3.0.0
6468
2022-12-30T03:49:01Z
2022-12-30T03:49:01Z
House
HR
2022-01-21
117
[Congressional Record Volume 168, Number 14 (Friday, January 21, 2022)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GRIFFITH:H.R. 6468.Congress has the power to enact this legislation pursuantto the following:This bill is enacted pursuant to the power granted toCongress under Article I, Section 8 of the United StatesConstitution.[Page H295]
- hsif00
Energy and Commerce Committee
House
Standing
  - hsif14
Health Subcommittee
    - Referred to
2022-01-24T15:44:36Z
  - Referred to
2022-01-21T14:00:35Z
- hsgo00
Oversight and Accountability Committee
House
Standing
  - Referred to
2022-01-21T14:00:40Z
- 2022-01-24
  - hsif14
Health Subcommittee
1
House committee actions
Referred to the Subcommittee on Health.
Committee
- 2022-01-21
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Oversight and Reform, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsgo00
Oversight and Accountability Committee
- 2022-01-21
Referred to the Committee on Energy and Commerce, and in addition to the Committee on Oversight and Reform, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2022-01-21
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2022-01-21
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000568
Rep. Griffith, H. Morgan [R-VA-9]
H.
Griffith
R
VA
Morgan
9
N
Health
- Buy American requirements
- Cardiovascular and respiratory health
- Congressional oversight
- Emergency medical services and trauma care
- Health personnel
- Health promotion and preventive care
- Health technology, devices, supplies
- Infectious and parasitic diseases
- Manufacturing
- Product safety and quality
- Public contracts and procurement
- Public-private cooperation
- State and local government operations
- Worker safety and health
Health
00
2022-01-21
Introduced in House
2022-04-01T20:13:27Z
Domestic Security Using Production Partnerships and Lessons from Yesterday Act of 2022 or the Domestic SUPPLY Act of 2022
This bill establishes a program and sets out other requirements to promote domestic manufacturing of personal protective equipment (PPE) for infectious diseases and other public health emergencies.
The Department of Health and Human Services (HHS) must establish a program to enter into purchasing agreements for PPE produced domestically by manufacturers that are majority-owned and -operated by U.S. citizens. HHS must coordinate with the Department of Defense and the Department of Homeland Security on this program.
In addition, the federal government must only procure, subject to limited exceptions, PPE that is produced domestically to prevent the transmission of an infectious disease. If using federal funds, states or localities must also procure PPE domestically.
Further, the bill requires HHS to consult with the Occupational Safety and Health Administration on a report about changes to federal requirements for PPE during the COVID-19 pandemic and the impact of those changes on health care workers who cared for patients in 2020 and 2021.

Domestic SUPPLY Act of 2022
- Display Title

Domestic SUPPLY Act of 2022
- Short Title(s) as Introduced

Domestic SUPPLY Act of 2022
Introduced in House
IH
- Short Title(s) as Introduced

Domestic Security Using Production Partnerships and Lessons from Yesterday Act of 2022
Introduced in House
IH
- Official Title as Introduced

To direct the Secretary of Health and Human Services, in collaboration with the Assistant Secretary for Preparedness and Response and the Director of the Centers for Disease Control and Prevention, and in coordination with the Secretary of Defense and the Secretary of Homeland Security, to establish a program of entering into partnerships with eligible domestic manufacturers to ensure the availability of qualified personal protective equipment to prepare for and respond to national health or other emergencies, and for other purposes.
Introduced in House
IH
- Introduced in House
2022-01-21T05:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr6468ih/xml/BILLS-117hr6468ih.xml
2022-01-24
Referred to the Subcommittee on Health.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.