3.0.0
3785
2024-08-26T10:51:49Z
2024-08-26T10:51:49Z
House
H
HR
2023-06-01
118
[Congressional Record Volume 169, Number 95 (Thursday, June 1, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GARAMENDI:H.R. 3785.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8, Clause 3The single subject of this legislation is:The bill requires construction inspection functions forFederal-aid highways to be conducted by public employees,with a limited, 1-year exception if the State or localtransportation agency lacks the staffing to conduct theseinspections[Page H2713]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw12
Highways and Transit Subcommittee
    - Referred to
2023-06-02T15:41:45Z
  - Referred to
2023-06-01T15:01:20Z
- 2023-06-05
Sponsor introductory remarks on measure. (CR E518)
IntroReferral
B00100
9
Library of Congress
- 2023-06-02
  - hspw12
Highways and Transit Subcommittee
1
House committee actions
Referred to the Subcommittee on Highways and Transit.
Committee
- 2023-06-01
Referred to the House Committee on Transportation and Infrastructure.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2023-06-01
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-06-01
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000559
Rep. Garamendi, John [D-CA-8]
John
Garamendi
D
CA
8
N
- B001285
Rep. Brownley, Julia [D-CA-26]
Julia
Brownley
D
CA
26
2023-06-01
True
- J000032
Rep. Jackson Lee, Sheila [D-TX-18]
SHEILA
JACKSON LEE
D
TX
18
2023-06-01
True
- R000579
Rep. Ryan, Patrick [D-NY-18]
Patrick
Ryan
D
NY
18
2023-06-05
False
- L000562
Rep. Lynch, Stephen F. [D-MA-8]
Stephen
Lynch
D
MA
F.
8
2023-06-16
False
- S001150
Rep. Schiff, Adam B. [D-CA-30]
ADAM
SCHIFF
D
CA
B.
30
2023-10-18
False
- N000179
Rep. Napolitano, Grace F. [D-CA-31]
GRACE
NAPOLITANO
D
CA
F.
31
2024-02-07
False
- P000618
Rep. Porter, Katie [D-CA-47]
Katie
Porter
D
CA
47
2024-03-06
False
- R000305
Rep. Ross, Deborah K. [D-NC-2]
Deborah
Ross
D
NC
K.
2
2024-06-04
False
- B001223
Rep. Bowman, Jamaal [D-NY-16]
Jamaal
Bowman
D
NY
16
2024-06-07
False
- T000481
Rep. Tlaib, Rashida [D-MI-12]
Rashida
Tlaib
D
MI
12
2024-06-21
False
Transportation and Public Works
- Government employee pay, benefits, personnel management
2023-11-02T11:30:38Z
- Infrastructure development
2023-11-02T11:30:38Z
- Intergovernmental relations
2023-11-02T11:30:38Z
- Public contracts and procurement
2023-11-02T11:30:39Z
- Roads and highways
2023-11-02T11:30:39Z
- State and local government operations
2023-11-02T11:30:39Z
Transportation and Public Works
2023-06-29T14:45:21Z
00
2023-06-01
Introduced in House
2024-08-26T10:45:58Z
Public Inspectors for Safe Infrastructure Act
This bill requires state and local transportation agencies that contract for the construction of federal-aid highways to ensure that a public employee performs the construction inspection functions (such as construction engineering, on-site quality control inspections, and materials testing).

Public Inspectors for Safe Infrastructure Act
- Display Title
45

Public Inspectors for Safe Infrastructure Act
2024-06-08T08:05:30Z
- Short Title(s) as Introduced
101

Public Inspectors for Safe Infrastructure Act
2024-05-24T13:39:10Z
Introduced in House
IH
- Official Title as Introduced
6

To amend title 23, United States Code, to require that public employees perform construction inspection work for federally funded highway projects, and for other purposes.
2024-03-18T20:55:46Z
Introduced in House
IH
- Introduced in House
2023-06-01T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr3785ih/xml/BILLS-118hr3785ih.xml
2023-06-05
Sponsor introductory remarks on measure. (CR E518)
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.