3.0.0
1671
2025-09-02T17:48:58Z
2025-09-02T17:48:58Z
House
H
HR
2025-02-27
119
https://www.congress.gov/bill/119th-congress/house-bill/1671
[Congressional Record Volume 171, Number 39 (Thursday, February 27, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. DAVIDSON:H.R. 1671.Congress has the power to enact this legislation pursuantto the following``Article I, Section 8, Clause 18: The Congress shall havePower . . . To make all Laws which shall be necessary andproper for carrying into Execution the foregoing Powers, andall other Powers vested by this Constitution in theGovernment of the United States, or in any Department orOfficer thereof.''[Page H919]
- hsvr00
Veterans' Affairs Committee
House
Standing
  - hsvr09
Disability Assistance and Memorial Affairs Subcommittee
    - Referred to
2025-03-27T18:00:23Z
  - Referred To
2025-02-27T14:02:40Z
- hsas00
Armed Services Committee
House
Standing
  - Referred To
2025-02-27T14:02:45Z
- 2025-03-27
  - hsvr09
Disability Assistance and Memorial Affairs Subcommittee
1
House committee actions
Referred to the Subcommittee on Disability Assistance and Memorial Affairs.
Committee
- 2025-02-27
Referred to the Committee on Veterans' Affairs, and in addition to the Committee on Armed Services, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsas00
Armed Services Committee
- 2025-02-27
Referred to the Committee on Veterans' Affairs, and in addition to the Committee on Armed Services, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsvr00
Veterans' Affairs Committee
- 2025-02-27
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-02-27
Introduced in House
IntroReferral
1000
9
Library of Congress
- D000626
Rep. Davidson, Warren [R-OH-8]
Warren
Davidson
R
OH
8
N
- N000026
Rep. Nehls, Troy E. [R-TX-22]
Troy
Nehls
R
TX
E.
22
2025-02-27
True
- M001184
Rep. Massie, Thomas [R-KY-4]
Thomas
Massie
R
KY
4
2025-02-27
True
- M001211
Rep. Miller, Mary E. [R-IL-15]
Mary
Miller
R
IL
E.
15
2025-02-27
True
- G000565
Rep. Gosar, Paul A. [R-AZ-9]
Paul
Gosar
R
AZ
A.
9
2025-02-27
True
- W000814
Rep. Weber, Randy K. Sr. [R-TX-14]
Randy
Weber
R
TX
K.
14
2025-02-27
True
- F000246
Rep. Fallon, Pat [R-TX-4]
Pat
Fallon
R
TX
4
2025-02-27
True
- S001214
Rep. Steube, W. Gregory [R-FL-17]
W.
Steube
R
FL
Gregory
17
2025-03-03
False
- L000596
Rep. Luna, Anna Paulina [R-FL-13]
Anna Paulina
Luna
R
FL
13
2025-03-03
False
Armed Forces and National Security
- Cardiovascular and respiratory health
2025-09-02T17:48:31Z
- Congressional oversight
2025-09-02T17:48:41Z
- Government information and archives
2025-09-02T17:48:46Z
- Immunology and vaccination
2025-09-02T17:48:20Z
- Infectious and parasitic diseases
2025-09-02T17:48:35Z
- Military personnel and dependents
2025-09-02T17:48:58Z
- Veterans' medical care
2025-09-02T17:48:53Z
- Veterans' pensions and compensation
2025-09-02T17:48:26Z
Armed Forces and National Security
2025-03-25T18:07:43Z
00
2025-02-27
Introduced in House
2025-07-15T21:28:36Z
Justice for Vaccine Injured Veterans Act of 2025
This bill establishes a presumption of service-connection for certain conditions that become manifest in a member of the Armed Forces who received a COVID-19 vaccine under orders any time from August 24, 2021, through January 10, 2023. Under a presumption of service-connection, specific conditions diagnosed in certain veterans are presumed to have been caused by the circumstances of their military service. Health care benefits and disability compensation may then be awarded.
Specifically, the bill establishes a presumption of service-connection, regardless of whether there is a record of evidence of the condition during a servicemember's period of service, for myocarditis, pericarditis, thrombosis with thrombocytopenia syndrome, Guillain-Barre Syndrome, and any other condition the Department of Veterans Affairs (VA) determines is warranted based on a positive association with the COVID-19 vaccine. Under the bill, if the VA determines an additional condition should be specified, it must submit a notice of such determination to Congress.
The VA must also report to Congress every 60 days for four years regarding claims for compensation related to a condition associated with the COVID-19 vaccine. Such reports must be made publicly available.

Justice for Vaccine Injured Veterans Act of 2025
- Display Title
45

Justice for Vaccine Injured Veterans Act of 2025
2025-03-17T13:23:26Z
- Short Title(s) as Introduced
101

Justice for Vaccine Injured Veterans Act of 2025
2025-03-17T13:23:22Z
Introduced in House
IH
- Official Title as Introduced
6

To amend title 38, United States Code, to provide for a presumption of service-connection under the laws administered by the Secretary of Veterans Affairs for certain diseases associated with the COVID-19 vaccine that become manifest during the one-year period following the receipt of the vaccine, and for other purposes.
2025-03-17T13:19:18Z
Introduced in House
IH
- Introduced in House
2025-02-27T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1671ih/xml/BILLS-119hr1671ih.xml
2025-03-27
Referred to the Subcommittee on Disability Assistance and Memorial Affairs.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.