3.0.0
150
2025-01-16T11:56:46Z
2025-01-16T11:56:46Z
House
H
HJRES
2024-05-17
118
[Congressional Record Volume 170, Number 86 (Friday, May 17, 2024)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. ARMSTRONG:H.J. Res. 150.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8.The single subject of this legislation is:Providing for congressional disapproval under chapter 8 oftitle 5, United States Code, of the rule submitted by theEnvironmental Protection Agency relating to ``NationalEmission Standards for Hazardous Air Pollutants: Coal- andOil-Fired Electric Utility Steam Generating Units Review ofthe Residual Risk and Technology Review''.[Page H3358]
- hsif00
Energy and Commerce Committee
House
Standing
  - hsif18
Environment Subcommittee
    - Referred to
2024-05-24T14:45:06Z
  - Referred To
2024-05-17T13:00:20Z

- Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "National Emission Standards for Hazardous Air Pollutants: Coal- and Oil-Fired Electric Utility Steam Generating Units Review of the Residual Risk and Technology Review".
118
172
HJRES
2024-07-02
Referred to the House Committee on Energy and Commerce.
  - Identical bill
CRS

- A joint resolution providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "National Emission Standards for Hazardous Air Pollutants: Coal- and Oil-Fired Electric Utility Steam Generating Units Review of the Residual Risk and Technology Review".
118
88
SJRES
2024-05-16
Read twice and referred to the Committee on Environment and Public Works.
  - Identical bill
CRS
- 2024-05-24
  - hsif18
Environment Subcommittee
1
House committee actions
Referred to the Subcommittee on Environment, Manufacturing, and Critical Materials.
Committee
- 2024-05-17
Referred to the House Committee on Energy and Commerce.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2024-05-17
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2024-05-17
Introduced in House
IntroReferral
1000
9
Library of Congress
- A000377
Rep. Armstrong, Kelly [R-ND-At Large]
Kelly
Armstrong
R
ND
N
- Z000018
Rep. Zinke, Ryan K. [R-MT-1]
Ryan
Zinke
R
MT
K.
1
2024-05-17
True
- B001306
Rep. Balderson, Troy [R-OH-12]
Troy
Balderson
R
OH
12
2024-05-17
True
- P000615
Rep. Pence, Greg [R-IN-6]
Greg
Pence
R
IN
6
2024-05-17
True
- G000568
Rep. Griffith, H. Morgan [R-VA-9]
H.
Griffith
R
VA
Morgan
9
2024-05-17
True
- W000814
Rep. Weber, Randy K. [R-TX-14]
Randy
Weber
R
TX
K.
14
2024-05-17
True
- M001211
Rep. Miller, Mary E. [R-IL-15]
Mary
Miller
R
IL
E.
15
2024-05-17
True
- G000558
Rep. Guthrie, Brett [R-KY-2]
Brett
Guthrie
R
KY
2
2024-05-17
True
- B000668
Rep. Bentz, Cliff [R-OR-2]
Cliff
Bentz
R
OR
2
2024-05-17
True
- G000576
Rep. Grothman, Glenn [R-WI-6]
Glenn
Grothman
R
WI
6
2024-05-17
True
- M001194
Rep. Moolenaar, John R. [R-MI-2]
John
Moolenaar
R
MI
R.
2
2024-05-17
True
- D000032
Rep. Donalds, Byron [R-FL-19]
Byron
Donalds
R
FL
19
2024-06-12
False
- P000605
Rep. Perry, Scott [R-PA-10]
Scott
Perry
R
PA
10
2024-07-09
False
- H001096
Rep. Hageman, Harriet M. [R-WY-At Large]
Harriet
Hageman
R
WY
M.
0
2024-07-18
False
Environmental Protection
Environmental Protection
2024-05-31T16:11:19Z

Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "National Emission Standards for Hazardous Air Pollutants: Coal- and Oil-Fired Electric Utility Steam Generating Units Review of the Residual Risk and Technology Review".
- Display Title
45

Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "National Emission Standards for Hazardous Air Pollutants: Coal- and Oil-Fired Electric Utility Steam Generating Units Review of the Residual Risk and Technology Review".
2024-06-11T16:09:02Z
- Official Title as Introduced
6

Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to "National Emission Standards for Hazardous Air Pollutants: Coal- and Oil-Fired Electric Utility Steam Generating Units Review of the Residual Risk and Technology Review".
2024-05-18T08:18:16Z
Introduced in House
IH
- Introduced in House
2024-05-17T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-118hjres150ih/xml/BILLS-118hjres150ih.xml
2024-05-24
Referred to the Subcommittee on Environment, Manufacturing, and Critical Materials.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.