3.0.0
1329
2025-05-27T14:15:31Z
2025-05-27T14:15:31Z
House
H
HR
2023-03-01
118
[Congressional Record Volume 169, Number 39 (Wednesday, March 1, 2023)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. SELF:H.R. 1329.Congress has the power to enact this legislation pursuantto the following:Section 7253(a) of title 3; United States Code, is7 amended by striking ``seven'' and inserting ``nine''.The single subject of this legislation is:Veterans Claims[Page H1052]
- hsvr00
Veterans' Affairs Committee
House
Standing
  - hsvr09
Disability Assistance and Memorial Affairs Subcommittee
    - Discharged from
2023-04-19T15:25:01Z
    - Hearings By (subcommittee)
2023-03-29T17:05:48Z
    - Referred to
2023-03-23T21:57:29Z
  - Discharged from
2023-04-19T15:25:01Z
  - Referred To
2023-03-01T14:07:25Z

- Expedite Veteran Appeals Act of 2023
118
897
S
2023-04-26
Committee on Veterans' Affairs. Hearings held. Hearings printed: S.Hrg. 118-160.
  - Related bill
CRS

- Veterans Benefits Improvement Act of 2023
118
1530
HR
2023-09-21
Received in the Senate.
  - Related bill
CRS
- 2023-04-19
  - hsvr00
Veterans' Affairs Committee
1
House committee actions
Subcommittee on Disability Assistance and Memorial Affairs Discharged.
Committee
- 2023-03-29
  - hsvr09
Disability Assistance and Memorial Affairs Subcommittee
1
House committee actions
Subcommittee Hearings Held.
Committee
- 2023-03-23
  - hsvr09
Disability Assistance and Memorial Affairs Subcommittee
1
House committee actions
Referred to the Subcommittee on Disability Assistance and Memorial Affairs.
Committee
- 2023-03-01
Referred to the House Committee on Veterans' Affairs.
IntroReferral
H11100
2
House floor actions
  - hsvr00
Veterans' Affairs Committee
- 2023-03-01
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2023-03-01
Introduced in House
IntroReferral
1000
9
Library of Congress
- S001224
Rep. Self, Keith [R-TX-3]
Keith
Self
R
TX
3
N
- M000194
Rep. Mace, Nancy [R-SC-1]
Nancy
Mace
R
SC
1
2023-03-10
False
- D000616
Rep. DesJarlais, Scott [R-TN-4]
Scott
DesJarlais
R
TN
4
2023-04-03
False
- C001130
Rep. Crockett, Jasmine [D-TX-30]
Jasmine
Crockett
D
TX
30
2023-04-03
False
- C001072
Rep. Carson, Andre [D-IN-7]
André
Carson
D
IN
7
2023-04-06
False
- S001212
Rep. Stauber, Pete [R-MN-8]
Pete
Stauber
R
MN
8
2023-04-06
False
- J000288
Rep. Johnson, Henry C. "Hank," Jr. [D-GA-4]
Henry
Johnson
D
GA
C. "Hank"
4
2023-04-06
False
- M001135
Rep. Manning, Kathy E. [D-NC-6]
Kathy
Manning
D
NC
E.
6
2023-04-17
False
- G000600
Rep. Perez, Marie Gluesenkamp [D-WA-3]
Marie
Perez
D
WA
Gluesenkamp
3
2023-04-18
False
- G000551
Rep. Grijalva, Raúl M. [D-AZ-7]
Raúl
Grijalva
D
AZ
M.
7
2023-04-18
False
- B001257
Rep. Bilirakis, Gus M. [R-FL-12]
Gus
Bilirakis
R
FL
M.
12
2023-04-24
False
- M001210
Rep. Murphy, Gregory F. [R-NC-3]
Gregory
Murphy
R
NC
F.
3
2023-04-27
False
- S001211
Rep. Stanton, Greg [D-AZ-4]
Greg
Stanton
D
AZ
4
2023-04-27
False
- M001199
Rep. Mast, Brian J. [R-FL-21]
Brian
Mast
R
FL
J.
21
2023-05-05
False
Armed Forces and National Security
- Administrative remedies
2023-04-19T15:00:26Z
- Department of Veterans Affairs
2023-04-19T15:00:26Z
- Judges
2023-04-19T15:00:26Z
- Specialized courts
2023-04-19T15:00:26Z
- Veterans' pensions and compensation
2023-04-19T15:00:26Z
Armed Forces and National Security
2023-03-20T13:45:38Z
00
2023-03-01
Introduced in House
2023-03-29T12:36:41Z
This bill increases the maximum possible number of judges presiding over the U.S. Court of Appeals for Veterans Claims to nine judges.

To amend title 38, United States Code, to provide for an increase in the maximum number of judges who may be appointed to the United States Court of Appeals for Veterans Claims.
- Display Title
45

To amend title 38, United States Code, to provide for an increase in the maximum number of judges who may be appointed to the United States Court of Appeals for Veterans Claims.
2024-07-24T15:23:32Z
- Official Title as Introduced
6

To amend title 38, United States Code, to provide for an increase in the maximum number of judges who may be appointed to the United States Court of Appeals for Veterans Claims.
2024-03-18T20:24:04Z
Introduced in House
IH
- Introduced in House
2023-03-01T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hr1329ih/xml/BILLS-118hr1329ih.xml
2023-04-19
Subcommittee on Disability Assistance and Memorial Affairs Discharged.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.