3.0.0
4820
2022-12-31T05:04:26Z
2022-12-31T05:04:26Z
House
HR
2021-07-29
117
[Congressional Record Volume 167, Number 133 (Thursday, July 29, 2021)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. GOOD of Virginia:H.R. 4820.Congress has the power to enact this legislation pursuantto the following:Article 1, Section 8 of the United States Constitution.[Page H4294]
- hsif00
Energy and Commerce Committee
House
Standing
  - hsif14
Health Subcommittee
    - Referred to
2021-07-30T15:10:00Z
  - Referred to
2021-07-29T14:08:30Z
- 2021-07-30
  - hsif14
Health Subcommittee
1
House committee actions
Referred to the Subcommittee on Health.
Committee
- 2021-07-29
Referred to the House Committee on Energy and Commerce.
IntroReferral
H11100
2
House floor actions
  - hsif00
Energy and Commerce Committee
- 2021-07-29
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2021-07-29
Introduced in House
IntroReferral
1000
9
Library of Congress
- G000595
Rep. Good, Bob [R-VA-5]
Bob
Good
R
VA
5
N
- B001299
Rep. Banks, Jim [R-IN-3]
Jim
Banks
R
IN
3
2021-07-29
True
- J000304
Rep. Jackson, Ronny [R-TX-13]
Ronny
Jackson
R
TX
13
2021-07-29
True
- B001302
Rep. Biggs, Andy [R-AZ-5]
Andy
Biggs
R
AZ
5
2021-07-29
True
- H001084
Rep. Herrell, Yvette [R-NM-2]
Yvette
Herrell
R
NM
2
2021-07-29
True
- R000614
Rep. Roy, Chip [R-TX-21]
Chip
Roy
R
TX
21
2021-07-29
True
- M001211
Rep. Miller, Mary E. [R-IL-15]
Mary
Miller
R
IL
E.
15
2021-08-06
False
- P000605
Rep. Perry, Scott [R-PA-10]
Scott
Perry
R
PA
10
2021-09-14
False
Health
Health
00
2021-07-29
Introduced in House
2022-02-22T17:47:47Z
Health Agency Check-Up Act
This bill establishes a bipartisan commission to review and recommend whether to modify or eliminate statutory reporting requirements that apply to the Centers for Disease Control and Prevention (CDC), the National Institutes of Health (NIH), and the Food and Drug Administration (FDA).
To inform this effort, the CDC, the NIH, and the FDA must provide the commission with relevant recommendations and information about their respective staffing, budgets, programs, reports, and regulations.
The bill automatically makes any provision of law requiring a report that the commission recommends for elimination ineffective after 45 days, unless Congress enacts a joint resolution disapproving of the recommendation.

Health Agency Check-Up Act
- Official Title as Introduced

To reduce the number of reports that are political or redundant and to alleviate regulatory burdens on the health care industry, and for other purposes.
Introduced in House
IH
- Display Title

Health Agency Check-Up Act
- Short Title(s) as Introduced

Health Agency Check-Up Act
Introduced in House
IH
- Introduced in House
2021-07-29T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr4820ih/xml/BILLS-117hr4820ih.xml
2021-07-30
Referred to the Subcommittee on Health.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.