3.0.0
3616
2024-07-03T08:05:42Z
2024-07-03T08:05:42Z
House
H
HR
2023-05-23
118
[Congressional Record Volume 169, Number 87 (Tuesday, May 23, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. TRONE:H.R. 3616.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8 of the Constitution of the UnitedStatesThe single subject of this legislation is:This bill is about requiring the FAA to include medicationsand medical equipment for the emergency treatment of known orsuspected opioid overdose in aircraft emergency medical kits.[Page H2547]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw05
Aviation Subcommittee
    - Referred to
2023-05-24T20:45:02Z
  - Referred to
2023-05-23T14:03:40Z
- 2023-05-24
  - hspw05
Aviation Subcommittee
1
House committee actions
Referred to the Subcommittee on Aviation.
Committee
- 2023-05-23
Referred to the House Committee on Transportation and Infrastructure.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2023-05-23
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-05-23
Introduced in House
IntroReferral
1000
9
Library of Congress
- T000483
Rep. Trone, David J. [D-MD-6]
David
Trone
D
MD
J.
6
N
- P000620
Rep. Pettersen, Brittany [D-CO-7]
Brittany
Pettersen
D
CO
7
2023-05-23
True
- E000071
Rep. Ellzey, Jake [R-TX-6]
Jake
Ellzey
R
TX
6
2023-05-23
True
- T000468
Rep. Titus, Dina [D-NV-1]
Dina
Titus
D
NV
1
2023-06-05
False
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
ELEANOR
NORTON
D
DC
HOLMES
0
2023-06-05
False
- T000469
Rep. Tonko, Paul [D-NY-20]
Paul
Tonko
D
NY
20
2023-06-05
False
- C001127
Rep. Cherfilus-McCormick, Sheila [D-FL-20]
Sheila
Cherfilus-McCormick
D
FL
20
2023-06-05
False
- K000382
Rep. Kuster, Ann M. [D-NH-2]
Ann
Kuster
D
NH
M.
2
2023-06-05
False
- C001119
Rep. Craig, Angie [D-MN-2]
Angie
Craig
D
MN
2
2023-06-06
False
- W000822
Rep. Watson Coleman, Bonnie [D-NJ-12]
Bonnie
Watson Coleman
D
NJ
12
2023-06-07
False
- S001150
Rep. Schiff, Adam B. [D-CA-30]
ADAM
SCHIFF
D
CA
B.
30
2023-06-07
False
- K000389
Rep. Khanna, Ro [D-CA-17]
Ro
Khanna
D
CA
17
2023-06-07
False
- G000551
Rep. Grijalva, Raúl M. [D-AZ-7]
Raúl
Grijalva
D
AZ
M.
7
2023-06-16
False
- S001225
Rep. Sorensen, Eric [D-IL-17]
Eric
Sorensen
D
IL
17
2023-06-16
False
- N000194
Rep. Nickel, Wiley [D-NC-13]
Wiley
Nickel
D
NC
13
2023-06-16
False
- A000376
Rep. Allred, Colin Z. [D-TX-32]
Colin
Allred
D
TX
Z.
32
2023-07-13
False
- B001298
Rep. Bacon, Don [R-NE-2]
Don
Bacon
R
NE
2
2023-07-18
False
- F000466
Rep. Fitzpatrick, Brian K. [R-PA-1]
Brian
Fitzpatrick
R
PA
K.
1
2023-08-18
False
- B001315
Rep. Budzinski, Nikki [D-IL-13]
Nikki
Budzinski
D
IL
13
2023-10-11
False
- S000522
Rep. Smith, Christopher H. [R-NJ-4]
Christopher
Smith
R
NJ
H.
4
2024-04-12
False
- M001223
Rep. Magaziner, Seth [D-RI-2]
Seth
Magaziner
D
RI
2
2024-07-02
False
Transportation and Public Works
- Aviation and airports
2023-10-17T12:45:16Z
- Drug therapy
2023-10-17T12:45:17Z
- Drug, alcohol, tobacco use
2023-10-17T12:45:16Z
- Emergency medical services and trauma care
2023-10-17T12:45:16Z
- Health technology, devices, supplies
2023-10-17T12:45:16Z
- Transportation employees
2023-10-17T12:45:16Z
Transportation and Public Works
2023-06-16T15:45:22Z
00
2023-05-23
Introduced in House
2023-12-14T15:31:27Z
This bill directs the Federal Aviation Administration (FAA) to require that medications and medical equipment for the emergency treatment of a known or suspected opioid overdose be included in an aircraft emergency medical kit; the FAA must, to the maximum extent possible, follow the guidance of the Aerospace Medical Association.
In a 2019 guidance document to the FAA, the Aerospace Medical Association recommended including an opioid antagonist (e.g., naloxone or Narcan) in an aircraft emergency medical kit.

To direct the Administrator of the Federal Aviation Administration to include medications and medical equipment for the emergency treatment of known or suspected opioid overdose in aircraft emergency medical kits, and for other purposes.
- Display Title
45

To direct the Administrator of the Federal Aviation Administration to include medications and medical equipment for the emergency treatment of known or suspected opioid overdose in aircraft emergency medical kits, and for other purposes.
2024-06-11T15:49:49Z
- Official Title as Introduced
6

To direct the Administrator of the Federal Aviation Administration to include medications and medical equipment for the emergency treatment of known or suspected opioid overdose in aircraft emergency medical kits, and for other purposes.
2024-03-18T20:52:17Z
Introduced in House
IH
- Introduced in House
2023-05-23T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr3616ih/xml/BILLS-118hr3616ih.xml
2023-05-24
Referred to the Subcommittee on Aviation.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.