3.0.0
3316
2025-11-18T11:18:14Z
2025-11-18T11:18:14Z
House
H
HR
2023-05-15
118
https://www.congress.gov/bill/118th-congress/house-bill/3316
[Congressional Record Volume 169, Number 81 (Monday, May 15, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. CRAWFORD:H.R. 3316.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8, Clause 3 of the U.S. ConstitutionThe single subject of this legislation is:Streamlines the environmental review process for majorinfrastructure projects.[Page H2348]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw14
Railroads, Pipelines, and Hazardous Materials Subcommittee
    - Discharged from
2023-05-23T18:10:18Z
    - Referred to
2023-05-16T14:07:39Z
  - hspw07
Coast Guard and Maritime Transportation Subcommittee
    - Discharged from
2023-05-23T18:10:11Z
    - Referred to
2023-05-16T14:07:29Z
  - hspw05
Aviation Subcommittee
    - Discharged from
2023-05-23T18:09:54Z
    - Referred to
2023-05-16T14:07:21Z
  - Reported By
2024-12-19T16:19:08Z
  - Markup By
2023-05-23T18:22:42Z
  - Discharged from
2023-05-23T18:10:18Z
  - Discharged from
2023-05-23T18:10:11Z
  - Discharged from
2023-05-23T18:09:54Z
  - Referred To
2023-05-15T16:05:05Z
H. Rept. 118-930
- 2024-12-19
Placed on the Union Calendar, Calendar No. 760.
Calendars
H12410
2
House floor actions
- 2024-12-19
Reported by the Committee on Transportation and Infrastructure. H. Rept. 118-930.
Committee
H12200
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2024-12-19
Reported by the Committee on Transportation and Infrastructure. H. Rept. 118-930.
Committee
5000
9
Library of Congress
  - hspw00
Transportation and Infrastructure Committee
- 2023-05-23
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Ordered to be Reported by Voice Vote.
Committee
- 2023-05-23
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Committee Consideration and Mark-up Session Held.
Committee
- 2023-05-23
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Subcommittee on Railroads, Pipelines, and Hazardous Materials Discharged.
Committee
- 2023-05-23
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Subcommittee on Coast Guard and Maritime Transportation Discharged.
Committee
- 2023-05-23
  - hspw00
Transportation and Infrastructure Committee
1
House committee actions
Subcommittee on Aviation Discharged.
Committee
- 2023-05-16
  - hspw14
Railroads, Pipelines, and Hazardous Materials Subcommittee
1
House committee actions
Referred to the Subcommittee on Railroads, Pipelines, and Hazardous Materials.
Committee
- 2023-05-16
  - hspw07
Coast Guard and Maritime Transportation Subcommittee
1
House committee actions
Referred to the Subcommittee on Coast Guard and Maritime Transportation.
Committee
- 2023-05-16
  - hspw05
Aviation Subcommittee
1
House committee actions
Referred to the Subcommittee on Aviation.
Committee
- 2023-05-15
Referred to the House Committee on Transportation and Infrastructure.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2023-05-15
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-05-15
Introduced in House
IntroReferral
1000
9
Library of Congress
- C001087
Rep. Crawford, Eric A. "Rick" [R-AR-1]
Eric
Crawford
R
AR
A. "Rick"
1
N
- E000246
Rep. Edwards, Chuck [R-NC-11]
Chuck
Edwards
R
NC
11
2023-05-18
False
- R000603
Rep. Rouzer, David [R-NC-7]
David
Rouzer
R
NC
7
2023-05-24
False
- G000559
Rep. Garamendi, John [D-CA-8]
John
Garamendi
D
CA
8
2023-10-25
False
- 2023-07-20T20:43:00Z

H.R. 3316, a bill to amend titles 46 and 49, United States Code, to streamline the environmental review process for major projects, and for other purposes
https://www.cbo.gov/publication/59395
As ordered reported by the House Committee on Transportation and Infrastructure on May 23, 2023
Environmental Protection
- Aviation and airports
2023-06-22T12:45:21Z
- Department of Transportation
2023-06-22T12:45:21Z
- Environmental assessment, monitoring, research
2023-06-22T12:45:21Z
- Environmental regulatory procedures
2023-06-22T12:45:21Z
- Government information and archives
2023-06-22T12:45:21Z
- Infrastructure development
2023-06-22T12:45:21Z
- Navigation, waterways, harbors
2023-06-22T12:45:21Z
- Pipelines
2023-06-22T12:45:21Z
Environmental Protection
2023-05-31T15:45:21Z
00
2023-05-15
Introduced in House
2024-01-30T18:25:16Z
This bill applies the expedited environmental review processes for major infrastructure projects under FAST-41 to federal actions involving certain port, aviation, and pipeline projects. Specifically, this bill requires, to the greatest extent feasible, the Department of Transportation (DOT) to conduct efficient environmental reviews for port infrastructure projects, pipeline projects, and airport or aviation projects that require DOT's approval under the National Environmental Policy Act of 1969 (NEPA).
In addition, DOT must maintain and publish a database concerning such projects that are categorically excluded from NEPA requirements.

To amend titles 46 and 49, United States Code, to streamline the environmental review process for major projects, and for other purposes.
- Display Title
45

To amend titles 46 and 49, United States Code, to streamline the environmental review process for major projects, and for other purposes.
2024-07-24T15:22:08Z
- Official Title as Introduced
6

To amend titles 46 and 49, United States Code, to streamline the environmental review process for major projects, and for other purposes.
2024-03-18T20:47:54Z
Introduced in House
IH
- Reported in House
2024-12-19T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr3316rh/xml/BILLS-118hr3316rh.xml
- Introduced in House
2023-05-15T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr3316ih/xml/BILLS-118hr3316ih.xml
2024-12-19
Placed on the Union Calendar, Calendar No. 760.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.