3.0.0
5441
2025-12-05T08:51:56Z
2025-12-05T08:51:56Z
House
H
HR
2023-09-13
118
https://www.congress.gov/bill/118th-congress/house-bill/5441
[Congressional Record Volume 169, Number 148 (Wednesday, September 13, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. LaLOTA:H.R. 5441.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8 of the United States ConstitutionThe single subject of this legislation is:To reauthorize Long Island Sound programs.[Page H4298]
- ssev00
Environment and Public Works Committee
Senate
Standing
  - Referred To
2024-07-09T15:52:54Z
- hsii00
Natural Resources Committee
House
Standing
  - hsii13
Water, Wildlife and Fisheries Subcommittee
    - Hearings By (subcommittee)
2024-01-18T21:53:18Z
    - Referred to
2024-01-17T20:13:23Z
  - Reported By
2024-06-27T21:27:58Z
  - Markup By
2024-06-12T21:13:30Z
  - Discharged from
2024-06-12T21:13:15Z
  - Referred To
2023-09-13T14:00:25Z
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw02
Water Resources and Environment Subcommittee
    - Referred to
2023-09-14T14:32:27Z
  - Referred To
2023-09-13T14:00:20Z
H. Rept. 118-567

- Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
118
2793
S
2023-09-13
Read twice and referred to the Committee on Environment and Public Works.
  - Identical bill
CRS
- 2024-07-09
  - ssev00
Environment and Public Works Committee
Senate
Received in the Senate and Read twice and referred to the Committee on Environment and Public Works.
IntroReferral
- 2024-07-08
19:09:03
Motion to reconsider laid on the table Agreed to without objection.
Floor
H38310
2
House floor actions
- 2024-07-08
19:09:02
On motion to suspend the rules and pass the bill Agreed to by the Yeas and Nays: (2/3 required): 333 - 51 (Roll no. 337). (text: CR H4464)
Floor
H37300
2
House floor actions
337
https://clerk.house.gov/evs/2024/roll337.xml
House
118
2024-07-08T23:09:02Z
2
- 2024-07-08
19:09:02
Passed/agreed to in House: On motion to suspend the rules and pass the bill Agreed to by the Yeas and Nays: (2/3 required): 333 - 51 (Roll no. 337). (text: CR H4464)
Floor
8000
9
Library of Congress
337
https://clerk.house.gov/evs/2024/roll337.xml
House
118
2024-07-08T23:09:02Z
2
- 2024-07-08
19:03:21
Considered as unfinished business. (consideration: CR H4472-4473)
Floor
H30000
2
House floor actions
- 2024-07-08
16:21:22
At the conclusion of debate, the Yeas and Nays were demanded and ordered. Pursuant to the provisions of clause 8, rule XX, the Chair announced that further proceedings on the motion would be postponed.
Floor
H37220
2
House floor actions
- 2024-07-08
16:09:40
DEBATE - The House proceeded with forty minutes of debate on H.R. 5441.
Floor
H8D000
2
House floor actions
- 2024-07-08
16:09:39
Considered under suspension of the rules. (consideration: CR H4464-4466)
Floor
H30000
2
House floor actions
- 2024-07-08
16:09:23
Mr. Westerman moved to suspend the rules and pass the bill.
Floor
H30300
2
House floor actions
- 2024-06-27
Reported by the Committee on Natural Resources. H. Rept. 118-567, Part I.
Committee
H12200
2
House floor actions
  - hsii00
Natural Resources Committee
- 2024-06-27
Reported by the Committee on Natural Resources. H. Rept. 118-567, Part I.
Committee
5000
9
Library of Congress
  - hsii00
Natural Resources Committee
- 2024-06-12
  - hsii00
Natural Resources Committee
1
House committee actions
Ordered to be Reported by Unanimous Consent.
Committee
- 2024-06-12
  - hsii00
Natural Resources Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2024-06-12
  - hsii00
Natural Resources Committee
1
House committee actions
Subcommittee on Water, Wildlife, and Fisheries Discharged
Committee
- 2024-01-18
  - hsii13
Water, Wildlife and Fisheries Subcommittee
1
House committee actions
Subcommittee Hearings Held
Committee
- 2024-01-17
  - hsii13
Water, Wildlife and Fisheries Subcommittee
1
House committee actions
Referred to the Subcommittee on Water, Wildlife, and Fisheries.
Committee
- 2023-09-14
  - hspw02
Water Resources and Environment Subcommittee
1
House committee actions
Referred to the Subcommittee on Water Resources and Environment.
Committee
- 2023-09-13
Referred to the Committee on Transportation and Infrastructure, and in addition to the Committee on Natural Resources, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsii00
Natural Resources Committee
- 2023-09-13
Referred to the Committee on Transportation and Infrastructure, and in addition to the Committee on Natural Resources, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2023-09-13
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-09-13
Introduced in House
IntroReferral
1000
9
Library of Congress
- L000598
Rep. LaLota, Nick [R-NY-1]
Nick
LaLota
R
NY
1
N
- C001069
Rep. Courtney, Joe [D-CT-2]
Joe
Courtney
D
CT
2
2023-09-13
True
- L000599
Rep. Lawler, Michael [R-NY-17]
Michael
Lawler
R
NY
17
2023-09-21
False
- D000632
Rep. D'Esposito, Anthony [R-NY-4]
Anthony
D'Esposito
R
NY
4
2023-09-21
False
- G000597
Rep. Garbarino, Andrew R. [R-NY-2]
Andrew
Garbarino
R
NY
R.
2
2023-09-21
False
- D000216
Rep. DeLauro, Rosa L. [D-CT-3]
ROSA
DELAURO
D
CT
3
2023-10-25
False
- H001047
Rep. Himes, James A. [D-CT-4]
James
Himes
D
CT
A.
4
2024-04-09
False
- S001201
Rep. Suozzi, Thomas R. [D-NY-3]
Thomas
Suozzi
D
NY
R.
3
2024-04-16
False
- 2024-06-27T21:15:00Z

H.R. 5441, Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
https://www.cbo.gov/publication/60475
As ordered reported by the House Committee on Natural Resources on June 12, 2024
Environmental Protection
- Aquatic ecology
2024-07-22T17:25:55Z
- Environmental assessment, monitoring, research
2024-07-22T17:13:26Z
- Marine pollution
2024-07-22T17:20:12Z
- New York State
2024-07-22T17:26:15Z
- Water quality
2024-07-22T17:20:19Z
Environmental Protection
2023-09-21T13:45:17Z
00
2023-09-13
Introduced in House
2024-07-03T15:32:19Z
Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
This bill reauthorizes the Environmental Protection Agency's Long Island Sound programs through FY2028. The programs, which include a stewardship grant program, focus on conserving and restoring the estuary off the coast of New York and Connecticut.

Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
- Short Titles from RFS (Referred to Senate) bill text
255

Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
2024-07-12T00:58:14Z
S
Senate
Referred in Senate
RFS
- Short Title(s) as Passed House
104

Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
2024-07-10T13:23:19Z
H
House
Engrossed in House
EH
- Display Title
45

Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
2024-06-11T15:46:34Z
- Short Title(s) as Introduced
101

Long Island Sound Restoration and Stewardship Reauthorization Act of 2023
2024-05-24T13:36:40Z
Introduced in House
IH
- Official Title as Introduced
6

To reauthorize Long Island Sound programs, and for other purposes.
2024-03-18T21:23:15Z
Introduced in House
IH
- Referred in Senate
2024-07-09T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr5441rfs/xml/BILLS-118hr5441rfs.xml
- Engrossed in House
2024-07-08T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr5441eh/xml/BILLS-118hr5441eh.xml
- Introduced in House
2023-09-13T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr5441ih/xml/BILLS-118hr5441ih.xml
2024-07-09
Received in the Senate and Read twice and referred to the Committee on Environment and Public Works.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.