3.0.0
1045
2025-12-18T05:23:13Z
2025-12-18T05:23:13Z
House
H
HR
2025-02-06
119
https://www.congress.gov/bill/119th-congress/house-bill/1045
[Congressional Record Volume 171, Number 25 (Thursday, February 6, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. KENNEDY of Utah:H.R. 1045.Congress has the power to enact this legislation pursuantto the following:Article 1 Section 8[Page H556]
- sseg00
Energy and Natural Resources Committee
Senate
Standing
  - Referred To
2025-12-16T19:18:10Z
- hsag00
Agriculture Committee
House
Standing
  - hsag15
Forestry and Horticulture Subcommittee
    - Referred to
2025-03-14T20:36:13Z
  - Discharged From
2025-09-15T18:14:24Z
  - Referred To
2025-02-06T15:08:10Z
- hsii00
Natural Resources Committee
House
Standing
  - hsii10
Federal Lands Subcommittee
    - Hearings By (subcommittee)
2025-06-10T16:58:55Z
    - Referred to
2025-06-03T13:57:34Z
  - Reported By
2025-09-15T18:14:13Z
  - Markup By
2025-07-23T16:27:15Z
  - Discharged from
2025-07-23T16:26:51Z
  - Referred To
2025-02-06T15:08:05Z
H. Rept. 119-280

- Utah Wildfire Research Institute Act of 2025
119
457
S
2025-02-06
Read twice and referred to the Committee on Energy and Natural Resources.
  - Identical bill
CRS
- 2025-12-16
  - sseg00
Energy and Natural Resources Committee
Senate
Received in the Senate and Read twice and referred to the Committee on Energy and Natural Resources.
IntroReferral
- 2025-12-15
16:20:26
Motion to reconsider laid on the table Agreed to without objection.
Floor
H38310
2
House floor actions
- 2025-12-15
16:20:23
On motion to suspend the rules and pass the bill Agreed to by voice vote. (text: CR H5876-5877)
Floor
H37300
2
House floor actions
- 2025-12-15
16:20:23
Passed/agreed to in House: On motion to suspend the rules and pass the bill Agreed to by voice vote. (text: CR H5876-5877)
Floor
8000
9
Library of Congress
- 2025-12-15
16:11:50
DEBATE - The House proceeded with forty minutes of debate on H.R. 1045.
Floor
H8D000
2
House floor actions
- 2025-12-15
16:11:48
Considered under suspension of the rules. (consideration: CR H5876-5878)
Floor
H30000
2
House floor actions
- 2025-12-15
16:11:32
Mr. Stauber moved to suspend the rules and pass the bill.
Floor
H30300
2
House floor actions
- 2025-09-15
Placed on the Union Calendar, Calendar No. 236.
Calendars
H12410
2
House floor actions
U00236
- 2025-09-15
Committee on Agriculture discharged.
Discharge
H12300
2
House floor actions
  - hsag00
Agriculture Committee
- 2025-09-15
Committee on Agriculture discharged.
Committee
5500
9
Library of Congress
  - hsag00
Agriculture Committee
- 2025-09-15
Reported by the Committee on Natural Resources. H. Rept. 119-280, Part I.
Committee
H12200
2
House floor actions
  - hsii00
Natural Resources Committee
- 2025-09-15
Reported by the Committee on Natural Resources. H. Rept. 119-280, Part I.
Committee
5000
9
Library of Congress
  - hsii00
Natural Resources Committee
- 2025-07-23
  - hsii00
Natural Resources Committee
1
House committee actions
Ordered to be Reported by Unanimous Consent.
Committee
- 2025-07-23
  - hsii00
Natural Resources Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2025-07-23
  - hsii00
Natural Resources Committee
1
House committee actions
Subcommittee on Federal Lands Discharged
Committee
- 2025-06-10
  - hsii10
Federal Lands Subcommittee
1
House committee actions
Subcommittee Hearings Held
Committee
- 2025-06-03
  - hsii10
Federal Lands Subcommittee
1
House committee actions
Referred to the Subcommittee on Federal Lands.
Committee
- 2025-03-14
  - hsag15
Forestry and Horticulture Subcommittee
1
House committee actions
Referred to the Subcommittee on Forestry and Horticulture.
Committee
- 2025-02-06
Referred to the Committee on Natural Resources, and in addition to the Committee on Agriculture, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsag00
Agriculture Committee
- 2025-02-06
Referred to the Committee on Natural Resources, and in addition to the Committee on Agriculture, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsii00
Natural Resources Committee
- 2025-02-06
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-02-06
Introduced in House
IntroReferral
1000
9
Library of Congress
- K000403
Rep. Kennedy, Mike [R-UT-3]
Mike
Kennedy
R
UT
3
N
- O000086
Rep. Owens, Burgess [R-UT-4]
Burgess
Owens
R
UT
4
2025-02-06
True
- M001213
Rep. Moore, Blake D. [R-UT-1]
Blake
Moore
R
UT
D.
1
2025-02-06
True
- M001228
Rep. Maloy, Celeste [R-UT-2]
Celeste
Maloy
R
UT
2
2025-02-06
True
Public Lands and Natural Resources
- Ecology
2025-06-13T18:52:43Z
- Fires
2025-06-13T18:52:43Z
- Forests, forestry, trees
2025-06-13T18:52:43Z
- Higher education
2025-06-13T18:52:43Z
- Research administration and funding
2025-06-13T18:52:43Z
- Utah
2025-06-13T18:52:43Z
Public Lands and Natural Resources
2025-05-06T13:38:29Z
07
2025-09-15
Reported to House
2025-12-11T15:29:45Z
Utah Wildfire Research Institute Act of 2025
This bill requires the establishment of a Southwest Ecological Restoration Institute in Utah. Such institutes currently exist in Arizona, New Mexico, and Colorado and promote the use of adaptive ecosystem management to reduce the risk of wildfires and restore the health of forest and woodland ecosystems.

Utah Wildfire Research Institute Act of 2025
- Short Titles from RFS (Referred to Senate) bill text
255

Utah Wildfire Research Institute Act of 2025
2025-12-18T05:23:13Z
S
Senate
Referred in Senate
RFS
- Official Titles from EH (Engrossed in House) bill text
259

To amend the Southwest Forest Health and Wildfire Prevention Act of 2004 to require the establishment of an additional Institute under that Act.
2025-12-17T04:08:13Z
H
House
Engrossed in House
EH
- Short Title(s) as Passed House
104

Utah Wildfire Research Institute Act of 2025
2025-12-17T04:08:13Z
H
House
Engrossed in House
EH
- Short Title(s) as Reported to House
102

Utah Wildfire Research Institute Act of 2025
2025-09-16T08:08:17Z
H
House
Reported in House
RH
- Display Title
45

Utah Wildfire Research Institute Act of 2025
2025-03-06T02:53:26Z
- Short Title(s) as Introduced
101

Utah Wildfire Research Institute Act of 2025
2025-03-06T02:53:24Z
Introduced in House
IH
- Official Title as Introduced
6

To amend the Southwest Forest Health and Wildfire Prevention Act of 2004 to require the establishment of an additional Institute under that Act.
2025-03-06T02:48:25Z
Introduced in House
IH
- Referred in Senate
2025-12-16T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1045rfs/xml/BILLS-119hr1045rfs.xml
- Engrossed in House
2025-12-15T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1045eh/xml/BILLS-119hr1045eh.xml
- Reported in House
2025-09-15T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1045rh/xml/BILLS-119hr1045rh.xml
- Introduced in House
2025-02-06T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1045ih/xml/BILLS-119hr1045ih.xml
2025-12-16
Received in the Senate and Read twice and referred to the Committee on Energy and Natural Resources.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.