3.0.0
6593
2025-12-05T09:27:13Z
2025-12-05T09:27:13Z
House
H
HR
2023-12-05
118
https://www.congress.gov/bill/118th-congress/house-bill/6593
[Congressional Record Volume 169, Number 200 (Tuesday, December 5, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GOLDMAN of New York:H.R. 6593.Congress has the power to enact this legislation pursuantto the following:Under Article I, Section 8 of the Constitution, Congresshas the power ``to make all Laws which shall be necessary andproper for carrying into the Execution for the foregoingPowers, and all other Powers vested by this Constitution inthe Government of the United States, or any Department orOfficer thereof.''The single subject of this legislation is:To require that the regulations related to SAVE Plan shallhave the force and effect of enacted law.[Page H6144]
- hsed00
Education and Workforce Committee
House
Standing
  - Referred To
2023-12-05T15:01:45Z

- Codifying SAVE Plan Act
118
4058
S
2024-03-22
Read twice and referred to the Committee on Health, Education, Labor, and Pensions.
  - Identical bill
CRS
- 2023-12-05
Referred to the House Committee on Education and the Workforce.
IntroReferral
H11100
2
House floor actions
  - hsed00
Education and Workforce Committee
- 2023-12-05
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-12-05
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000599
Rep. Goldman, Daniel S. [D-NY-10]
Daniel
Goldman
D
NY
S.
10
N
- J000305
Rep. Jacobs, Sara [D-CA-51]
Sara
Jacobs
D
CA
51
2023-12-05
True
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
ELEANOR
NORTON
D
DC
HOLMES
0
2023-12-05
True
- M001143
Rep. McCollum, Betty [D-MN-4]
BETTY
MCCOLLUM
D
MN
4
2023-12-05
True
- C001130
Rep. Crockett, Jasmine [D-TX-30]
Jasmine
Crockett
D
TX
30
2023-12-05
True
- K000389
Rep. Khanna, Ro [D-CA-17]
Ro
Khanna
D
CA
17
2023-12-05
True
- B001278
Rep. Bonamici, Suzanne [D-OR-1]
Suzanne
Bonamici
D
OR
1
2023-12-05
True
- T000487
Rep. Tokuda, Jill N. [D-HI-2]
Jill
Tokuda
D
HI
N.
2
2023-12-06
False
- A000370
Rep. Adams, Alma S. [D-NC-12]
Alma
Adams
D
NC
S.
12
2023-12-06
False
- W000788
Rep. Williams, Nikema [D-GA-5]
Nikema
Williams
D
GA
5
2023-12-06
False
- S001145
Rep. Schakowsky, Janice D. [D-IL-9]
JANICE
SCHAKOWSKY
D
IL
D.
9
2023-12-11
False
- G000586
Rep. Garcia, Jesus G. "Chuy" [D-IL-4]
Jesus
Garcia
D
IL
G.
4
2023-12-11
False
- M001225
Rep. Mullin, Kevin [D-CA-15]
Kevin
Mullin
D
CA
15
2023-12-14
False
- M001163
Rep. Matsui, Doris O. [D-CA-7]
Doris
Matsui
D
CA
O.
7
2024-01-11
False
- G000598
Rep. Garcia, Robert [D-CA-42]
Robert
Garcia
D
CA
42
2024-01-18
False
- K000394
Rep. Kim, Andy [D-NJ-3]
Andy
Kim
D
NJ
3
2024-02-15
False
Education
Education
2024-01-25T22:15:15Z
00
2023-12-05
Introduced in House
2024-10-17T17:49:47Z
Codifying SAVE Plan Act
This bill provides statutory authority for a Department of Education final rule published on July 10, 2023, that creates a new income-driven repayment plan called the Saving on a Valuable Education (SAVE) plan.

Codifying SAVE Plan Act
- Display Title
45

Codifying SAVE Plan Act
2024-07-24T15:19:40Z
- Short Title(s) as Introduced
101

Codifying SAVE Plan Act
2024-05-24T13:35:04Z
Introduced in House
IH
- Official Title as Introduced
6

To require that the regulations related to SAVE Plan shall have the force and effect of enacted law.
2024-03-18T21:56:41Z
Introduced in House
IH
- Introduced in House
2023-12-05T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr6593ih/xml/BILLS-118hr6593ih.xml
2023-12-05
Referred to the House Committee on Education and the Workforce.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.