3.0.0
4045
2025-05-27T14:15:52Z
2025-05-27T14:15:52Z
House
H
HR
2023-06-12
118
[Congressional Record Volume 169, Number 102 (Monday, June 12, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mrs. RODGERS of Washington:H.R. 4045.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8, Clause 3The single subject of this legislation is:This bill amends the Federal Power Act to modernize thehydropower licensing process.[Page H2811]
- hsif00
Energy and Commerce Committee
House
Standing
  - hsif03
Energy Subcommittee
    - Reported by
2023-10-25T20:47:43Z
    - Markup by
2023-10-25T20:44:15Z
    - Markup by
2023-10-24T20:43:53Z
    - Referred to
2023-06-16T18:17:34Z
  - Markup By
2023-12-05T20:30:24Z
  - Referred To
2023-06-12T16:05:05Z
- hsgo00
Oversight and Government Reform Committee
House
Standing
  - Referred To
2023-06-12T16:05:10Z
- 2023-12-05
  - hsif00
Energy and Commerce Committee
1
House committee actions
Ordered to be Reported (Amended) by the Yeas and Nays: 28 - 19.
Committee
- 2023-12-05
  - hsif00
Energy and Commerce Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2023-10-25
  - hsif03
Energy Subcommittee
1
House committee actions
Forwarded by Subcommittee to Full Committee (Amended) by the Yeas and Nays: 16 - 12.
Committee
- 2023-10-25
  - hsif03
Energy Subcommittee
1
House committee actions
Subcommittee Consideration and Mark-up Session Held
Committee
- 2023-10-24
  - hsif03
Energy Subcommittee
1
House committee actions
Subcommittee Consideration and Mark-up Session Held
Committee
- 2023-06-16
  - hsif03
Energy Subcommittee
1
House committee actions
Referred to the Subcommittee on Energy, Climate and Grid Security.
Committee
- 2023-06-12
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Oversight and Accountability, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsgo00
Oversight and Government Reform Committee
- 2023-06-12
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Oversight and Accountability, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2023-06-12
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-06-12
Introduced in House
IntroReferral
1000
9
Library of Congress
- M001159
Rep. McMorris Rodgers, Cathy [R-WA-5]
Cathy
Rodgers
R
WA
McMorris
5
N
- N000189
Rep. Newhouse, Dan [R-WA-4]
Dan
Newhouse
R
WA
4
2024-10-18
False
- 2024-03-27T15:03:00Z

H.R. 4045, Hydropower Clean Energy Future Act
https://www.cbo.gov/publication/60153
As ordered reported by the House Committee on Energy and Commerce on December 5, 2023
Energy
- Administrative law and regulatory procedures
2024-05-03T17:11:51Z
- Advanced technology and technological innovations
2024-05-03T17:11:51Z
- Air quality
2024-05-03T17:11:51Z
- Alternative and renewable resources
2024-05-03T17:11:51Z
- Alternative dispute resolution, mediation, arbitration
2024-05-03T17:11:51Z
- Climate change and greenhouse gases
2024-05-03T17:11:51Z
- Congressional oversight
2024-05-03T17:11:51Z
- Dams and canals
2024-05-03T17:11:51Z
- Electric power generation and transmission
2024-05-03T17:11:51Z
- Endangered and threatened species
2024-05-03T17:11:51Z
- Energy storage, supplies, demand
2024-05-03T17:11:51Z
- Environmental assessment, monitoring, research
2024-05-03T17:11:51Z
- Federal Energy Regulatory Commission (FERC)
2024-05-03T17:11:51Z
- Government studies and investigations
2024-05-03T17:11:51Z
- Infrastructure development
2024-05-03T17:12:00Z
- Intergovernmental relations
2024-05-03T17:11:51Z
- Licensing and registrations
2024-05-03T17:11:51Z
- Marine and coastal resources, fisheries
2024-05-03T17:11:51Z
- Public utilities and utility rates
2024-05-03T17:11:51Z
- Wildlife conservation and habitat protection
2024-05-03T17:11:51Z
Energy
2023-07-17T15:00:25Z

Hydropower Clean Energy Future Act
- Display Title
45

Hydropower Clean Energy Future Act
2024-07-24T15:21:35Z
- Short Title(s) as Introduced
101

Hydropower Clean Energy Future Act
2024-05-24T13:38:44Z
Introduced in House
IH
- Official Title as Introduced
6

To modernize the hydropower licensing process and to promote next-generation hydropower projects, and for other purposes.
2024-03-18T20:58:45Z
Introduced in House
IH
- Introduced in House
2023-06-12T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr4045ih/xml/BILLS-118hr4045ih.xml
2023-12-05
Ordered to be Reported (Amended) by the Yeas and Nays: 28 - 19.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.