3.0.0
783
2025-12-05T08:26:01Z
2025-12-05T08:26:01Z
House
H
HR
2023-02-02
118
https://www.congress.gov/bill/118th-congress/house-bill/783
[Congressional Record Volume 169, Number 22 (Thursday, February 2, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. FOSTER:H.R. 783.Congress has the power to enact this legislation pursuantto the following:This bill is enacted pursuant to the power granted toCongress under Article I, Section 8 of the United StatesConstitution.The single subject of this legislation is:Legislating.[Page H681]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
    - Discharged from
2023-02-28T17:31:07Z
    - Referred to
2023-02-03T16:19:24Z
  - Reported By
2023-08-22T19:13:47Z
  - Markup By
2023-02-28T17:31:15Z
  - Discharged from
2023-02-28T17:31:07Z
  - Referred To
2023-02-02T14:32:20Z
H. Rept. 118-163

- A bill to designate the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the "Helen Edwards Engineering Research Center".
118
241
S
2023-02-02
Read twice and referred to the Committee on Environment and Public Works. (text: CR S231)
  - Identical bill
CRS
- 2023-08-22
Placed on the House Calendar, Calendar No. 32.
Calendars
H12420
2
House floor actions
H00032
- 2023-08-22
Reported by the Committee on Transportation and Infrastructure. H. Rept. 118-163.
Committee
H12200
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2023-08-22
Reported by the Committee on Transportation and Infrastructure. H. Rept. 118-163.
Committee
5000
9
Library of Congress
  - hspw00
Transportation and Infrastructure Committee
- 2023-02-28
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Ordered to be Reported by Voice Vote.
Committee
- 2023-02-28
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Committee Consideration and Mark-up Session Held.
Committee
- 2023-02-28
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Subcommittee on Economic Development, Public Buildings, and Emergency Management Discharged.
Committee
- 2023-02-03
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
1
House committee actions
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
Committee
- 2023-02-02
Referred to the House Committee on Transportation and Infrastructure.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2023-02-02
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-02-02
Introduced in House
IntroReferral
1000
9
Library of Congress
- F000454
Rep. Foster, Bill [D-IL-11]
Bill
Foster
D
IL
11
N
- U000040
Rep. Underwood, Lauren [D-IL-14]
Lauren
Underwood
D
IL
14
2023-02-02
True
- 2023-04-17T20:40:00Z

H.R. 783, a bill to designate the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the ‘‘Helen Edwards Engineering Research Center’’
https://www.cbo.gov/publication/59080
As ordered reported by the House Committee on Transportation and Infrastructure on February 28, 2023
Government Operations and Politics
- Department of Energy
2023-07-07T19:30:26Z
- Energy research
2023-03-08T14:30:23Z
- Government buildings, facilities, and property
2023-03-08T14:30:23Z
- Illinois
2023-03-08T14:30:23Z
Government Operations and Politics
2023-03-01T14:01:44Z
00
2023-02-02
Introduced in House
2023-03-17T14:41:09Z
This bill designates the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the Helen Edwards Engineering Research Center.
07
2023-08-22
Reported to House
2023-09-25T18:38:33Z
This bill designates the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the Helen Edwards Engineering Research Center.

To designate the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the "Helen Edwards Engineering Research Center".
- Display Title
45

To designate the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the "Helen Edwards Engineering Research Center".
2024-07-24T15:20:39Z
- Official Title as Introduced
6

To designate the Department of Energy Integrated Engineering Research Center Federal Building located at the Fermi National Accelerator Laboratory in Batavia, Illinois, as the "Helen Edwards Engineering Research Center".
2024-03-18T21:19:20Z
Introduced in House
IH
- Reported in House
2023-08-22T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr783rh/xml/BILLS-118hr783rh.xml
- Introduced in House
2023-02-02T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr783ih/xml/BILLS-118hr783ih.xml
2023-08-22
Placed on the House Calendar, Calendar No. 32.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.