3.0.0
5483
2023-01-01T23:51:29Z
2023-01-01T23:51:29Z
House
HR
2021-10-05
117
[Congressional Record Volume 167, Number 175 (Tuesday, October 5, 2021)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GONZALEZ of Ohio:H.R. 5483.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8, Clause 18 of the Constitution statingthat Congress has the authority to ``make all laws whichshall be necessary and proper for carrying into execution theforegoing powers, and all other powers vested by thisConstitution.''[Page H5600]
- hsvr00
Veterans' Affairs Committee
House
Standing
  - hsvr10
Economic Opportunity Subcommittee
    - Referred to
2021-10-25T14:22:55Z
  - Referred to
2021-10-05T13:02:35Z

- Informing VETS Act of 2022
117
4319
S
2022-07-13
Committee on Veterans' Affairs. Hearings held.
  - Related bill
CRS
- 2021-10-25
  - hsvr10
Economic Opportunity Subcommittee
1
House committee actions
Referred to the Subcommittee on Economic Opportunity.
Committee
- 2021-10-05
Referred to the House Committee on Veterans' Affairs.
IntroReferral
H11100
2
House floor actions
  - hsvr00
Veterans' Affairs Committee
- 2021-10-05
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2021-10-05
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000588
Rep. Gonzalez, Anthony [R-OH-16]
Anthony
Gonzalez
R
OH
16
N
- A000376
Rep. Allred, Colin Z. [D-TX-32]
Colin
Allred
D
TX
Z.
32
2021-10-05
True
- B001306
Rep. Balderson, Troy [R-OH-12]
Troy
Balderson
R
OH
12
2021-10-19
False
- M000194
Rep. Mace, Nancy [R-SC-1]
Nancy
Mace
R
SC
1
2021-10-26
False
- P000614
Rep. Pappas, Chris [D-NH-1]
Chris
Pappas
D
NH
1
2021-10-28
False
- S001196
Rep. Stefanik, Elise M. [R-NY-21]
Elise
Stefanik
R
NY
M.
21
2021-11-01
False
- D000032
Rep. Donalds, Byron [R-FL-19]
Byron
Donalds
R
FL
19
2021-12-08
False
- G000583
Rep. Gottheimer, Josh [D-NJ-5]
Josh
Gottheimer
D
NJ
5
2022-01-11
False
- M001135
Rep. Manning, Kathy E. [D-NC-6]
Kathy
Manning
D
NC
E.
6
2022-12-14
False
Armed Forces and National Security
Armed Forces and National Security
00
2021-10-05
Introduced in House
2022-06-22T18:16:04Z
Informing Veterans on Education for Transitioning Servicemembers Act or the Informing VETS Act
This bill requires the Department of Veterans Affairs to regularly promote the Veteran Readiness and Employment program by (1) sending a letter to each veteran entitled to the program that explains the educational benefits of the program, and (2) providing in each letter and online a side-by-side comparison of benefits between the program and Post-9/11 GI Bill educational assistance.

Informing VETS Act
- Official Title as Introduced

To amend title 38, United States Code, to direct the Secretary of Veterans Affairs to regularly promote programs under chapter 31 of such title.
Introduced in House
IH
- Display Title

Informing VETS Act
- Short Title(s) as Introduced

Informing VETS Act
Introduced in House
IH
- Short Title(s) as Introduced

Informing Veterans on Education for Transitioning Servicemembers Act
Introduced in House
IH
- Introduced in House
2021-10-05T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr5483ih/xml/BILLS-117hr5483ih.xml
2021-10-25
Referred to the Subcommittee on Economic Opportunity.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.