3.0.0
1111
2025-08-07T21:59:16Z
2025-08-07T21:59:16Z
Senate
S
S
2023-03-30
118
- ssev00
Environment and Public Works Committee
Senate
Standing
  - Reported By
2024-06-17T21:43:55Z
  - Reported By
2023-07-10T21:47:54Z
  - Markup By
2023-05-31T14:56:16Z
  - Referred To
2023-03-30T17:37:09Z
S. Rept. 118-182

- An act to authorize appropriations for the United States Fire Administration and firefighter assistance grant programs, to advance the benefits of nuclear energy, and for other purposes.
118
870
S
2024-07-09
Became Public Law No: 118-67.
  - Related bill
CRS
- 2024-06-17
  - ssev00
Environment and Public Works Committee
Senate
By Senator Carper from Committee on Environment and Public Works filed written report. Report No. 118-182.
Floor
- 2024-06-17
By Senator Carper from Committee on Environment and Public Works filed written report. Report No. 118-182.
Committee
14900
9
Library of Congress
  - ssev00
Environment and Public Works Committee
- 2023-07-10
Senate
Placed on Senate Legislative Calendar under General Orders. Calendar No. 118.
Calendars
- 2023-07-10
  - ssev00
Environment and Public Works Committee
Senate
Committee on Environment and Public Works. Reported by Senator Carper with an amendment in the nature of a substitute. Without written report.
Committee
- 2023-07-10
Committee on Environment and Public Works. Reported by Senator Carper with an amendment in the nature of a substitute. Without written report.
Committee
14000
9
Library of Congress
  - ssev00
Environment and Public Works Committee
- 2023-05-31
  - ssev00
Environment and Public Works Committee
Senate
Committee on Environment and Public Works. Ordered to be reported with an amendment in the nature of a substitute favorably.
Committee
- 2023-03-30
  - ssev00
Environment and Public Works Committee
Senate
Read twice and referred to the Committee on Environment and Public Works.
IntroReferral
- 2023-03-30
Introduced in Senate
IntroReferral
10000
9
Library of Congress
- C001047
Sen. Capito, Shelley Moore [R-WV]
Shelley
Capito
R
WV
Moore
N
- W000802
Sen. Whitehouse, Sheldon [D-RI]
Sheldon
Whitehouse
D
RI
2023-03-30
True
- B001261
Sen. Barrasso, John [R-WY]
John
Barrasso
R
WY
2023-03-30
True
- C000174
Sen. Carper, Thomas R. [D-DE]
Thomas
Carper
D
DE
R.
2023-03-30
True
- C000880
Sen. Crapo, Mike [R-ID]
Mike
Crapo
R
ID
2023-03-30
True
- B001288
Sen. Booker, Cory A. [D-NJ]
Cory
Booker
D
NJ
2023-03-30
True
- G000359
Sen. Graham, Lindsey [R-SC]
Lindsey
Graham
R
SC
2023-03-30
True
- K000377
Sen. Kelly, Mark [D-AZ]
Mark
Kelly
D
AZ
2023-03-30
True
- R000584
Sen. Risch, James E. [R-ID]
James
Risch
R
ID
E.
2023-03-30
True
- H001046
Sen. Heinrich, Martin [D-NM]
Martin
Heinrich
D
NM
T.
2023-03-30
True
- C000141
Sen. Cardin, Benjamin L. [D-MD]
Ben
Cardin
D
MD
2023-04-17
False
- S001191
Sen. Sinema, Kyrsten [I-AZ]
Kyrsten
Sinema
I
AZ
2023-04-17
False
- L000571
Sen. Lummis, Cynthia M. [R-WY]
Cynthia
Lummis
R
WY
M.
2023-04-17
False
- R000618
Sen. Ricketts, Pete [R-NE]
Pete
Ricketts
R
NE
2023-04-25
False
- C001088
Sen. Coons, Christopher A. [D-DE]
Christopher
Coons
D
DE
A.
2023-05-10
False
- W000805
Sen. Warner, Mark R. [D-VA]
Mark
Warner
D
VA
R.
2023-05-10
False
- G000555
Sen. Gillibrand, Kirsten E. [D-NY]
Kirsten
Gillibrand
D
NY
E.
2023-05-18
False
- M001183
Sen. Manchin, Joe, III [D-WV]
Joseph
Manchin
D
WV
2023-06-01
False
- C001096
Sen. Cramer, Kevin [R-ND]
Kevin
Cramer
R
ND
2023-06-01
False
- W000437
Sen. Wicker, Roger F. [R-MS]
Roger
Wicker
R
MS
F.
2023-06-08
False
Energy
- Administrative law and regulatory procedures
2024-01-16T16:30:21Z
- Advanced technology and technological innovations
2024-01-16T16:30:21Z
- Advisory bodies
2024-01-16T16:30:21Z
- Appalachian Regional Commission
2024-01-16T16:30:21Z
- Asia
2024-01-16T16:30:21Z
- Belarus
2024-01-16T16:30:21Z
- Burma
2024-01-16T16:30:21Z
- Canada
2024-01-16T16:30:21Z
- Chemistry
2024-01-16T16:30:21Z
- China
2024-01-16T16:30:21Z
- Congressional oversight
2024-01-16T16:30:21Z
- Cuba
2024-01-16T16:30:22Z
- Department of Energy
2024-01-16T16:30:22Z
- Education programs funding
2024-01-16T16:30:22Z
- Employee hiring
2024-01-16T16:30:22Z
- Employee performance
2024-01-16T16:30:22Z
- Employment and training programs
2024-01-16T16:30:22Z
- Energy research
2024-01-16T16:30:22Z
- Environmental Protection Agency (EPA)
2024-01-16T16:30:22Z
- Europe
2024-01-16T16:30:22Z
- Government employee pay, benefits, personnel management
2024-01-16T16:30:22Z
- Great Lakes
2024-01-16T16:30:22Z
- Hazardous wastes and toxic substances
2024-01-16T16:30:22Z
- Higher education
2024-01-16T16:30:22Z
- Housing and community development funding
2024-01-16T16:30:22Z
- India
2024-01-16T16:30:22Z
- Indian lands and resources rights
2024-01-16T16:30:22Z
- Industrial facilities
2024-01-16T16:30:22Z
- Infrastructure development
2024-01-16T16:30:22Z
- Intergovernmental relations
2024-01-16T16:30:22Z
- International exchange and broadcasting
2024-01-16T16:30:22Z
- International organizations and cooperation
2024-01-16T16:30:22Z
- International scientific cooperation
2024-01-16T16:30:22Z
- Iran
2024-01-16T16:30:22Z
- Licensing and registrations
2024-01-16T16:30:22Z
- Manufacturing
2024-01-16T16:30:22Z
- Materials
2024-01-16T16:30:22Z
- Mining
2024-01-16T16:30:22Z
- North Korea
2024-01-16T16:30:22Z
- Nuclear Regulatory Commission (NRC)
2024-01-16T16:30:22Z
- Nuclear power
2024-01-16T16:30:22Z
- Oil and gas
2024-01-16T16:30:22Z
- Performance measurement
2024-01-16T16:30:22Z
- Public-private cooperation
2024-01-16T16:30:22Z
- Radioactive wastes and releases
2024-01-16T16:30:22Z
- Russia
2024-01-16T16:30:22Z
- Science and engineering education
2024-01-16T16:30:22Z
- Scientific communication
2024-01-16T16:30:22Z
- South Asia
2024-01-16T16:30:22Z
- Syria
2024-01-16T16:30:22Z
- Technology assessment
2024-01-16T16:30:23Z
- Trade restrictions
2024-01-16T16:30:23Z
- User charges and fees
2024-01-16T16:30:23Z
- Venezuela
2024-01-16T16:30:23Z
- Vocational and technical education
2024-01-16T16:30:23Z
- Wages and earnings
2024-01-16T16:30:23Z
Energy
2023-04-19T18:15:17Z
00
2023-03-30
Introduced in Senate
2023-09-26T13:31:45Z
Accelerating Deployment of Versatile, Advanced Nuclear for Clean Energy Act of 2023 or the ADVANCE Act of 2023
This bill sets forth provisions to develop and deploy advanced nuclear fuel for the United States and certain allied countries, restrict the possession or ownership of enriched uranium from Russia or China, clean up hazardous land, and establish related requirements.
Specifically, the bill provides incentives for developing and deploying new nuclear technologies, such as reduced licensing fees and prize awards for deploying such technologies. It also extends through 2045 the indemnification policy under the Price-Anderson Act that limits liability related to the nuclear industry.
It also requires the Nuclear Regulatory Commission (NRC) to (1) develop a process that enables timely licensing of nuclear production facilities or utilization facilities at brownfield sites, and (2) establish an initiative to enhance preparedness and coordination with respect to the qualification and licensing of advanced nuclear fuel. NRC may hire specialized staff without regard to civil service laws to address its critical licensing or regulatory oversight needs.
The NRC must also coordinate certain international nuclear activities and may establish an International Nuclear Reactor Export and Innovation Branch within the Office of International Programs. The bill allows certain foreign entities to receive licenses under the Atomic Energy Act of 1954 for nuclear utilization facilities as specified by the bill.
The bill also allows the Environmental Protection Agency to conduct activities to assist in cleaning up certain abandoned mining sites on tribal lands that are hazardous.
25
2023-07-10
Reported to Senate
2023-09-22T16:54:02Z
Accelerating Deployment of Versatile, Advanced Nuclear for Clean Energy Act of 2023 or the ADVANCE Act of 2023
This bill sets forth provisions to develop and deploy advanced nuclear fuel for the United States and certain allied countries, restrict the possession or ownership of enriched uranium from Russia or China, clean up hazardous land, and establish related requirements.
Specifically, the bill provides incentives for developing and deploying new nuclear technologies, such as reduced licensing fees and prize awards for deploying such technologies. It also extends through 2045 the indemnification policy under the Price-Anderson Act that limits liability related to the nuclear industry.
It also requires the Nuclear Regulatory Commission (NRC) to (1) develop a process that enables timely licensing of nuclear production facilities or utilization facilities at brownfield sites, and (2) establish an initiative to enhance preparedness and coordination with respect to the qualification and licensing of advanced nuclear fuel. NRC may hire specialized staff without regard to civil service laws to address its critical licensing or regulatory oversight needs.
The NRC must also coordinate certain international nuclear activities and may establish an International Nuclear Reactor Export and Innovation Branch within the Office of International Programs. The bill allows certain foreign entities to receive licenses under the Atomic Energy Act of 1954 for nuclear utilization facilities as specified by the bill.
The bill also allows the Environmental Protection Agency to conduct activities to assist in cleaning up certain abandoned mining sites on tribal lands that are hazardous.

ADVANCE Act of 2023
- Display Title
45

ADVANCE Act of 2023
2024-07-24T15:21:38Z
- Official Title as Introduced
6

A bill to enhance United States civil nuclear leadership, support the licensing of advanced nuclear technologies, strengthen the domestic nuclear energy fuel cycle and supply chain, and improve the regulation of nuclear energy, and for other purposes.
2024-06-18T10:56:20Z
Introduced in Senate
IS
- Short Title(s) as Introduced
101

ADVANCE Act of 2023
2024-05-24T13:41:13Z
Introduced in Senate
IS
- Short Title(s) as Introduced
101

Accelerating Deployment of Versatile, Advanced Nuclear for Clean Energy Act of 2023
2024-05-24T13:41:13Z
Introduced in Senate
IS
- Short Title(s) as Reported to Senate
103

ADVANCE Act of 2023
2024-05-24T13:38:50Z
S
Senate
Reported to Senate
RS
- Short Title(s) as Reported to Senate
103

Accelerating Deployment of Versatile, Advanced Nuclear for Clean Energy Act of 2023
2024-05-24T13:38:50Z
S
Senate
Reported to Senate
RS
- Reported to Senate
2023-07-10T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118s1111rs/xml/BILLS-118s1111rs.xml
- Introduced in Senate
2023-03-30T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118s1111is/xml/BILLS-118s1111is.xml
2024-06-17
By Senator Carper from Committee on Environment and Public Works filed written report. Report No. 118-182.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.