3.0.0
3674
2025-05-27T14:12:59Z
2025-05-27T14:12:59Z
House
H
HR
2023-05-25
118
[Congressional Record Volume 169, Number 89 (Thursday, May 25, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. BILIRAKIS:H.R. 3674.Congress has the power to enact this legislation pursuantto the following:This bill is enacted pursuant to Article 1, Section 8,Clause 18 of the Constitution of the United States.The single subject of this legislation is:This bill provides relief for certain medical practices innonfacility settings under the Medicare program.[Page H2639]
- hswm00
Ways and Means Committee
House
Standing
  - hswm02
Health Subcommittee
    - Referred to
2024-12-17T17:37:25Z
  - Referred To
2023-05-25T13:06:45Z
- hsif00
Energy and Commerce Committee
House
Standing
  - hsif14
Health Subcommittee
    - Referred to
2023-05-26T15:30:10Z
  - Referred To
2023-05-25T13:06:40Z
- 2024-12-17
  - hswm02
Health Subcommittee
1
House committee actions
Referred to the Subcommittee on Health.
Committee
- 2023-05-26
  - hsif14
Health Subcommittee
1
House committee actions
Referred to the Subcommittee on Health.
Committee
- 2023-05-25
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hswm00
Ways and Means Committee
- 2023-05-25
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2023-05-25
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-05-25
Introduced in House
IntroReferral
1000
9
Library of Congress
- B001257
Rep. Bilirakis, Gus M. [R-FL-12]
Gus
Bilirakis
R
FL
M.
12
N
- C001097
Rep. Cárdenas, Tony [D-CA-29]
Tony
Cárdenas
D
CA
29
2023-05-25
True
- M001210
Rep. Murphy, Gregory F. [R-NC-3]
Gregory
Murphy
R
NC
F.
3
2023-05-25
True
- D000096
Rep. Davis, Danny K. [D-IL-7]
DANNY
DAVIS
D
IL
K.
7
2023-05-25
True
- D000628
Rep. Dunn, Neal P. [R-FL-2]
Neal
Dunn
R
FL
P.
2
2023-06-09
False
- S001214
Rep. Steube, W. Gregory [R-FL-17]
W.
Steube
R
FL
Gregory
17
2023-07-12
False
- S001200
Rep. Soto, Darren [D-FL-9]
Darren
Soto
D
FL
9
2023-07-12
False
- M001215
Rep. Miller-Meeks, Mariannette [R-IA-1]
Mariannette
Miller-Meeks
R
IA
1
2023-07-24
False
- V000133
Rep. Van Drew, Jefferson [R-NJ-2]
Jefferson
Van Drew
R
NJ
2
2023-07-24
False
- S000250
Rep. Sessions, Pete [R-TX-17]
PETE
SESSIONS
R
TX
17
2023-07-24
False
- C001039
Rep. Cammack, Kat [R-FL-3]
Kat
Cammack
R
FL
3
2023-07-27
False
- T000467
Rep. Thompson, Glenn [R-PA-15]
Glenn
Thompson
R
PA
15
2023-08-01
False
- G000583
Rep. Gottheimer, Josh [D-NJ-5]
Josh
Gottheimer
D
NJ
5
2023-08-01
False
- T000487
Rep. Tokuda, Jill N. [D-HI-2]
Jill
Tokuda
D
HI
N.
2
2023-10-06
False
- R000609
Rep. Rutherford, John H. [R-FL-5]
John
Rutherford
R
FL
H.
5
2023-10-06
False
- C001063
Rep. Cuellar, Henry [D-TX-28]
Henry
Cuellar
D
TX
28
2023-10-06
False
- P000604
Rep. Payne, Donald M., Jr. [D-NJ-10]
Donald
Payne
D
NJ
M.
10
2023-10-25
False
- H001086
Rep. Harshbarger, Diana [R-TN-1]
Diana
Harshbarger
R
TN
1
2024-03-13
False
Health
- Congressional oversight
2024-01-08T20:30:28Z
- Health care costs and insurance
2024-01-08T20:30:28Z
- Health care coverage and access
2024-01-08T20:30:28Z
- Medicare
2024-01-08T20:30:28Z
Health
2023-06-21T15:16:03Z
00
2023-05-25
Introduced in House
2024-04-18T18:25:51Z
Providing Relief and Stability for Medicare Patients Act of 2023
This bill temporarily increases the payment rate under Medicare for certain office-based services that involve high-priced equipment.
Specifically, the bill increases the payment rate under the Medicare physician fee schedule for services provided in a nonfacility (i.e., office) setting for which most of the cost is attributable to equipment and supplies. The increase applies to services furnished in 2024 and 2025.
Additionally, the Government Accountability Office must report on the correlation, if any, of payment rates for these services under the Medicare physician fee schedule and patient access to these services.

Providing Relief and Stability for Medicare Patients Act of 2023
- Display Title
45

Providing Relief and Stability for Medicare Patients Act of 2023
2024-06-11T15:39:38Z
- Short Title(s) as Introduced
101

Providing Relief and Stability for Medicare Patients Act of 2023
2024-05-24T13:39:25Z
Introduced in House
IH
- Official Title as Introduced
6

To amend title XVIII of the Social Security Act to increase the nonfacility practice expense relative value units for specified services furnished under the Medicare program.
2024-03-18T20:53:57Z
Introduced in House
IH
- Introduced in House
2023-05-25T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr3674ih/xml/BILLS-118hr3674ih.xml
2024-12-17
Referred to the Subcommittee on Health.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.