3.0.0
1001
2025-12-06T06:46:22Z
2025-12-06T06:46:22Z
House
H
HR
2025-02-05
119
https://www.congress.gov/bill/119th-congress/house-bill/1001
[Congressional Record Volume 171, Number 24 (Wednesday, February 5, 2025)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Ms. HAGEMAN:H.R. 1001.Congress has the power to enact this legislation pursuantto the following:Article IV, Section 3, clause 2 (Property Clause)[Page H505]
- sseg00
Energy and Natural Resources Committee
Senate
Standing
  - Referred To
2025-05-14T15:57:09Z
- hsii00
Natural Resources Committee
House
Standing
  - Reported By
2025-04-17T14:04:02Z
  - Markup By
2025-02-12T21:43:00Z
  - Referred To
2025-02-05T15:01:05Z
H. Rept. 119-61

- Basin Fund Preservation Act
119
887
S
2025-03-06
Read twice and referred to the Committee on Energy and Natural Resources.
  - Related bill
CRS
- 2025-05-14
  - sseg00
Energy and Natural Resources Committee
Senate
Received in the Senate and Read twice and referred to the Committee on Energy and Natural Resources.
IntroReferral
- 2025-05-13
16:38:05
Motion to reconsider laid on the table Agreed to without objection.
Floor
H38310
2
House floor actions
- 2025-05-13
16:37:57
On motion to suspend the rules and pass the bill Agreed to by voice vote. (text: CR H1972)
Floor
H37300
2
House floor actions
- 2025-05-13
16:37:57
Passed/agreed to in House: On motion to suspend the rules and pass the bill Agreed to by voice vote. (text: CR H1972)
Floor
8000
9
Library of Congress
- 2025-05-13
16:29:38
DEBATE - The House proceeded with forty minutes of debate on H.R. 1001.
Floor
H8D000
2
House floor actions
- 2025-05-13
16:29:36
Considered under suspension of the rules. (consideration: CR H1972-1973)
Floor
H30000
2
House floor actions
- 2025-05-13
16:29:26
Mr. Westerman moved to suspend the rules and pass the bill.
Floor
H30300
2
House floor actions
- 2025-04-17
Placed on the Union Calendar, Calendar No. 38.
Calendars
H12410
2
House floor actions
- 2025-04-17
Reported by the Committee on Natural Resources. H. Rept. 119-61.
Committee
H12200
2
House floor actions
  - hsii00
Natural Resources Committee
- 2025-04-17
Reported by the Committee on Natural Resources. H. Rept. 119-61.
Committee
5000
9
Library of Congress
  - hsii00
Natural Resources Committee
- 2025-02-12
  - hsii00
Natural Resources Committee
1
House committee actions
Ordered to be Reported by Unanimous Consent.
Committee
- 2025-02-12
  - hsii00
Natural Resources Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2025-02-05
Referred to the House Committee on Natural Resources.
IntroReferral
H11100
2
House floor actions
  - hsii00
Natural Resources Committee
- 2025-02-05
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2025-02-05
Introduced in House
IntroReferral
1000
9
Library of Congress
- H001096
Rep. Hageman, Harriet M. [R-WY-At Large]
Harriet
Hageman
R
WY
M.
N
- M001228
Rep. Maloy, Celeste [R-UT-2]
Celeste
Maloy
R
UT
2
2025-02-11
False
- O000086
Rep. Owens, Burgess [R-UT-4]
Burgess
Owens
R
UT
4
2025-02-26
False
- 2025-05-27T19:53:00Z

H.R. 1001, an act to provide for a memorandum of understanding to address the impacts of a certain record of decision on the Upper Colorado River Basin Fund
https://www.cbo.gov/publication/61430
As passed by the House of Representatives on May 13, 2025
Water Resources Development
- Arizona
2025-05-12T15:49:07Z
- California
2025-05-12T15:49:07Z
- Dams and canals
2025-05-12T15:49:07Z
- Environmental assessment, monitoring, research
2025-05-12T15:49:07Z
- Fishes
2025-05-12T15:49:07Z
- Government trust funds
2025-05-12T15:49:07Z
- Lakes and rivers
2025-05-12T15:49:07Z
- Nevada
2025-05-12T15:49:07Z
- Wildlife conservation and habitat protection
2025-05-12T15:49:07Z
Water Resources Development
2025-05-08T19:05:58Z
00
2025-02-05
Introduced in House
2025-05-12T17:05:13Z
This bill directs the Bureau of Reclamation and the Western Area Power Administration, in consultation with the Glen Canyon Dam Adaptive Management Work Group, to enter into a memorandum of understanding to explore and address the impact that the 2024 record of decision entitled Supplement to the 2016 Glen Canyon Dam Long-Term Experimental and Management Plan Record of Decision has on the Upper Colorado River Basin Fund. The memorandum of understanding must include a plan to (1) address the effects that the decision may have on the fund's obligations, (2) address the impact that the decision has on hydropower production at Glen Canyon Dam, and (3) identify impacts that the decision has had on species listed as threatened or endangered species.
By way of background, Reclamation published a Final Supplemental Environmental Impact Statement (SEIS) under the National Environmental Policy Act of 1969 for the Glen Canyon Dam Long-Term Experimental and Management Plan (LTEMP) in 2024. The SEIS revises the 2016 LTEMP Record of Decision to address two issues: (1) responding to the threat of the invasive smallmouth bass below Glen Canyon Dam, and (2) incorporating the latest sediment science to assess when high-flow experiments should be conducted in order to protect the endangered humpback chub.

To provide for a memorandum of understanding to address the impacts of a certain record of decision on the Upper Colorado River Basin Fund.
- Official Title as Introduced
6

To provide for a memorandum of understanding to address the impacts of a certain record of decision on the Upper Colorado River Basin Fund.
2025-03-05T05:03:33Z
Introduced in House
IH
- Display Title
45

To provide for a memorandum of understanding to address the impacts of a certain record of decision on the Upper Colorado River Basin Fund.
2025-02-06T09:06:22Z
- Referred in Senate
2025-05-14T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1001rfs/xml/BILLS-119hr1001rfs.xml
- Engrossed in House
2025-05-13T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1001eh/xml/BILLS-119hr1001eh.xml
- Reported in House
2025-04-17T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1001rh/xml/BILLS-119hr1001rh.xml
- Introduced in House
2025-02-05T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-119hr1001ih/xml/BILLS-119hr1001ih.xml
2025-05-14
Received in the Senate and Read twice and referred to the Committee on Energy and Natural Resources.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.