3.0.0
8302
2025-05-27T14:12:17Z
2025-05-27T14:12:17Z
House
H
HR
2024-05-08
118
[Congressional Record Volume 170, Number 80 (Wednesday, May 8, 2024)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. DAVIDSON:H.R. 8302.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8 of the U.S. ConstitutionThe single subject of this legislation is:To establish a commission to review the programs of theDepartment of Housing and Urban Development and makerecommendations for legislative reforms[Page H2998]
- hsru00
Rules Committee
House
Standing
  - Discharged From
2024-12-19T20:03:41Z
  - Unknown
2024-12-05T17:41:00Z
  - Referred To
2024-05-08T14:05:00Z
- hsba00
Financial Services Committee
House
Standing
  - Reported By
2024-12-05T17:40:40Z
  - Markup By
2024-05-16T20:14:00Z
  - Referred To
2024-05-08T14:04:50Z
H. Rept. 118-800
- 2024-12-19
Placed on the Union Calendar, Calendar No. 771.
Calendars
H12410
2
House floor actions
- 2024-12-19
Committee on Rules discharged.
Discharge
H12300
2
House floor actions
  - hsru00
Rules Committee
- 2024-12-19
Committee on Rules discharged.
Committee
5500
9
Library of Congress
  - hsru00
Rules Committee
- 2024-12-05
House Committee on Rules Granted an extension for further consideration ending not later than Dec. 19, 2024.
IntroReferral
H11210
2
House floor actions
  - hsru00
Rules Committee
- 2024-12-05
Reported (Amended) by the Committee on Financial Services. H. Rept. 118-800, Part I.
Committee
H12200
2
House floor actions
  - hsba00
Financial Services Committee
- 2024-12-05
Reported (Amended) by the Committee on Financial Services. H. Rept. 118-800, Part I.
Committee
5000
9
Library of Congress
  - hsba00
Financial Services Committee
- 2024-05-16
  - hsba00
Financial Services Committee
1
House committee actions
Ordered to be Reported (Amended) by the Yeas and Nays: 27 - 22.
Committee
- 2024-05-16
  - hsba00
Financial Services Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2024-05-08
Referred to the Committee on Financial Services, and in addition to the Committee on Rules, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsru00
Rules Committee
- 2024-05-08
Referred to the Committee on Financial Services, and in addition to the Committee on Rules, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsba00
Financial Services Committee
- 2024-05-08
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2024-05-08
Introduced in House
IntroReferral
1000
9
Library of Congress
- D000626
Rep. Davidson, Warren [R-OH-8]
Warren
Davidson
R
OH
8
N
- M001204
Rep. Meuser, Daniel [R-PA-9]
Daniel
Meuser
R
PA
9
2024-05-08
True
- D000032
Rep. Donalds, Byron [R-FL-19]
Byron
Donalds
R
FL
19
2024-05-08
True
- G000597
Rep. Garbarino, Andrew R. [R-NY-2]
Andrew
Garbarino
R
NY
R.
2
2024-05-08
True
- 2024-07-17T17:24:00Z

H.R. 8302, HUD Evaluation and Optimization Commission Act of 2024
https://www.cbo.gov/publication/60535
As reported by the House Committee on Financial Services onMay 16, 2024
Congress
- Advisory bodies
2024-11-20T16:18:32Z
- Congressional oversight
2024-11-20T16:19:09Z
- Department of Housing and Urban Development
2024-11-20T16:18:42Z
- Government information and archives
2024-11-20T16:19:03Z
- House of Representatives
2024-11-20T16:19:22Z
- Legislative rules and procedure
2024-11-20T16:19:16Z
- Performance measurement
2024-11-20T16:18:57Z
- Senate
2024-11-20T16:19:26Z
Congress
2024-08-12T13:02:38Z

HUD Evaluation and Optimization Commission Act of 2024
- Short Title(s) as Reported to House
102

HUD Evaluation and Optimization Commission Act of 2024
2024-12-28T09:08:18Z
H
House
Reported in House
RH
- Display Title
45

HUD Evaluation and Optimization Commission Act of 2024
2024-06-11T16:05:01Z
- Short Title(s) as Introduced
101

HUD Evaluation and Optimization Commission Act of 2024
2024-05-24T13:32:51Z
Introduced in House
IH
- Official Title as Introduced
6

To establish a commission to review the programs of the Department of Housing and Urban Development and make recommendations for legislative reforms, and for other purposes.
2024-05-13T12:26:39Z
Introduced in House
IH
- Reported in House
2024-12-19T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr8302rh/xml/BILLS-118hr8302rh.xml
- Introduced in House
2024-05-08T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr8302ih/xml/BILLS-118hr8302ih.xml
2024-12-19
Placed on the Union Calendar, Calendar No. 771.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.