3.0.0
168
2025-05-27T14:12:13Z
2025-05-27T14:12:13Z
House
H
HJRES
2024-06-18
118
[Congressional Record Volume 170, Number 103 (Tuesday, June 18, 2024)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GRAVES of Louisiana:H.J. Res. 168.Congress has the power to enact this legislation pursuantto the following:Section 8 of Article I of the ConstitutionThe single subject of this legislation is:Providing for congressional disapproval under chapter 8 oftitle 5, United States Code, of the rule submitted by theCouncil on Environmental Quality relating to ``NationalEnvironmental Policy Act Implementing Regulations RevisionsPhase 2.''[Page H4115]
- hsii00
Natural Resources Committee
House
Standing
  - hsii06
Energy and Mineral Resources Subcommittee
    - Referred to
2024-09-09T14:18:54Z
  - Hearings By (full committee)
2024-09-11T19:44:21Z
  - Referred To
2024-06-18T15:02:40Z
- 2024-09-11
  - hsii00
Natural Resources Committee
1
House committee actions
Committee Hearings Held.
Committee
- 2024-09-09
  - hsii06
Energy and Mineral Resources Subcommittee
1
House committee actions
Referred to the Subcommittee on Energy and Mineral Resources.
Committee
- 2024-06-18
Referred to the House Committee on Natural Resources.
IntroReferral
H11100
2
House floor actions
  - hsii00
Natural Resources Committee
- 2024-06-18
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2024-06-18
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000577
Rep. Graves, Garret [R-LA-6]
Garret
Graves
R
LA
6
N
- D000633
Rep. Duarte, John S. [R-CA-13]
John
Duarte
R
CA
S.
13
2024-06-18
True
- C001114
Rep. Curtis, John R. [R-UT-3]
John
Curtis
R
UT
R.
3
2024-06-18
True
- M001215
Rep. Miller-Meeks, Mariannette [R-IA-1]
Mariannette
Miller-Meeks
R
IA
1
2024-06-18
True
- S001212
Rep. Stauber, Pete [R-MN-8]
Pete
Stauber
R
MN
8
2024-06-18
True
- A000377
Rep. Armstrong, Kelly [R-ND-At Large]
Kelly
Armstrong
R
ND
0
2024-06-18
True
- G000592
Rep. Golden, Jared F. [D-ME-2]
Jared
Golden
D
ME
F.
2
2024-06-18
True
- B000740
Rep. Bice, Stephanie I. [R-OK-5]
Stephanie
Bice
R
OK
I.
5
2024-06-18
True
- C001103
Rep. Carter, Earl L. "Buddy" [R-GA-1]
Earl
Carter
R
GA
L. "Buddy"
1
2024-06-18
True
- B001248
Rep. Burgess, Michael C. [R-TX-26]
Michael
Burgess
R
TX
C.
26
2024-06-18
True
- L000564
Rep. Lamborn, Doug [R-CO-5]
Doug
Lamborn
R
CO
5
2024-06-18
True
- H001067
Rep. Hudson, Richard [R-NC-9]
Richard
Hudson
R
NC
9
2024-06-18
True
- R000614
Rep. Roy, Chip [R-TX-21]
Chip
Roy
R
TX
21
2024-06-18
True
- M001211
Rep. Miller, Mary E. [R-IL-15]
Mary
Miller
R
IL
E.
15
2024-06-25
False
- J000301
Rep. Johnson, Dusty [R-SD-At Large]
Dusty
Johnson
R
SD
0
2024-06-26
False
- F000469
Rep. Fulcher, Russ [R-ID-1]
Russ
Fulcher
R
ID
1
2024-09-09
False
Environmental Protection
- Administrative law and regulatory procedures
2025-02-07T19:58:43Z
- Air quality
2025-02-07T20:01:43Z
- Climate change and greenhouse gases
2025-02-07T20:01:37Z
- Congressional oversight
2025-03-11T18:49:23Z
- Environmental health
2025-02-07T20:01:49Z
- Environmental regulatory procedures
2025-02-07T20:01:24Z
- Executive Office of the President
2025-02-07T20:01:31Z
Environmental Protection
2024-07-03T17:44:54Z

Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Council on Environmental Quality relating to "National Environmental Policy Act Implementing Regulations Revisions Phase 2".
- Official Title as Introduced
6

Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Council on Environmental Quality relating to "National Environmental Policy Act Implementing Regulations Revisions Phase 2".
2024-06-20T12:18:15Z
Introduced in House
IH
- Display Title
45

Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Council on Environmental Quality relating to "National Environmental Policy Act Implementing Regulations Revisions Phase 2".
2024-06-19T08:05:31Z
- Introduced in House
2024-06-18T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hjres168ih/xml/BILLS-118hjres168ih.xml
2024-09-11
Committee Hearings Held.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.