3.0.0
4390
2025-01-14T20:56:18Z
2025-01-14T20:56:18Z
House
H
HR
2023-06-27
118
[Congressional Record Volume 169, Number 112 (Tuesday, June 27, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. SCHIFF:H.R. 4390.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8 of the United States ConstitutionThe single subject of this legislation is:Housing[Page H3153]
- hsba00
Financial Services Committee
House
Standing
  - Referred To
2023-06-27T13:01:20Z
- 2023-06-27
Referred to the House Committee on Financial Services.
IntroReferral
H11100
2
House floor actions
  - hsba00
Financial Services Committee
- 2023-06-27
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-06-27
Introduced in House
IntroReferral
1000
9
Library of Congress
- S001150
Rep. Schiff, Adam B. [D-CA-30]
ADAM
SCHIFF
D
CA
B.
28
N
- J000305
Rep. Jacobs, Sara [D-CA-51]
Sara
Jacobs
D
CA
51
2023-06-27
True
- B000574
Rep. Blumenauer, Earl [D-OR-3]
EARL
BLUMENAUER
D
OR
3
2023-06-27
True
- C001067
Rep. Clarke, Yvette D. [D-NY-9]
Yvette
Clarke
D
NY
D.
9
2023-06-27
True
- C001130
Rep. Crockett, Jasmine [D-TX-30]
Jasmine
Crockett
D
TX
30
2023-06-27
True
- E000296
Rep. Evans, Dwight [D-PA-3]
Dwight
Evans
D
PA
3
2023-06-27
True
- J000288
Rep. Johnson, Henry C. "Hank," Jr. [D-GA-4]
Henry
Johnson
D
GA
C. "Hank"
4
2023-06-27
True
- K000389
Rep. Khanna, Ro [D-CA-17]
Ro
Khanna
D
CA
17
2023-06-27
True
- M001225
Rep. Mullin, Kevin [D-CA-15]
Kevin
Mullin
D
CA
15
2023-06-27
True
- N000179
Rep. Napolitano, Grace F. [D-CA-31]
GRACE
NAPOLITANO
D
CA
F.
31
2023-06-27
True
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
ELEANOR
NORTON
D
DC
HOLMES
2023-06-27
True
- S001156
Rep. Sánchez, Linda T. [D-CA-38]
Linda
Sánchez
D
CA
T.
38
2023-06-27
True
- C001080
Rep. Chu, Judy [D-CA-28]
Judy
Chu
D
CA
28
2023-07-11
False
- C001055
Rep. Case, Ed [D-HI-1]
Ed
Case
D
HI
1
2023-07-12
False
- W000788
Rep. Williams, Nikema [D-GA-5]
Nikema
Williams
D
GA
5
2023-07-27
False
- T000472
Rep. Takano, Mark [D-CA-39]
Mark
Takano
D
CA
39
2023-08-01
False
- L000582
Rep. Lieu, Ted [D-CA-36]
Ted
Lieu
D
CA
36
2023-12-05
False
- G000585
Rep. Gomez, Jimmy [D-CA-34]
Jimmy
Gomez
D
CA
34
2024-02-09
False
- L000593
Rep. Levin, Mike [D-CA-49]
Mike
Levin
D
CA
49
2024-11-26
False
Housing and Community Development
- Housing and community development funding
2025-01-14T20:56:05Z
- Low- and moderate-income housing
2025-01-14T20:56:18Z
- Social work, volunteer service, charitable organizations
2025-01-14T20:56:11Z
Housing and Community Development
2023-08-07T18:45:23Z

Housing Navigators Act of 2023
- Display Title
45

Housing Navigators Act of 2023
2024-06-12T18:22:43Z
- Short Title(s) as Introduced
101

Housing Navigators Act of 2023
2024-05-24T13:38:01Z
Introduced in House
IH
- Official Title as Introduced
6

To establish a grant program to provide support for housing navigators who assist individuals in navigating local, State, and Federal housing assistance programs, and for other purposes.
2024-03-18T21:04:20Z
Introduced in House
IH
- Introduced in House
2023-06-27T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr4390ih/xml/BILLS-118hr4390ih.xml
2023-06-27
Referred to the House Committee on Financial Services.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.