congress has the power to enact this legislation pursuantto the following:Article 1 Section 8 Clause 18: Necessary and Proper[Page H1152]
- hsag00
Agriculture Committee
House
Standing
  - hsag14
Conservation, Research, and Biotechnology Subcommittee
    - Referred to
2025-04-04T13:12:49Z
  - Referred To
2025-03-11T14:05:45Z

- Smoke Exposure Research Act
119
1042
S
2025-03-13
Read twice and referred to the Committee on Agriculture, Nutrition, and Forestry. (Sponsor introductory remarks on measure: CR S1745)
  - Related bill
CRS
- 2025-04-04
  - hsag14
Conservation, Research, and Biotechnology Subcommittee
1
House committee actions
Referred to the Subcommittee on Conservation, Research, and Biotechnology.
Committee
- 2025-03-11
Referred to the House Committee on Agriculture.
IntroReferral
H11100
2
House floor actions
  - hsag00
Agriculture Committee
- 2025-03-11
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-03-11
Introduced in House
IntroReferral
1000
9
Library of Congress
- T000460
Rep. Thompson, Mike [D-CA-4]
Mike
Thompson
D
CA
4
N
- L000578
Rep. LaMalfa, Doug [R-CA-1]
Doug
LaMalfa
R
CA
1
2025-03-11
True
- H001090
Rep. Harder, Josh [D-CA-9]
Josh
Harder
D
CA
9
2025-03-21
False
- S001193
Rep. Swalwell, Eric [D-CA-14]
Eric
Swalwell
D
CA
14
2025-06-12
False
- P000613
Rep. Panetta, Jimmy [D-CA-19]
Jimmy
Panetta
D
CA
19
2025-06-23
False
- G000559
Rep. Garamendi, John [D-CA-8]
John
Garamendi
D
CA
8
2025-06-23
False
- M001163
Rep. Matsui, Doris O. [D-CA-7]
Doris
Matsui
D
CA
O.
7
2025-06-23
False
- B001326
Rep. Bynum, Janelle S. [D-OR-5]
Janelle
Bynum
D
OR
S.
5
2025-07-02
False
Agriculture and Food
Agriculture and Food
2025-05-14T12:43:51Z
00
2025-03-11
Introduced in House
2025-05-30T12:13:13Z
Smoke Exposure Research Act of 2025
This bill directs the Agricultural Research Service (ARS) to conduct research relating to smoke exposure and wine grapes. This research must be done in coordination with land-grant colleges and universities that are located in California, Oregon, and Washington and have researched the effects of smoke exposure on viticulture and enology operations and practices.
Specifically, ARS must
- conduct research to identify the compounds responsible for smoke exposure,
- conduct research to establish standard methodologies for sampling and testing smoke-exposed wine grapes and smoke-affected wines,
- establish a reliable database of background levels of smoke exposure compounds that occur naturally in wine grapes,
- develop risk assessment tools or mitigation methods to reduce or eliminate smoke exposure, and
- study compounds that can act as a barrier between wine grapes and smoke compounds.

Smoke Exposure Research Act of 2025
- Display Title
45

Smoke Exposure Research Act of 2025
2025-03-26T02:08:22Z
- Short Title(s) as Introduced
101

Smoke Exposure Research Act of 2025
2025-03-26T02:08:18Z
Introduced in House
IH
- Official Title as Introduced
6

To require the Agricultural Research Service to conduct research relating to the exposure of wine grapes to wildfire smoke, and for other purposes.
2025-03-26T02:03:32Z
Introduced in House
IH
- Introduced in House
2025-03-11T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr2084ih/xml/BILLS-119hr2084ih.xml
2025-04-04
Referred to the Subcommittee on Conservation, Research, and Biotechnology.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.