3.0.0
3373
2025-08-28T19:04:44Z
2025-08-28T19:04:44Z
Senate
S
S
2023-11-30
118
https://www.congress.gov/bill/118th-congress/senate-bill/3373
- sseg00
Energy and Natural Resources Committee
Senate
Standing
  - Discharged From
2024-12-18T18:29:33Z
  - Referred To
2023-11-30T17:36:59Z

- Energy Permitting Reform Act of 2024
118
4753
S
2024-12-19
Placed on Senate Legislative Calendar under General Orders. Calendar No. 756.
  - Related bill
CRS
- 2024-12-18
18:25:50
Held at the desk.
Floor
H15000
2
House floor actions
- 2024-12-18
18:01:55
Received in the House.
Floor
H14000
2
House floor actions
- 2024-12-18
Senate
Message on Senate action sent to the House.
Floor
- 2024-12-18
Senate
Passed Senate with an amendment by Unanimous Consent. (text of amendment in the nature of a substitute: CR S7134)
Floor
- 2024-12-18
Passed/agreed to in Senate: Passed Senate with an amendment by Unanimous Consent.
Floor
17000
9
Library of Congress
- 2024-12-18
Senate
Measure laid before Senate by unanimous consent. (consideration: CR S7133)
Floor
- 2024-12-18
  - sseg00
Energy and Natural Resources Committee
Senate
Senate Committee on Energy and Natural Resources discharged by Unanimous Consent.
Discharge
- 2024-12-18
Senate Committee on Energy and Natural Resources discharged by Unanimous Consent.
Committee
14500
9
Library of Congress
  - sseg00
Energy and Natural Resources Committee
- 2023-11-30
  - sseg00
Energy and Natural Resources Committee
Senate
Read twice and referred to the Committee on Energy and Natural Resources.
IntroReferral
- 2023-11-30
Introduced in Senate
IntroReferral
10000
9
Library of Congress
- D000618
Sen. Daines, Steve [R-MT]
Steve
Daines
R
MT
N
- C001070
Sen. Casey, Robert P., Jr. [D-PA]
Bob
Casey
D
PA
2023-11-30
True
- H001079
Sen. Hyde-Smith, Cindy [R-MS]
Cindy
Hyde-Smith
R
MS
2023-11-30
True
- F000479
Sen. Fetterman, John [D-PA]
John
Fetterman
D
PA
K.
2023-11-30
True
- S001198
Sen. Sullivan, Dan [R-AK]
Dan
Sullivan
R
AK
2024-01-22
False
- M001153
Sen. Murkowski, Lisa [R-AK]
Lisa
Murkowski
R
AK
2024-01-22
False
- C001075
Sen. Cassidy, Bill [R-LA]
Bill
Cassidy
R
LA
2024-01-22
False
- K000393
Sen. Kennedy, John [R-LA]
John
Kennedy
R
LA
2024-02-26
False
Energy
- Alternative and renewable resources
2025-01-16T20:51:13Z
- Dams and canals
2025-01-16T20:51:08Z
- Electric power generation and transmission
2025-01-16T20:51:23Z
- Infrastructure development
2025-01-16T20:51:03Z
- Licensing and registrations
2025-01-16T20:50:56Z
Energy
2023-12-14T17:01:04Z
55
2024-12-18
Passed Senate
2025-08-28T19:04:35Z
This bill authorizes the Federal Energy Regulatory Commission (FERC) to extend the time period during which the licensees of certain hydropower projects must commence construction of such projects. FERC is authorized, upon the request of the licensees, to extend projects that were issued a license before March 13, 2020. (Under existing law, licensees must commence construction of licensed projects within a time fixed in their license.) The bill also provides that FERC may reinstate such licenses, effective as of the date they expire.

A bill to require the Federal Energy Regulatory Commission to extend the time period during which licensees are required to commence construction of certain hydropower projects.
- Display Title
45

A bill to require the Federal Energy Regulatory Commission to extend the time period during which licensees are required to commence construction of certain hydropower projects.
2024-07-24T15:19:42Z
- Official Title as Introduced
6

A bill to require the Federal Energy Regulatory Commission to extend the time period during which licensees are required to commence construction of certain hydropower projects.
2024-02-27T09:08:24Z
Introduced in Senate
IS
3343
118
SAMDT
In the nature of a substitute.
2024-12-21T12:08:21Z
2024-12-18
Amendment SA 3343 agreed to in Senate by Unanimous Consent.
SA 3343
https://www.congress.gov/amendment/118th-congress/senate-amendment/3343
- D000618
Sen. Daines, Steve [R-MT]
Steve
Daines
R
MT
- H000273
Sen. Hickenlooper, John W. [D-CO]
John
Hickenlooper
D
CO
Submitted on behalf of
- H000273
Sen. Hickenlooper, John W. [D-CO]
John
Hickenlooper
D
CO
Proposed on behalf of
2024-12-18T05:00:00Z
2024-12-18T05:00:00Z
Senate
118
S
Senate
S
3373

A bill to require the Federal Energy Regulatory Commission to extend the time period during which licensees are required to commence construction of certain hydropower projects.
2025-08-28
6
- 2024-12-18
0
Senate
Amendment SA 3343 agreed to in Senate by Unanimous Consent.
Floor
- 2024-12-18
0
Senate
Amendment SA 3343 proposed by Senator Hickenlooper for Senator Daines. (consideration: CR S7133)
Floor
- 2024-12-18
IntroReferral
Intro-S
9
Library of Congress
- 2024-12-18
Senate amendment proposed (on the floor): Amendment SA 3343 proposed by Senator Hickenlooper for Senator Daines.
Floor
93000
9
Library of Congress
- 2024-12-18
Senate amendment submitted
Floor
91000
9
Library of Congress
- 2024-12-18
Senate amendment agreed to: Amendment SA 3343 agreed to in Senate by Unanimous Consent.
Floor
94000
9
Library of Congress
1
- Engrossed in Senate
2024-12-18T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118s3373es/xml/BILLS-118s3373es.xml
- Introduced in Senate
2023-11-30T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118s3373is/xml/BILLS-118s3373is.xml
2024-12-18
Held at the desk.
18:25:50
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.