3.0.0
8188
2023-05-11T15:31:06Z
2023-05-11T15:31:06Z
House
HR
2022-06-22
117
[Congressional Record Volume 168, Number 106 (Wednesday, June 22, 2022)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. PASCRELL:H.R. 8188.Congress has the power to enact this legislation pursuantto the following:This bill is enacted pursuant to the power granted toCongress under Article I, Section 8, Clause 18 of the UnitedStates Constitution.[Page H5823]
- hswm00
Ways and Means Committee
House
Standing
  - Referred to
2022-06-22T14:02:20Z
- hsif00
Energy and Commerce Committee
House
Standing
  - Referred to
2022-06-22T14:02:15Z

- Saving Access to Laboratory Services Act
117
4449
S
2022-06-22
Read twice and referred to the Committee on Finance.
  - Identical bill
CRS
- 2022-06-22
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hswm00
Ways and Means Committee
- 2022-06-22
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2022-06-22
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2022-06-22
Introduced in House
IntroReferral
1000
9
Library of Congress
- P000096
Rep. Pascrell, Bill, Jr. [D-NJ-9]
WILLIAM
PASCRELL
D
NJ
J.
9
N
- P000608
Rep. Peters, Scott H. [D-CA-52]
Scott
Peters
D
CA
H.
52
2022-06-22
True
- H001067
Rep. Hudson, Richard [R-NC-8]
Richard
Hudson
R
NC
8
2022-06-22
True
- S001180
Rep. Schrader, Kurt [D-OR-5]
Kurt
Schrader
D
OR
5
2022-06-22
True
- B001257
Rep. Bilirakis, Gus M. [R-FL-12]
Gus
Bilirakis
R
FL
M.
12
2022-06-22
True
- B001251
Rep. Butterfield, G. K. [D-NC-1]
G. K.
Butterfield
D
NC
1
2022-07-01
False
- F000466
Rep. Fitzpatrick, Brian K. [R-PA-1]
Brian
Fitzpatrick
R
PA
K.
1
2022-07-26
False
- C001103
Rep. Carter, Earl L. "Buddy" [R-GA-1]
Earl
Carter
R
GA
L. "Buddy"
1
2022-08-12
False
- A000371
Rep. Aguilar, Pete [D-CA-31]
Pete
Aguilar
D
CA
31
2022-09-15
False
- R000603
Rep. Rouzer, David [R-NC-7]
David
Rouzer
R
NC
7
2022-09-15
False
- R000576
Rep. Ruppersberger, C. A. Dutch [D-MD-2]
C. A.
Ruppersberger
D
MD
Dutch
2
2022-09-19
False
- J000302
Rep. Joyce, John [R-PA-13]
John
Joyce
R
PA
13
2022-09-19
False
- C001120
Rep. Crenshaw, Dan [R-TX-2]
Dan
Crenshaw
R
TX
2
2022-09-20
False
- B001275
Rep. Bucshon, Larry [R-IN-8]
Larry
Bucshon
R
IN
8
2022-09-20
False
- L000559
Rep. Langevin, James R. [D-RI-2]
JAMES
LANGEVIN
D
RI
R.
2
2022-09-28
False
- O000171
Rep. O'Halleran, Tom [D-AZ-1]
Tom
O'Halleran
D
AZ
1
2022-09-28
False
- K000391
Rep. Krishnamoorthi, Raja [D-IL-8]
Raja
Krishnamoorthi
D
IL
8
2022-09-30
False
- K000382
Rep. Kuster, Ann M. [D-NH-2]
Ann
Kuster
D
NH
M.
2
2022-09-30
False
- B001300
Rep. Barragan, Nanette Diaz [D-CA-44]
Nanette
Barragan
D
CA
Diaz
44
2022-10-07
False
- M001203
Rep. Malinowski, Tom [D-NJ-7]
Tom
Malinowski
D
NJ
7
2022-10-07
False
- D000628
Rep. Dunn, Neal P. [R-FL-2]
Neal
Dunn
R
FL
P.
2
2022-10-14
False
- S001218
Rep. Stansbury, Melanie Ann [D-NM-1]
Melanie
Stansbury
D
NM
Ann
1
2022-10-14
False
- C001039
Rep. Cammack, Kat [R-FL-3]
Kat
Cammack
R
FL
3
2022-10-14
False
- L000589
Rep. Lesko, Debbie [R-AZ-8]
Debbie
Lesko
R
AZ
8
2022-10-14
False
- G000583
Rep. Gottheimer, Josh [D-NJ-5]
Josh
Gottheimer
D
NJ
5
2022-10-21
False
- W000788
Rep. Williams, Nikema [D-GA-5]
Nikema
Williams
D
GA
5
2022-10-28
False
- C001114
Rep. Curtis, John R. [R-UT-3]
John
Curtis
R
UT
R.
3
2022-10-28
False
Health
- Drug safety, medical device, and laboratory regulation
- Government information and archives
- Health care costs and insurance
- Health information and medical records
- Medical tests and diagnostic methods
- Medicare
Health
00
2022-06-22
Introduced in House
2022-10-21T20:38:17Z
Saving Access to Laboratory Services Act
This bill modifies provisions relating to Medicare payment rates for clinical diagnostic laboratory services, including by requiring payment rates for certain widely available clinical diagnostic laboratory tests to be based on a statistical sampling of private sector rates.

Saving Access to Laboratory Services Act
- Display Title

Saving Access to Laboratory Services Act
- Short Title(s) as Introduced

Saving Access to Laboratory Services Act
Introduced in House
IH
- Official Title as Introduced

To amend title XVIII of the Social Security Act to improve the accuracy of market-based Medicare payment for clinical diagnostic laboratory services, to reduce administrative burdens in the collection of data, and for other purposes.
Introduced in House
IH
- Introduced in House
2022-06-22T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr8188ih/xml/BILLS-117hr8188ih.xml
2022-06-22
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Ways and Means, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.