3.0.0
3842
2025-12-05T08:54:17Z
2025-12-05T08:54:17Z
House
H
HR
2023-06-06
118
https://www.congress.gov/bill/118th-congress/house-bill/3842
[Congressional Record Volume 169, Number 98 (Tuesday, June 6, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Ms. SCHRIER:H.R. 3842.Congress has the power to enact this legislation pursuantto the following:Article IThe single subject of this legislation is:Health Care--diabetes[Page H2763]
- hswm00
Ways and Means Committee
House
Standing
  - hswm02
Health Subcommittee
    - Referred to
2024-12-17T17:31:29Z
  - Referred To
2023-06-06T14:04:30Z
- hsif00
Energy and Commerce Committee
House
Standing
  - hsif14
Health Subcommittee
    - Reported by
2023-11-15T22:16:01Z
    - Markup by
2023-11-15T22:15:43Z
    - Referred to
2023-06-09T18:17:34Z
  - Markup By
2023-12-06T16:24:58Z
  - Markup By
2023-12-05T16:24:36Z
  - Referred To
2023-06-06T14:04:25Z

- Expanding Access to Diabetes Self-Management Training Act of 2023
118
1832
S
2023-06-06
Read twice and referred to the Committee on Finance.
  - Identical bill
CRS
- 2024-12-17
  - hswm02
Health Subcommittee
1
House committee actions
Referred to the Subcommittee on Health.
Committee
- 2023-12-06
  - hsif00
Energy and Commerce Committee
1
House committee actions
Ordered to be Reported (Amended) by the Yeas and Nays: 44 - 0.
Committee
- 2023-12-06
  - hsif00
Energy and Commerce Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2023-12-05
  - hsif00
Energy and Commerce Committee
1
House committee actions
Committee Consideration and Mark-up Session Held
Committee
- 2023-11-15
  - hsif14
Health Subcommittee
1
House committee actions
Forwarded by Subcommittee to Full Committee in the Nature of a Substitute (Amended) by Voice Vote.
Committee
- 2023-11-15
  - hsif14
Health Subcommittee
1
House committee actions
Subcommittee Consideration and Mark-up Session Held
Committee
- 2023-06-09
  - hsif14
Health Subcommittee
1
House committee actions
Referred to the Subcommittee on Health.
Committee
- 2023-06-06
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hswm00
Ways and Means Committee
- 2023-06-06
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2023-06-06
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-06-06
Introduced in House
IntroReferral
1000
9
Library of Congress
- S001216
Rep. Schrier, Kim [D-WA-8]
Kim
Schrier
D
WA
8
N
- B001257
Rep. Bilirakis, Gus M. [R-FL-12]
Gus
Bilirakis
R
FL
M.
12
2023-06-06
True
- D000197
Rep. DeGette, Diana [D-CO-1]
DIANA
DEGETTE
D
CO
1
2023-06-06
True
- B001275
Rep. Bucshon, Larry [R-IN-8]
Larry
Bucshon
R
IN
8
2023-06-06
True
- D000617
Rep. DelBene, Suzan K. [D-WA-1]
Suzan
DelBene
D
WA
K.
1
2023-06-06
True
- K000376
Rep. Kelly, Mike [R-PA-16]
Mike
Kelly
R
PA
16
2023-06-06
True
- R000599
Rep. Ruiz, Raul [D-CA-25]
Raul
Ruiz
D
CA
25
2023-06-06
True
- S001183
Rep. Schweikert, David [R-AZ-1]
David
Schweikert
R
AZ
1
2023-06-06
True
- P000607
Rep. Pocan, Mark [D-WI-2]
Mark
Pocan
D
WI
2
2023-06-14
False
- W000797
Rep. Wasserman Schultz, Debbie [D-FL-25]
Debbie
Wasserman Schultz
D
FL
25
2023-06-14
False
- R000576
Rep. Ruppersberger, C. A. Dutch [D-MD-2]
C. A.
Ruppersberger
D
MD
Dutch
2
2023-07-06
False
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
ELEANOR
NORTON
D
DC
HOLMES
0
2023-07-06
False
- L000598
Rep. LaLota, Nick [R-NY-1]
Nick
LaLota
R
NY
1
2023-09-29
False
- F000466
Rep. Fitzpatrick, Brian K. [R-PA-1]
Brian
Fitzpatrick
R
PA
K.
1
2023-09-29
False
- V000129
Rep. Valadao, David G. [R-CA-22]
David
Valadao
R
CA
G.
22
2023-11-08
False
- M000871
Rep. Mann, Tracey [R-KS-1]
Tracey
Mann
R
KS
1
2023-11-30
False
- D000594
Rep. De La Cruz, Monica [R-TX-15]
Monica
De La Cruz
R
TX
15
2024-01-25
False
- W000826
Rep. Wild, Susan [D-PA-7]
Susan
Wild
D
PA
7
2024-03-12
False
- P000597
Rep. Pingree, Chellie [D-ME-1]
Chellie
Pingree
D
ME
1
2024-05-15
False
- 2024-03-13T21:18:00Z

H.R. 3842, Expanding Access to Diabetes Self-Management Training Act of 2023
https://www.cbo.gov/publication/60092
As ordered reported by the House Committee on Energy and Commerce on December 6, 2023
Health
- Digestive and metabolic diseases
2023-10-25T13:15:18Z
- Health care coverage and access
2023-10-25T13:15:18Z
- Health promotion and preventive care
2023-10-25T13:15:18Z
- Health technology, devices, supplies
2023-10-25T13:15:18Z
- Home and outpatient care
2023-10-25T13:15:18Z
- Internet, web applications, social media
2023-10-25T13:15:18Z
- Medicare
2023-10-25T13:15:18Z
Health
2023-06-29T13:15:29Z
00
2023-06-06
Introduced in House
2023-10-17T15:45:39Z
Expanding Access to Diabetes Self-Management Training Act of 2023
This bill expands Medicare coverage of diabetes outpatient self-management training. It also requires the Center for Medicare and Medicaid Innovation to test a model in which such training is provided virtually.

Expanding Access to Diabetes Self-Management Training Act of 2023
- Display Title
45

Expanding Access to Diabetes Self-Management Training Act of 2023
2024-06-11T15:38:54Z
- Short Title(s) as Introduced
101

Expanding Access to Diabetes Self-Management Training Act of 2023
2024-05-24T13:39:10Z
Introduced in House
IH
- Official Title as Introduced
6

To amend title XVIII of the Social Security Act to improve access to diabetes outpatient self-management training services, to require the Center for Medicare and Medicaid Innovation to test the provision of virtual diabetes outpatient self-management training services, and for other purposes.
2024-03-18T20:56:59Z
Introduced in House
IH
- Introduced in House
2023-06-06T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr3842ih/xml/BILLS-118hr3842ih.xml
2024-12-17
Referred to the Subcommittee on Health.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.