3.0.0
9686
2025-08-08T11:57:34Z
2025-08-08T11:57:34Z
House
H
HR
2024-09-19
118
[Congressional Record Volume 170, Number 146 (Thursday, September 19, 2024)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. CARTER of Georgia:H.R. 9686.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8 of the ConstitutionThe single subject of this legislation is:To amend the Congressional Budget and Impoundment ControlAct of 1974 to codify the Panel of Health Advisors within theCongressional Budget Office, and for other purposes.[Page H5525]
- hsbu00
Budget Committee
House
Standing
  - Markup By
2024-09-25T14:35:00Z
  - Referred To
2024-09-19T14:01:45Z
  - Hearings By (full committee)
2024-09-11T14:45:00Z
- 2024-09-25
  - hsbu00
Budget Committee
1
House committee actions
Ordered to be Reported by the Yeas and Nays: 20 - 13.
Committee
- 2024-09-25
  - hsbu00
Budget Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2024-09-19
Referred to the House Committee on the Budget.
IntroReferral
H11100
2
House floor actions
  - hsbu00
Budget Committee
- 2024-09-19
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2024-09-19
Introduced in House
IntroReferral
1000
9
Library of Congress
- 2024-09-11
  - hsbu00
Budget Committee
1
House committee actions
Hearings Held Prior to Introduction
Committee
- C001103
Rep. Carter, Earl L. "Buddy" [R-GA-1]
Earl
Carter
R
GA
L. "Buddy"
1
N
- B001248
Rep. Burgess, Michael C. [R-TX-26]
Michael
Burgess
R
TX
C.
26
2024-09-19
True
- E000298
Rep. Estes, Ron [R-KS-4]
Ron
Estes
R
KS
4
2024-09-24
False
- 2024-10-08T20:00:54Z

H.R. 9686, HEALTH Panel Act
https://www.cbo.gov/publication/60783
As ordered reported by the House Committee on the Budget on September 25, 2024
Health
- Advisory bodies
2025-06-17T17:32:25Z
- Congressional Budget Office (CBO)
2025-06-17T17:32:25Z
- Congressional oversight
2025-06-17T17:32:25Z
- Government information and archives
2025-06-17T17:32:25Z
- Health care costs and insurance
2025-06-17T17:32:25Z
- Health programs administration and funding
2025-06-17T17:32:25Z
- Internet, web applications, social media
2025-06-17T17:32:25Z
Health
2025-08-08T11:57:34Z

HEALTH Panel Act
- Display Title
45

HEALTH Panel Act
2024-09-21T07:53:17Z
- Short Title(s) as Introduced
101

HEALTH Panel Act
2024-09-21T07:53:16Z
Introduced in House
IH
- Short Title(s) as Introduced
101

Healthy Equipping And Lending Technical Help Panel Act
2024-09-21T07:53:16Z
Introduced in House
IH
- Official Title as Introduced
6

To amend the Congressional Budget and Impoundment Control Act of 1974 to codify the Panel of Health Advisors within the Congressional Budget Office, and for other purposes.
2024-09-21T07:48:21Z
Introduced in House
IH
- Introduced in House
2024-09-19T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr9686ih/xml/BILLS-118hr9686ih.xml
2024-09-25
Ordered to be Reported by the Yeas and Nays: 20 - 13.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.