3.0.0
4548
2022-12-31T05:05:59Z
2022-12-31T05:06:00Z
House
HR
2021-07-20
117
[Congressional Record Volume 167, Number 127 (Tuesday, July 20, 2021)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. WILLIAMS of Texas:H.R. 4548.Congress has the power to enact this legislation pursuantto the following:Article, 1, Section 8 of the United States Constitution.[Page H3754]
- hsba00
Financial Services Committee
House
Standing
  - Referred to
2021-07-20T14:05:25Z
- 2021-07-20
Referred to the House Committee on Financial Services.
IntroReferral
H11100
2
House floor actions
  - hsba00
Financial Services Committee
- 2021-07-20
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2021-07-20
Introduced in House
IntroReferral
1000
9
Library of Congress
- W000816
Rep. Williams, Roger [R-TX-25]
Roger
Williams
R
TX
25
N
- M001156
Rep. McHenry, Patrick T. [R-NC-10]
Patrick
McHenry
R
NC
10
2021-07-20
True
- L000569
Rep. Luetkemeyer, Blaine [R-MO-3]
Blaine
Luetkemeyer
R
MO
3
2021-07-20
True
- B001282
Rep. Barr, Andy [R-KY-6]
Andy
Barr
R
KY
6
2021-07-20
True
- H001058
Rep. Huizenga, Bill [R-MI-2]
Bill
Huizenga
R
MI
2
2021-07-20
True
- B001305
Rep. Budd, Ted [R-NC-13]
Ted
Budd
R
NC
13
2021-07-20
True
- T000480
Rep. Timmons, William R. IV [R-SC-4]
William
Timmons
R
SC
R.
4
2021-07-20
True
- K000392
Rep. Kustoff, David [R-TN-8]
David
Kustoff
R
TN
8
2021-07-20
True
- S000250
Rep. Sessions, Pete [R-TX-17]
PETE
SESSIONS
R
TX
17
2021-07-20
True
- M001195
Rep. Mooney, Alexander X. [R-WV-2]
Alexander
Mooney
R
WV
X.
2
2021-07-20
True
- G000589
Rep. Gooden, Lance [R-TX-5]
Lance
Gooden
R
TX
5
2021-07-20
True
- D000032
Rep. Donalds, Byron [R-FL-19]
Byron
Donalds
R
FL
19
2021-12-20
False
Finance and Financial Sector
Finance and Financial Sector
00
2021-07-20
Introduced in House
2022-01-14T15:01:02Z
Unfair or Deceptive Acts or Practices Uniformity Act
This bill eliminates the authority of the Consumer Financial Protection Bureau to take action against a person or service provider for an abusive act or practice in connection with a consumer financial product or service. Additionally, the bureau is prohibited from taking action against an unfair or deceptive act unless the bureau first consults with the primary financial regulatory agency of the person or service provider. Finally, any rulemaking made by the bureau regarding an unfair or deceptive act must comply with certain Federal Trade Commission rulemaking requirements.

Unfair or Deceptive Acts or Practices Uniformity Act
- Official Title as Introduced

To amend the Consumer Protection Act of 2010 to grant the Bureau of Consumer Financial Protection the authority to regulate certain acts and practices using processes and procedures consistent with and similar to those in place at the Federal Trade Commission, to encourage greater communication amongst regulators, and for other purposes.
Introduced in House
IH
- Display Title

Unfair or Deceptive Acts or Practices Uniformity Act
- Short Title(s) as Introduced

Unfair or Deceptive Acts or Practices Uniformity Act
Introduced in House
IH
- Introduced in House
2021-07-20T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr4548ih/xml/BILLS-117hr4548ih.xml
2021-07-20
Referred to the House Committee on Financial Services.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.